(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (lib_symbols
    (symbol "ABX00012:ABX00012" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at -25.4 21.082 0))
      (property "Value" "ABX00012" (at -25.4 -22.86 0))
      (property "Footprint" "ARDUINO_ABX00012" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "MF" "Arduino" (at 0 0 0))
      (property "MAXIMUM_PACKAGE_HEIGHT" "" (at 0 0 0))
      (property "Package" "None" (at 0 0 0))
      (property "Price" "None" (at 0 0 0))
      (property "Check_prices" "https://www.snapeda.com/parts/Arduino%20MKR%20ZERO/Arduino/view-part/?ref=eda" (at 0 0 0))
      (property "STANDARD" "Manufacturer Recommendations" (at 0 0 0))
      (property "PARTREV" "5" (at 0 0 0))
      (property "SnapEDA_Link" "https://www.snapeda.com/parts/Arduino%20MKR%20ZERO/Arduino/view-part/?ref=snap" (at 0 0 0))
      (property "MP" "Arduino MKR ZERO" (at 0 0 0))
      (property "Description" "\nI2S bus & SD for sound, music & digital audio data\n" (at 0 0 0))
      (property "Availability" "Not in stock" (at 0 0 0))
      (property "MANUFACTURER" "Arduino" (at 0 0 0))
      (symbol "ABX00012_0_0"
        (rectangle (start -25.4 -20.32) (end 25.4 20.32)
          (fill (type background))
        )
        (pin bidirectional line (at -30.48 15.24 0) (length 5.08)
          (name "PA03_VREFA/AREF")
          (number "1")
        )
        (pin bidirectional line (at -30.48 -7.62 0) (length 5.08)
          (name "PA23_TC4-W1/1")
          (number "10")
        )
        (pin bidirectional line (at -30.48 -10.16 0) (length 5.08)
          (name "PA10_TCC0-W2/~2")
          (number "11")
        )
        (pin bidirectional line (at -30.48 -12.7 0) (length 5.08)
          (name "PA11_TCC0-W3/~3")
          (number "12")
        )
        (pin bidirectional line (at -30.48 -15.24 0) (length 5.08)
          (name "PB10_TCC0-W4/~4")
          (number "13")
        )
        (pin bidirectional line (at -30.48 -17.78 0) (length 5.08)
          (name "PB11_TCC0-W5/~5")
          (number "14")
        )
        (pin bidirectional line (at 30.48 -17.78 180) (length 5.08)
          (name "PA20_TCC0-W6")
          (number "15")
        )
        (pin bidirectional line (at 30.48 -15.24 180) (length 5.08)
          (name "PA21_TCC0-W7")
          (number "16")
        )
        (pin bidirectional line (at 30.48 -12.7 180) (length 5.08)
          (name "PA16_S1_MOSI")
          (number "17")
        )
        (pin bidirectional line (at 30.48 -10.16 180) (length 5.08)
          (name "PA17_S1_SCK")
          (number "18")
        )
        (pin bidirectional line (at 30.48 -7.62 180) (length 5.08)
          (name "PA19_S1_MISO")
          (number "19")
        )
        (pin bidirectional line (at -30.48 12.7 0) (length 5.08)
          (name "PA02_AIN0/DAC0/A0")
          (number "2")
        )
        (pin bidirectional line (at 30.48 -5.08 180) (length 5.08)
          (name "PA08_S0_I2C_SDA")
          (number "20")
        )
        (pin bidirectional line (at 30.48 -2.54 180) (length 5.08)
          (name "PA09_S0_I2C_SCL")
          (number "21")
        )
        (pin bidirectional line (at 30.48 0 180) (length 5.08)
          (name "PB23_S5_RX")
          (number "22")
        )
        (pin bidirectional line (at 30.48 2.54 180) (length 5.08)
          (name "PB22_S5_TX")
          (number "23")
        )
        (pin input line (at 30.48 5.08 180) (length 5.08)
          (name "RESET")
          (number "24")
        )
        (pin power_in line (at 30.48 7.62 180) (length 5.08)
          (name "GND")
          (number "25")
        )
        (pin power_in line (at 30.48 10.16 180) (length 5.08)
          (name "+3V3")
          (number "26")
        )
        (pin power_in line (at 30.48 12.7 180) (length 5.08)
          (name "VIN")
          (number "27")
        )
        (pin power_in line (at 30.48 15.24 180) (length 5.08)
          (name "+5V")
          (number "28")
        )
        (pin bidirectional line (at -30.48 10.16 0) (length 5.08)
