(kicad_pcb (version 20221018) (generator pcbnew)
  (general
    (thickness 1.6)
  )
  (paper "A4")
  (layers
    (0 "F.Cu" signal)
    (31 "B.Cu" signal)
    (32 "B.Adhes" user "B.Adhesive")
    (33 "F.Adhes" user "F.Adhesive")
    (34 "B.Paste" user)
    (35 "F.Paste" user)
    (36 "B.SilkS" user "B.Silkscreen")
    (37 "F.SilkS" user "F.Silkscreen")
    (38 "B.Mask" user)
    (39 "F.Mask" user)
    (40 "Dwgs.User" user "User.Drawings")
    (41 "Cmts.User" user "User.Comments")
    (42 "Eco1.User" user "User.Eco1")
    (43 "Eco2.User" user "User.Eco2")
    (44 "Edge.Cuts" user)
    (45 "Margin" user)
    (46 "B.CrtYd" user "B.Courtyard")
    (47 "F.CrtYd" user "F.Courtyard")
    (48 "B.Fab" user)
    (49 "F.Fab" user)
    (50 "User.1" user)
    (51 "User.2" user)
    (52 "User.3" user)
    (53 "User.4" user)
    (54 "User.5" user)
    (55 "User.6" user)
    (56 "User.7" user)
    (57 "User.8" user)
    (58 "User.9" user)
  )
  (setup
    (stackup
      (layer "F.SilkS" (type "Top Silk Screen"))
      (layer "F.Paste" (type "Top Solder Paste"))
      (layer "F.Mask" (type "Top Solder Mask") (thickness 0.01))
      (layer "F.Cu" (type "copper") (thickness 0.035))
      (layer "dielectric 1" (type "core") (thickness 1.51) (material "FR4") (epsilon_r 4.5) (loss_tangent 0.02))
      (layer "B.Cu" (type "copper") (thickness 0.035))
      (layer "B.Mask" (type "Bottom Solder Mask") (thickness 0.01))
      (layer "B.Paste" (type "Bottom Solder Paste"))
      (layer "B.SilkS" (type "Bottom Silk Screen"))
      (copper_finish "None")
      (dielectric_constraints no)
    )
    (pad_to_mask_clearance 0)
    (pcbplotparams
      (layerselection 0x00010fc_ffffffff)
      (plot_on_all_layers_selection 0x0000000_00000000)
      (disableapertmacros false)
      (usegerberextensions false)
      (usegerberattributes true)
      (usegerberadvancedattributes true)
      (creategerberjobfile true)
      (dashed_line_dash_ratio 12.000000)
      (dashed_line_gap_ratio 3.000000)
      (svgprecision 4)
      (plotframeref false)
      (viasonmask false)
      (mode 1)
      (useauxorigin false)
      (hpglpennumber 1)
      (hpglpenspeed 20)
      (hpglpendiameter 15.000000)
      (dxfpolygonmode true)
      (dxfimperialunits true)
      (dxfusepcbnewfont true)
      (psnegative false)
      (psa4output false)
      (plotreference true)
      (plotvalue true)
      (plotinvisibletext false)
      (sketchpadsonfab false)
      (subtractmaskfromsilk false)
      (outputformat 1)
      (mirror false)
      (drillshape 0)
      (scaleselection 1)
      (outputdirectory "")
    )
  )
  (net 0 "")
  (net 1 "Net-(C2-Pad1)")
  (net 2 "GND")
  (net 3 "+5V")
  (net 4 "Net-(J3-Pin_3)")
  (net 5 "Net-(#FLG01-pwr)")
  (net 6 "Net-(C14-Pad1)")
  (net 7 "Net-(J7-~{DIOR})")
  (net 8 "unconnected-(CPU1-~{BG}-Pad2)")
  (net 9 "CLK")
  (net 10 "~{RESET}")
  (net 11 "unconnected-(CPU1-~{RMC}-Pad9)")
  (net 12 "unconnected-(CPU1-FC0-Pad10)")
  (net 13 "unconnected-(CPU1-FC1-Pad11)")
  (net 14 "FC2")
  (net 15 "unconnected-(CPU1-SIZE0-Pad13)")
  (net 16 "unconnected-(CPU1-SIZE1-Pad14)")
  (net 17 "~{DSACK0}")
  (net 18 "R5 VCC")
  (net 19 "Net-(CPU1-~{AS})")
  (net 20 "Net-(CPU1-~{DS})")
  (net 21 "Net-(CPU1-R{slash}~{W})")
  (net 22 "D31")
  (net 23 "D30")
  (net 24 "D29")
  (net 25 "D28")
  (net 26 "D27")
  (net 27 "D26")
  (net 28 "D25")
  (net 29 "D24")
  (net 30 "Net-(CPU1-~{IPL0})")
  (net 31 "A2")
  (net 32 "A3")
  (net 33 "A4")
  (net 34 "A5")
  (net 35 "A6")
  (net 36 "A7")
  (net 37 "A8")
  (net 38 "A9")
  (net 39 "A10")
  (net 40 "A11")
  (net 41 "A12")
  (net 42 "A13")
  (net 43 "A14")
  (net 44 "A15")
  (net 45 "A16")
  (net 46 "A17")
  (net 47 "A18")
  (net 48 "Net-(CPU1-A19)")
  (net 49 "Net-(CPU1-A20)")
  (net 50 "unconnected-(CPU1-A21-Pad95)")
  (net 51 "unconnected-(CPU1-A22-Pad96)")
  (net 52 "unconnected-(CPU1-A23-Pad97)")
  (net 53 "A1")
  (net 54 "A0")
  (net 55 "Net-(D3-K)")
  (net 56 "Net-(D2-A)")
  (net 57 "Net-(D3-A)")
  (net 58 "Net-(D4-A)")