          (name "PB02_AIN10/A1")
          (number "3")
        )
        (pin bidirectional line (at -30.48 7.62 0) (length 5.08)
          (name "PB03_AIN11/A2")
          (number "4")
        )
        (pin bidirectional line (at -30.48 5.08 0) (length 5.08)
          (name "PA04_AIN4/A3")
          (number "5")
        )
        (pin bidirectional line (at -30.48 2.54 0) (length 5.08)
          (name "PA05_AIN5/A4")
          (number "6")
        )
        (pin bidirectional line (at -30.48 0 0) (length 5.08)
          (name "PA06_AIN6/A5")
          (number "7")
        )
        (pin bidirectional line (at -30.48 -2.54 0) (length 5.08)
          (name "PA07_AIN7/A6")
          (number "8")
        )
        (pin bidirectional line (at -30.48 -5.08 0) (length 5.08)
          (name "PA22_TC4-W0/0")
          (number "9")
        )
      )
    )
    (symbol "Connector:Conn_01x03_Pin" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x03_Pin" (at 0 -5.08 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x03, script generated" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x03_Pin_1_1"
        (polyline
          (pts
            (xy 1.27 -2.54)
            (xy 0.8636 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 0)
            (xy 0.8636 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 2.54)
            (xy 0.8636 2.54)
          )
          (fill (type none))
        )
        (rectangle (start 0.8636 -2.413) (end 0 -2.667)
          (fill (type outline))
        )
        (rectangle (start 0.8636 0.127) (end 0 -0.127)
          (fill (type outline))
        )
        (rectangle (start 0.8636 2.667) (end 0 2.413)
          (fill (type outline))
        )
        (pin passive line (at 5.08 2.54 180) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at 5.08 0 180) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at 5.08 -2.54 180) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
      )
    )
    (symbol "Connector:Conn_01x04_Pin" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x04_Pin" (at 0 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x04, script generated" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x04_Pin_1_1"
        (polyline
          (pts
            (xy 1.27 -5.08)
            (xy 0.8636 -5.08)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 -2.54)
            (xy 0.8636 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 0)
            (xy 0.8636 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 2.54)
            (xy 0.8636 2.54)
          )
          (fill (type none))
        )
        (rectangle (start 0.8636 -4.953) (end 0 -5.207)
          (fill (type outline))
        )
        (rectangle (start 0.8636 -2.413) (end 0 -2.667)
          (fill (type outline))
        )
        (rectangle (start 0.8636 0.127) (end 0 -0.127)
          (fill (type outline))
        )
        (rectangle (start 0.8636 2.667) (end 0 2.413)
          (fill (type outline))
        )
        (pin passive line (at 5.08 2.54 180) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at 5.08 0 180) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at 5.08 -2.54 180) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at 5.08 -5.08 180) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
      )
    )
    (symbol "Connector:Conn_01x04_Socket" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x04_Socket" (at 0 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x04, script generated" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x04_Socket_1_1"
        (arc (start 0 -4.572) (mid -0.5058 -5.08) (end 0 -5.588)
          (fill (type none))
        )
        (arc (start 0 -2.032) (mid -0.5058 -2.54) (end 0 -3.048)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 -5.08)
            (xy -0.508 -5.08)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 -2.54)
            (xy -0.508 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 0)
            (xy -0.508 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.54)
            (xy -0.508 2.54)
          )
          (fill (type none))
        )
        (arc (start 0 0.508) (mid -0.5058 0) (end 0 -0.508)
          (fill (type none))
        )
        (arc (start 0 3.048) (mid -0.5058 2.54) (end 0 2.032)
          (fill (type none))
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
      )
    )
    (symbol "Connector:Screw_Terminal_01x02" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 2.54 0))
      (property "Value" "Screw_Terminal_01x02" (at 0 -5.08 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "screw terminal" (at 0 0 0))
      (property "ki_description" "Generic screw terminal, single row, 01x02, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "TerminalBlock*:*" (at 0 0 0))
      (symbol "Screw_Terminal_01x02_1_1"
        (rectangle (start -1.27 1.27) (end 1.27 -3.81)
          (fill (type background))
        )
        (circle (center 0 -2.54) (radius 0.635)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.5334 -2.2098)
            (xy 0.3302 -3.048)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.5334 0.3302)
            (xy 0.3302 -0.508)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.3556 -2.032)
            (xy 0.508 -2.8702)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.3556 0.508)
            (xy 0.508 -0.3302)
          )
          (fill (type none))
        )
        (circle (center 0 0) (radius 0.635)
          (fill (type none))
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Mechanical:MountingHole" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "H" (at 0 5.08 0))
      (property "Value" "MountingHole" (at 0 3.175 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "mounting hole" (at 0 0 0))
      (property "ki_description" "Mounting Hole without connection" (at 0 0 0))
      (property "ki_fp_filters" "MountingHole*" (at 0 0 0))
      (symbol "MountingHole_0_1"
        (circle (center 0 0) (radius 1.27)
          (fill (type none))
        )
      )
    )
    (symbol "Switch:SW_SPST" (pin_names (offset 0) hide) (in_bom yes) (on_board yes)
      (property "Reference" "SW" (at 0 3.175 0))
      (property "Value" "SW_SPST" (at 0 -2.54 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "switch lever" (at 0 0 0))
      (property "ki_description" "Single Pole Single Throw (SPST) switch" (at 0 0 0))
      (symbol "SW_SPST_0_0"
        (circle (center -2.032 0) (radius 0.508)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.524 0.254)
            (xy 1.524 1.778)
          )
          (fill (type none))
        )
        (circle (center 2.032 0) (radius 0.508)
          (fill (type none))
        )
      )
      (symbol "SW_SPST_1_1"
        (pin passive line (at -5.08 0 0) (length 2.54)
          (name "A")
          (number "1")
        )
        (pin passive line (at 5.08 0 180) (length 2.54)
          (name "B")
          (number "2")
        )
      )
    )
    (symbol "TMC2208_SILENTSTEPSTICK:TMC2208_SILENTSTEPSTICK" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U2" (at 0 22.86 0))
      (property "Value" "TMC2208" (at 0 20.32 0))
      (property "Footprint" "MODULE_TMC2208_SILENTSTEPSTICK" (at 5.08 5.08 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "Description" "\nTMC2208 Motor Controller/Driver, Stepper Power Management Evaluation Board\n" (at 0 5.08 0))
      (property "MF" "Trinamic Motion" (at 0 0 0))
      (property "Package" "None" (at 0 0 0))
      (property "Price" "None" (at 0 0 0))
      (property "Check_prices" "https://www.snapeda.com/parts/TMC2208%20SILENTSTEPSTICK/Trinamic+Motion+Control+GmbH/view-part/?ref=eda" (at 0 5.08 0))
      (property "SnapEDA_Link" "https://www.snapeda.com/parts/TMC2208%20SILENTSTEPSTICK/Trinamic+Motion+Control+GmbH/view-part/?ref=snap" (at 0 5.08 0))
      (property "MP" "TMC2208 SILENTSTEPSTICK" (at 0 5.08 0))
      (property "Purchase-URL" "https://pricing.snapeda.com/search?q=TMC2208 SILENTSTEPSTICK&ref=eda" (at 0 5.08 0))
      (property "Availability" "In Stock" (at 0 0 0))
      (property "MANUFACTURER" "Trinamic Motion" (at 0 0 0))