  (net 59 "Net-(D5-A)")
  (net 60 "Net-(D6-K)")
  (net 61 "Net-(D6-A)")
  (net 62 "Net-(D5-K)")
  (net 63 "Net-(J1-Pin_5)")
  (net 64 "Net-(J1-Pin_3)")
  (net 65 "R2 VCC")
  (net 66 "R4 VCC")
  (net 67 "Net-(J1-Pin_7)")
  (net 68 "Net-(J3-Pin_1)")
  (net 69 "R6 VCC")
  (net 70 "Net-(J5-Pin_4)")
  (net 71 "unconnected-(J4-Pin_2-Pad2)")
  (net 72 "unconnected-(J7-D8-Pad4)")
  (net 73 "unconnected-(J7-D9-Pad6)")
  (net 74 "unconnected-(J7-D10-Pad8)")
  (net 75 "unconnected-(J7-D11-Pad10)")
  (net 76 "unconnected-(J7-D12-Pad12)")
  (net 77 "unconnected-(J7-D13-Pad14)")
  (net 78 "unconnected-(J7-D14-Pad16)")
  (net 79 "unconnected-(J7-D15-Pad18)")
  (net 80 "~{WR}")
  (net 81 "unconnected-(J7-IORDY-Pad27)")
  (net 82 "unconnected-(J7-CSEL-Pad28)")
  (net 83 "unconnected-(J7-INTRQ-Pad31)")
  (net 84 "unconnected-(J7-~{IOCS16}-Pad32)")
  (net 85 "unconnected-(J7-PDIAG-Pad34)")
  (net 86 "~{CS_IDE}")
  (net 87 "unconnected-(J7-~{ACTIVE}-Pad39)")
  (net 88 "unconnected-(J7-~{TYPE}-Pad44)")
  (net 89 "Net-(J5-Pin_3)")
  (net 90 "R3 VCC")
  (net 91 "~{RD}")
  (net 92 "R7 VCC")
  (net 93 "RESET")
  (net 94 "UART_INT")
  (net 95 "unconnected-(J5-Pin_5-Pad5)")
  (net 96 "~{CS_ROM}")
  (net 97 "~{CS_RAM}")
  (net 98 "~{CS_UART}")
  (net 99 "unconnected-(U2-~{Y3}-Pad9)")
  (net 100 "unconnected-(U2-~{Y2}-Pad10)")
  (net 101 "Net-(J6-Pin_4)")
  (net 102 "Net-(J6-Pin_6)")
  (net 103 "Net-(U7-~{RI})")
  (net 104 "Net-(U3-~{MR})")
  (net 105 "unconnected-(U3-Q3-Pad6)")
  (net 106 "unconnected-(U3-Q4-Pad10)")
  (net 107 "unconnected-(U3-Q5-Pad11)")
  (net 108 "unconnected-(U3-Q6-Pad12)")
  (net 109 "unconnected-(U3-Q7-Pad13)")
  (net 110 "Net-(U7-RCLK)")
  (net 111 "Net-(U7-XIN)")
  (net 112 "unconnected-(X1-NC-Pad1)")
  (net 113 "Net-(U7-XOUT)")
  (net 114 "unconnected-(U7-DDIS-Pad23)")
  (net 115 "unconnected-(U7-~{TXRDY}-Pad24)")
  (net 116 "unconnected-(U7-~{RXRDY}-Pad29)")
  (footprint "LED_THT:LED_D5.0mm" (layer "F.Cu")
    (at 147.3195 50.81 -90)
    (descr "LED, diameter 5.0mm, 2 pins, http://cdn-reichelt.de/documents/datenblatt/A500/LL-504BC2E-009.pdf")
    (tags "LED diameter 5.0mm 2 pins")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Light emitting diode")
    (property "ki_keywords" "LED diode")
    (attr through_hole)
    (fp_text reference "D2" (at 2.53 -3.96 90) (layer "F.SilkS"))
    (fp_text value "LED (halt)" (at 1.27 3.96 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.25 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 18 "R5 VCC") (pinfunction "K") (pintype "passive"))
    (pad "2" thru_hole circle (at 2.54 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 56 "Net-(D2-A)") (pinfunction "A") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/LED_THT.3dshapes/LED_D5.0mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 95.26 78.88 -90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C5" (at -2.68 -1.26 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:CP_Radial_D4.0mm_P2.00mm" (layer "F.Cu")
    (at 104.14 68.58 -90)
    (descr "CP, Radial series, Radial, pin pitch=2.00mm, , diameter=4mm, Electrolytic Capacitor")
    (tags "CP Radial series Radial pin pitch 2.00mm  diameter 4mm Electrolytic Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Polarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C2" (at 1 -3.25 -90) (layer "F.SilkS"))
    (fp_text value "10uF" (at 1 3.25 -90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1 0 -90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.2 1.2) (drill 0.6) (layers "*.Cu" "*.Mask")
      (net 1 "Net-(C2-Pad1)") (pintype "passive"))
    (pad "2" thru_hole circle (at 2 0 270) (size 1.2 1.2) (drill 0.6) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/CP_Radial_D4.0mm_P2.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 134.62 63.5 90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R5" (at -1.905 1.27 90) (layer "F.SilkS"))