      (symbol "TMC2208_SILENTSTEPSTICK_0_0"
        (rectangle (start -12.7 -20.32) (end 12.7 17.78)
          (fill (type background))
        )
        (pin input line (at -17.78 5.08 0) (length 5.08)
          (name "DIR")
          (number "JP1_1")
        )
        (pin input line (at -17.78 2.54 0) (length 5.08)
          (name "STEP")
          (number "JP1_2")
        )
        (pin bidirectional line (at -17.78 -10.16 0) (length 5.08)
          (name "PDN/UART1")
          (number "JP1_4")
        )
        (pin bidirectional line (at -17.78 -12.7 0) (length 5.08)
          (name "PDN/UART2")
          (number "JP1_5")
        )
        (pin input line (at -17.78 -5.08 0) (length 5.08)
          (name "MS2")
          (number "JP1_6")
        )
        (pin input line (at -17.78 -2.54 0) (length 5.08)
          (name "MS1")
          (number "JP1_7")
        )
        (pin input line (at -17.78 10.16 0) (length 5.08)
          (name "EN")
          (number "JP1_8")
        )
        (pin power_in line (at 17.78 12.7 180) (length 5.08)
          (name "VM")
          (number "JP2_1")
        )
        (pin power_in line (at 17.78 -17.78 180) (length 5.08)
          (name "GND")
          (number "JP2_2")
        )
        (pin passive line (at 17.78 2.54 180) (length 5.08)
          (name "OA2")
          (number "JP2_3")
        )
        (pin passive line (at 17.78 0 180) (length 5.08)
          (name "OA1")
          (number "JP2_4")
        )
        (pin passive line (at 17.78 -2.54 180) (length 5.08)
          (name "OB1")
          (number "JP2_5")
        )
        (pin passive line (at 17.78 -5.08 180) (length 5.08)
          (name "OB2")
          (number "JP2_6")
        )
        (pin power_in line (at 17.78 15.24 180) (length 5.08)
          (name "VIO")
          (number "JP2_7")
        )
        (pin power_in line (at 17.78 -17.78 180) (length 5.08)
          (name "GND")
          (number "JP2_8")
        )
      )
    )
    (symbol "power:+12V" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -3.81 0))
      (property "Value" "+12V" (at 0 3.556 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"+12V\"" (at 0 0 0))
      (symbol "+12V_0_1"
        (polyline
          (pts
            (xy -0.762 1.27)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.54)
            (xy 0.762 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "+12V_1_1"
        (pin power_in line (at 0 0 90) (length 0) hide
          (name "+12V")
          (number "1")
        )
      )
    )
    (symbol "power:+5V" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -3.81 0))
      (property "Value" "+5V" (at 0 3.556 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"+5V\"" (at 0 0 0))
      (symbol "+5V_0_1"
        (polyline
          (pts
            (xy -0.762 1.27)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.54)
            (xy 0.762 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "+5V_1_1"
        (pin power_in line (at 0 0 90) (length 0) hide
          (name "+5V")
          (number "1")
        )
      )
    )
    (symbol "power:GND" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -6.35 0))
      (property "Value" "GND" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"GND\" , ground" (at 0 0 0))
      (symbol "GND_0_1"
        (polyline
          (pts
            (xy 0 0)
            (xy 0 -1.27)
            (xy 1.27 -1.27)
            (xy 0 -2.54)
            (xy -1.27 -1.27)
            (xy 0 -1.27)
          )
          (fill (type none))
        )
      )
      (symbol "GND_1_1"
        (pin power_in line (at 0 0 270) (length 0) hide
          (name "GND")
          (number "1")
        )
      )
    )
  )
  (no_connect (at 200.66 54.61))
  (no_connect (at 200.66 59.69))
  (no_connect (at 200.66 52.07))
  (no_connect (at 200.66 62.23))
  (wire (pts (xy 50.8 119.38) (xy 58.42 119.38)))
  (wire (pts (xy 193.04 44.45) (xy 200.66 44.45)))
  (wire (pts (xy 40.64 175.26) (xy 50.8 175.26)))
  (wire (pts (xy 236.22 49.53) (xy 250.19 49.53)))
  (wire (pts (xy 241.3 67.31) (xy 241.3 76.2)))
  (wire (pts (xy 81.28 39.37) (xy 81.28 29.21)))
  (wire (pts (xy 236.22 52.07) (xy 250.19 52.07)))
  (wire (pts (xy 119.38 99.06) (xy 133.35 99.06)))
  (wire (pts (xy 267.97 44.45) (xy 267.97 49.53)))
  (wire (pts (xy 236.22 36.83) (xy 247.65 36.83)))
  (wire (pts (xy 187.96 39.37) (xy 187.96 40.64)))
  (wire (pts (xy 95.25 45.72) (xy 107.95 45.72)))
  (wire (pts (xy 102.87 43.18) (xy 102.87 54.61)))
  (wire (pts (xy 200.66 39.37) (xy 187.96 39.37)))
  (wire (pts (xy 46.99 180.34) (xy 46.99 185.42)))
  (wire (pts (xy 193.04 46.99) (xy 200.66 46.99)))
  (wire (pts (xy 267.97 26.67) (xy 267.97 36.83)))
  (wire (pts (xy 40.64 177.8) (xy 58.42 177.8)))
  (wire (pts (xy 52.07 121.92) (xy 58.42 121.92)))
  (wire (pts (xy 58.42 177.8) (xy 58.42 171.45)))
  (wire (pts (xy 236.22 46.99) (xy 250.19 46.99)))
  (wire (pts (xy 50.8 116.84) (xy 58.42 116.84)))
  (wire (pts (xy 40.64 153.67) (xy 46.99 153.67)))
  (wire (pts (xy 40.64 151.13) (xy 57.15 151.13)))
  (wire (pts (xy 95.25 43.18) (xy 102.87 43.18)))
  (wire (pts (xy 52.07 124.46) (xy 58.42 124.46)))
  (wire (pts (xy 236.22 67.31) (xy 241.3 67.31)))
  (wire (pts (xy 68.58 39.37) (xy 81.28 39.37)))
  (wire (pts (xy 95.25 40.64) (xy 116.84 40.64)))
  (wire (pts (xy 46.99 153.67) (xy 46.99 157.48)))
  (wire (pts (xy 241.3 34.29) (xy 241.3 26.67)))
  (wire (pts (xy 133.35 99.06) (xy 133.35 132.08)))
  (wire (pts (xy 57.15 151.13) (xy 57.15 143.51)))
  (wire (pts (xy 119.38 93.98) (xy 132.08 93.98)))
  (wire (pts (xy 236.22 34.29) (xy 241.3 34.29)))
  (wire (pts (xy 132.08 93.98) (xy 132.08 81.28)))
  (wire (pts (xy 40.64 148.59) (xy 50.8 148.59)))
  (wire (pts (xy 116.84 40.64) (xy 116.84 33.02)))
  (wire (pts (xy 45.72 41.91) (xy 46.99 41.91)))
  (wire (pts (xy 247.65 36.83) (xy 247.65 26.67)))
  (wire (pts (xy 45.72 39.37) (xy 58.42 39.37)))
  (wire (pts (xy 107.95 45.72) (xy 107.95 33.02)))
  (wire (pts (xy 46.99 41.91) (xy 46.99 50.8)))
  (wire (pts (xy 40.64 180.34) (xy 46.99 180.34)))
  (wire (pts (xy 236.22 54.61) (xy 250.19 54.61)))
  (rectangle (start 27.94 17.78) (end 123.19 67.31)
    (fill (type none))
  )
  (label "DIR" (at 193.04 44.45 0) (fields_autoplaced))
  (label "STEP" (at 52.07 124.46 0) (fields_autoplaced))
  (label "HALL" (at 50.8 116.84 0) (fields_autoplaced))
  (label "HALL" (at 50.8 175.26 180) (fields_autoplaced))
  (label "SERVO" (at 50.8 119.38 0) (fields_autoplaced))
  (label "STEP" (at 193.04 46.99 0) (fields_autoplaced))
  (label "DIR" (at 52.07 121.92 0) (fields_autoplaced))
  (label "SERVO" (at 50.8 148.59 180) (fields_autoplaced))
  (symbol (lib_id "ABX00012:ABX00012") (at 88.9 106.68 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 88.9 82.55 0))
    (property "Value" "Portenta_C33" (at 88.9 85.09 0))
    (property "Footprint" "ABX00012:ARDUINO_ABX00012" (at 88.9 106.68 0))
    (property "Datasheet" "" (at 88.9 106.68 0))
    (property "MF" "Arduino" (at 88.9 106.68 0))
    (property "MAXIMUM_PACKAGE_HEIGHT" "" (at 88.9 106.68 0))
    (property "Package" "None" (at 88.9 106.68 0))
    (property "Price" "None" (at 88.9 106.68 0))
    (property "Check_prices" "https://www.snapeda.com/parts/Arduino%20MKR%20ZERO/Arduino/view-part/?ref=eda" (at 88.9 106.68 0))
    (property "STANDARD" "Manufacturer Recommendations" (at 88.9 106.68 0))
    (property "PARTREV" "5" (at 88.9 106.68 0))
    (property "SnapEDA_Link" "https://www.snapeda.com/parts/Arduino%20MKR%20ZERO/Arduino/view-part/?ref=snap" (at 88.9 106.68 0))
    (property "MP" "Arduino MKR ZERO" (at 88.9 106.68 0))
    (property "Description" "\nI2S bus & SD for sound, music & digital audio data\n" (at 88.9 106.68 0))
    (property "Availability" "Not in stock" (at 88.9 106.68 0))
    (property "MANUFACTURER" "Arduino" (at 88.9 106.68 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "20")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "U1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 102.87 54.61 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR03" (at 102.87 60.96 0))