    (fp_text value "3K3" (at 12.7 -15.41 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 61 "Net-(D6-A)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 71.12 111.76 90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C7" (at 2.5 -2.5 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 123.444 78.78 -90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C3" (at -2.68 0 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Array_SIP7" (layer "F.Cu")
    (at 83.82 53.34)
    (descr "7-pin Resistor SIP pack")
    (tags "R")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "6 resistor network, star topology, bussed resistors, small symbol")
    (property "ki_keywords" "R network star-topology")
    (attr through_hole)
    (fp_text reference "RN1" (at 0.635 2.54) (layer "F.SilkS"))
    (fp_text value "6x 10K" (at 8.89 2.4) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 0) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "common") (pintype "passive"))
    (pad "2" thru_hole oval (at 2.54 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pinfunction "R1") (pintype "passive"))
    (pad "3" thru_hole oval (at 5.08 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 90 "R3 VCC") (pinfunction "R2") (pintype "passive"))
    (pad "4" thru_hole oval (at 7.62 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 10 "~{RESET}") (pinfunction "R3") (pintype "passive"))
    (pad "5" thru_hole oval (at 10.16 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 18 "R5 VCC") (pinfunction "R4") (pintype "passive"))
    (pad "6" thru_hole oval (at 12.7 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 69 "R6 VCC") (pinfunction "R5") (pintype "passive"))
    (pad "7" thru_hole oval (at 15.24 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 92 "R7 VCC") (pinfunction "R6") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Array_SIP7.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Diode_THT:D_DO-41_SOD81_P10.16mm_Horizontal" (layer "F.Cu")
    (at 152.4 66.04 90)
    (descr "Diode, DO-41_SOD81 series, Axial, Horizontal, pin pitch=10.16mm, , length*diameter=5.2*2.7mm^2, , http://www.diodes.com/_files/packages/DO-41%20(Plastic).pdf")
    (tags "Diode DO-41_SOD81 series Axial Horizontal pin pitch 10.16mm  length 5.2mm diameter 2.7mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "Sim.Device" "D")
    (property "Sim.Pins" "1=K 2=A")
    (property "ki_description" "50V 1A General Purpose Rectifier Diode, DO-41")
    (property "ki_keywords" "diode")
    (attr through_hole)
    (fp_text reference "D3" (at 2.54 2.54 90) (layer "F.SilkS"))
    (fp_text value "1N4001" (at 5.08 2.47 90) (layer "F.Fab"))
    (fp_text user "K" (at 0 -2.1 90) (layer "F.SilkS") hide)
    (fp_text user "K" (at 0 -2.1 90) (layer "F.Fab") hide)
    (fp_text user "${REFERENCE}" (at 5.47 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 2.2 2.2) (drill 1.1) (layers "*.Cu" "*.Mask")
      (net 55 "Net-(D3-K)") (pinfunction "K") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 2.2 2.2) (drill 1.1) (layers "*.Cu" "*.Mask")
      (net 57 "Net-(D3-A)") (pinfunction "A") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Diode_THT.3dshapes/D_DO-41_SOD81_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 81.36 96.52)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C4" (at 2.5 -2.5) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 139.7 139.7 90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C16" (at 0 2.54 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 109.22 55.88 -90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C14" (at 7.366 -2.032 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 6 "Net-(C14-Pad1)") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 114.3 53.34 -90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R4" (at 9.652 -1.778 90) (layer "F.SilkS"))
    (fp_text value "100K" (at 5.08 2.37 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 6 "Net-(C14-Pad1)") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 103 "Net-(U7-~{RI})") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 129.54 63.5 90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R3" (at -1.905 1.27 90) (layer "F.SilkS"))
    (fp_text value "3K3" (at 5.08 2.37 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 58 "Net-(D4-A)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 124.46 63.5 90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R2" (at -0.254 2.032 90) (layer "F.SilkS"))
    (fp_text value "3K3" (at 5.08 2.54 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 56 "Net-(D2-A)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical" (layer "F.Cu")
    (at 106.68 48.26 90)
    (descr "Through hole straight pin header, 1x06, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x06 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J6" (at 0 -2.33 90) (layer "F.SilkS"))
    (fp_text value "SD card adapter" (at 2.54 15.03 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 6.35) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Pin_2") (pintype "passive"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 89 "Net-(J5-Pin_3)") (pinfunction "Pin_3") (pintype "passive"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 101 "Net-(J6-Pin_4)") (pinfunction "Pin_4") (pintype "passive"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 70 "Net-(J5-Pin_4)") (pinfunction "Pin_5") (pintype "passive"))
    (pad "6" thru_hole oval (at 0 12.7 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 102 "Net-(J6-Pin_6)") (pinfunction "Pin_6") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x06_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_THT:LED_D5.0mm" (layer "F.Cu")
    (at 147.3195 66.05 -90)
    (descr "LED, diameter 5.0mm, 2 pins, http://cdn-reichelt.de/documents/datenblatt/A500/LL-504BC2E-009.pdf")
    (tags "LED diameter 5.0mm 2 pins")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Light emitting diode")
    (property "ki_keywords" "LED diode")
    (attr through_hole)
    (fp_text reference "D5" (at 2.53 -3.96 90) (layer "F.SilkS"))
    (fp_text value "LED (att)" (at 1.27 3.96 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.25 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 62 "Net-(D5-K)") (pinfunction "K") (pintype "passive"))
    (pad "2" thru_hole circle (at 2.54 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 59 "Net-(D5-A)") (pinfunction "A") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/LED_THT.3dshapes/LED_D5.0mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 104.14 63.754 90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R1" (at 1.778 2.286 90) (layer "F.SilkS"))
    (fp_text value "100R" (at 5.08 2.37 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 90 "R3 VCC") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 1 "Net-(C2-Pad1)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 139.7 92.735 180)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "ROM_RAM.kicad_sch")
    (property "Sheetname" "ROM + RAM")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C8" (at -2.54 -1.245) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (layer "F.Cu")
    (at 73.655 86.36 90)
    (descr "14-lead though-hole mounted DIP package, row spacing 7.62 mm (300 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 7.62mm 300mil Socket LongPads")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Hex inverter schmitt trigger")
    (property "ki_keywords" "HCMOS not inverter")
    (attr through_hole)
    (fp_text reference "U1" (at 10.16 0.005 90) (layer "F.SilkS"))
    (fp_text value "74HC14" (at 3.81 17.57 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.54 2.54 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 90 "R3 VCC") (pintype "input"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 93 "RESET") (pintype "output"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 93 "RESET") (pintype "input"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 10 "~{RESET}") (pintype "output"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 6 "Net-(C14-Pad1)") (pintype "input"))