    (property "Value" "GND" (at 102.87 59.69 0))
    (property "Footprint" "" (at 102.87 54.61 0))
    (property "Datasheet" "" (at 102.87 54.61 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR03") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 116.84 33.02 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR05" (at 116.84 36.83 0))
    (property "Value" "+5V" (at 116.84 27.94 0))
    (property "Footprint" "" (at 116.84 33.02 0))
    (property "Datasheet" "" (at 116.84 33.02 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR05") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x03_Pin") (at 35.56 151.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J1" (at 36.195 143.51 0))
    (property "Value" "SERVO" (at 36.195 146.05 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x03_P2.54mm_Vertical" (at 35.56 151.13 0))
    (property "Datasheet" "~" (at 35.56 151.13 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "J1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 46.99 157.48 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR015" (at 46.99 163.83 0))
    (property "Value" "GND" (at 46.99 162.56 0))
    (property "Footprint" "" (at 46.99 157.48 0))
    (property "Datasheet" "" (at 46.99 157.48 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR015") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 132.08 81.28 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR06" (at 132.08 85.09 0))
    (property "Value" "+5V" (at 132.08 76.2 0))
    (property "Footprint" "" (at 132.08 81.28 0))
    (property "Datasheet" "" (at 132.08 81.28 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR06") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 46.99 50.8 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR01" (at 46.99 57.15 0))
    (property "Value" "GND" (at 46.99 55.88 0))
    (property "Footprint" "" (at 46.99 50.8 0))
    (property "Datasheet" "" (at 46.99 50.8 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR01") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "TMC2208_SILENTSTEPSTICK:TMC2208_SILENTSTEPSTICK") (at 218.44 49.53 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U2" (at 218.44 26.67 0))
    (property "Value" "TMC2208" (at 218.44 29.21 0))
    (property "Footprint" "TMC2208_SILENTSTEPSTICK:MODULE_TMC2208_SILENTSTEPSTICK" (at 223.52 44.45 0))
    (property "Datasheet" "" (at 218.44 49.53 0))
    (property "MF" "Trinamic Motion" (at 218.44 49.53 0))
    (property "Description" "\nTMC2208 Motor Controller/Driver, Stepper Power Management Evaluation Board\n" (at 218.44 44.45 0))
    (property "Package" "None" (at 218.44 49.53 0))
    (property "Price" "None" (at 218.44 49.53 0))
    (property "Check_prices" "https://www.snapeda.com/parts/TMC2208%20SILENTSTEPSTICK/Trinamic+Motion+Control+GmbH/view-part/?ref=eda" (at 218.44 44.45 0))
    (property "SnapEDA_Link" "https://www.snapeda.com/parts/TMC2208%20SILENTSTEPSTICK/Trinamic+Motion+Control+GmbH/view-part/?ref=snap" (at 218.44 44.45 0))
    (property "MP" "TMC2208 SILENTSTEPSTICK" (at 218.44 44.45 0))
    (property "Purchase-URL" "https://pricing.snapeda.com/search?q=TMC2208 SILENTSTEPSTICK&ref=eda" (at 218.44 44.45 0))
    (property "Availability" "In Stock" (at 218.44 49.53 0))
    (property "MANUFACTURER" "Trinamic Motion" (at 218.44 49.53 0))
    (pin "JP1_1")
    (pin "JP1_2")
    (pin "JP1_4")
    (pin "JP1_5")
    (pin "JP1_6")
    (pin "JP1_7")
    (pin "JP1_8")
    (pin "JP2_1")
    (pin "JP2_2")
    (pin "JP2_3")
    (pin "JP2_4")
    (pin "JP2_5")
    (pin "JP2_6")
    (pin "JP2_7")
    (pin "JP2_8")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "U2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 227.33 114.3 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H2" (at 229.87 113.03 0))
    (property "Value" "MountingHole" (at 229.87 115.57 0))
    (property "Footprint" "MountingHole:MountingHole_3.2mm_M3_ISO14580" (at 227.33 114.3 0))
    (property "Datasheet" "~" (at 227.33 114.3 0))
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "H2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 267.97 49.53 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR012" (at 267.97 55.88 0))
    (property "Value" "GND" (at 267.97 54.61 0))
    (property "Footprint" "" (at 267.97 49.53 0))
    (property "Datasheet" "" (at 267.97 49.53 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR012") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+12V") (at 81.28 29.21 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR02" (at 81.28 33.02 0))
    (property "Value" "+12V" (at 81.28 24.13 0))
    (property "Footprint" "" (at 81.28 29.21 0))
    (property "Datasheet" "" (at 81.28 29.21 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR02") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 58.42 171.45 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR014" (at 58.42 175.26 0))
    (property "Value" "+5V" (at 58.42 166.37 0))
    (property "Footprint" "" (at 58.42 171.45 0))
    (property "Datasheet" "" (at 58.42 171.45 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR014") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Screw_Terminal_01x02") (at 40.64 39.37 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J3" (at 40.64 33.02 0))
    (property "Value" "Screw_Terminal_01x02" (at 40.64 35.56 0))
    (property "Footprint" "TerminalBlock_Phoenix:TerminalBlock_Phoenix_MKDS-1,5-2-5.08_1x02_P5.08mm_Horizontal" (at 40.64 39.37 0))
    (property "Datasheet" "~" (at 40.64 39.37 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "J3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 46.99 185.42 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR016" (at 46.99 191.77 0))
    (property "Value" "GND" (at 46.99 190.5 0))
    (property "Footprint" "" (at 46.99 185.42 0))
    (property "Datasheet" "" (at 46.99 185.42 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR016") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 227.33 124.46 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H4" (at 229.87 123.19 0))
    (property "Value" "MountingHole" (at 229.87 125.73 0))
    (property "Footprint" "MountingHole:MountingHole_3.2mm_M3_ISO14580" (at 227.33 124.46 0))
    (property "Datasheet" "~" (at 227.33 124.46 0))
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "H4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 187.96 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR07" (at 187.96 46.99 0))
    (property "Value" "GND" (at 187.96 45.72 0))
    (property "Footprint" "" (at 187.96 40.64 0))
    (property "Datasheet" "" (at 187.96 40.64 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR07") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x04_Socket") (at 90.17 43.18 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J4" (at 90.805 35.56 0))
    (property "Value" "HW-613" (at 90.805 38.1 0))
    (property "Footprint" "Connector_PinSocket_2.54mm:PinSocket_1x04_P2.54mm_Vertical" (at 90.17 43.18 0))
    (property "Datasheet" "~" (at 90.17 43.18 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "J4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 227.33 119.38 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H3" (at 229.87 118.11 0))
    (property "Value" "MountingHole" (at 229.87 120.65 0))
    (property "Footprint" "MountingHole:MountingHole_3.2mm_M3_ISO14580" (at 227.33 119.38 0))
    (property "Datasheet" "~" (at 227.33 119.38 0))
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "H3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 133.35 132.08 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR017" (at 133.35 138.43 0))
    (property "Value" "GND" (at 133.35 137.16 0))
    (property "Footprint" "" (at 133.35 132.08 0))
    (property "Datasheet" "" (at 133.35 132.08 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR017") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+12V") (at 107.95 33.02 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR04" (at 107.95 36.83 0))
    (property "Value" "+12V" (at 107.95 27.94 0))
    (property "Footprint" "" (at 107.95 33.02 0))
    (property "Datasheet" "" (at 107.95 33.02 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR04") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+12V") (at 247.65 26.67 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR010" (at 247.65 30.48 0))
    (property "Value" "+12V" (at 247.65 21.59 0))
    (property "Footprint" "" (at 247.65 26.67 0))
    (property "Datasheet" "" (at 247.65 26.67 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR010") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+12V") (at 267.97 26.67 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR011" (at 267.97 30.48 0))
    (property "Value" "+12V" (at 267.97 21.59 0))
    (property "Footprint" "" (at 267.97 26.67 0))
    (property "Datasheet" "" (at 267.97 26.67 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR011") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x04_Pin") (at 255.27 52.07 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J5" (at 254.635 59.69 0))
    (property "Value" "Conn_01x04_Pin" (at 254.635 57.15 0))
    (property "Footprint" "Connector_JST:JST_XH_B4B-XH-A_1x04_P2.50mm_Vertical" (at 255.27 52.07 0))
    (property "Datasheet" "~" (at 255.27 52.07 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "J5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 241.3 76.2 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR09" (at 241.3 82.55 0))
    (property "Value" "GND" (at 241.3 81.28 0))
    (property "Footprint" "" (at 241.3 76.2 0))
    (property "Datasheet" "" (at 241.3 76.2 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR09") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 241.3 26.67 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR08" (at 241.3 30.48 0))
    (property "Value" "+5V" (at 241.3 21.59 0))
    (property "Footprint" "" (at 241.3 26.67 0))
    (property "Datasheet" "" (at 241.3 26.67 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR08") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Switch:SW_SPST") (at 63.5 39.37 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "SW1" (at 63.5 33.02 0))
    (property "Value" "SW_SPST" (at 63.5 35.56 0))
    (property "Footprint" "Button_Switch_THT:KCD1-101" (at 63.5 39.37 0))
    (property "Datasheet" "~" (at 63.5 39.37 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "SW1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 57.15 143.51 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR013" (at 57.15 147.32 0))
    (property "Value" "+5V" (at 57.15 138.43 0))
    (property "Footprint" "" (at 57.15 143.51 0))
    (property "Datasheet" "" (at 57.15 143.51 0))
    (pin "1")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "#PWR013") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 267.97 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C1" (at 271.78 38.481 0))
    (property "Value" "100µF" (at 271.78 41.021 0))
    (property "Footprint" "Capacitor_THT:CP_Radial_D8.0mm_P3.50mm" (at 268.9352 44.45 0))
    (property "Datasheet" "~" (at 267.97 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "C1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 227.33 109.22 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H1" (at 229.87 107.95 0))
    (property "Value" "MountingHole" (at 229.87 110.49 0))
    (property "Footprint" "MountingHole:MountingHole_3.2mm_M3_ISO14580" (at 227.33 109.22 0))
    (property "Datasheet" "~" (at 227.33 109.22 0))
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "H1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x03_Pin") (at 35.56 177.8 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J2" (at 36.195 170.18 0))
    (property "Value" "HALL" (at 36.195 172.72 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x03_P2.54mm_Vertical" (at 35.56 177.8 0))
    (property "Datasheet" "~" (at 35.56 177.8 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (instances
      (project "Audio_Classifier_Bin"
        (path
          (reference "J2") (unit 1)
        )
      )
    )
  )
  (sheet_instances
    (path (page "1"))
  )
)