    (pad "6" thru_hole oval (at 0 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 103 "Net-(U7-~{RI})") (pintype "output"))
    (pad "7" thru_hole oval (at 0 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "8" thru_hole oval (at 7.62 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 30 "Net-(CPU1-~{IPL0})") (pintype "output"))
    (pad "9" thru_hole oval (at 7.62 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 94 "UART_INT") (pintype "input"))
    (pad "10" thru_hole oval (at 7.62 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 104 "Net-(U3-~{MR})") (pintype "output"))
    (pad "11" thru_hole oval (at 7.62 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 19 "Net-(CPU1-~{AS})") (pintype "input"))
    (pad "12" thru_hole oval (at 7.62 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 17 "~{DSACK0}") (pintype "output"))
    (pad "13" thru_hole oval (at 7.62 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pintype "input"))
    (pad "14" thru_hole oval (at 7.62 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "VCC") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-14_W7.62mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-28_W15.24mm_Socket_LongPads" (layer "F.Cu")
    (at 124.46 96.48)
    (descr "28-lead though-hole mounted DIP package, row spacing 15.24 mm (600 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 15.24mm 600mil Socket LongPads")
    (property "Sheetfile" "ROM_RAM.kicad_sch")
    (property "Sheetname" "ROM + RAM")
    (attr through_hole)
    (fp_text reference "U5" (at 7.62 -2.33) (layer "F.SilkS"))
    (fp_text value "W27C512-45" (at 7.62 35.35) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 16.51) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 44 "A15") (pinfunction "A15") (pintype "input"))
    (pad "2" thru_hole oval (at 0 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 41 "A12") (pinfunction "A12") (pintype "input"))
    (pad "3" thru_hole oval (at 0 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 36 "A7") (pinfunction "A7") (pintype "input"))
    (pad "4" thru_hole oval (at 0 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 35 "A6") (pinfunction "A6") (pintype "input"))
    (pad "5" thru_hole oval (at 0 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 34 "A5") (pinfunction "A5") (pintype "input"))
    (pad "6" thru_hole oval (at 0 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 33 "A4") (pinfunction "A4") (pintype "input"))
    (pad "7" thru_hole oval (at 0 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 32 "A3") (pinfunction "A3") (pintype "input"))
    (pad "8" thru_hole oval (at 0 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 31 "A2") (pinfunction "A2") (pintype "input"))
    (pad "9" thru_hole oval (at 0 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 53 "A1") (pinfunction "A1") (pintype "input"))
    (pad "10" thru_hole oval (at 0 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 54 "A0") (pinfunction "A0") (pintype "input"))
    (pad "11" thru_hole oval (at 0 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 29 "D24") (pinfunction "D0") (pintype "tri_state"))
    (pad "12" thru_hole oval (at 0 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 28 "D25") (pinfunction "D1") (pintype "tri_state"))
    (pad "13" thru_hole oval (at 0 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 27 "D26") (pinfunction "D2") (pintype "tri_state"))
    (pad "14" thru_hole oval (at 0 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "15" thru_hole oval (at 15.24 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 26 "D27") (pinfunction "D3") (pintype "tri_state"))
    (pad "16" thru_hole oval (at 15.24 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 25 "D28") (pinfunction "D4") (pintype "tri_state"))
    (pad "17" thru_hole oval (at 15.24 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 24 "D29") (pinfunction "D5") (pintype "tri_state"))
    (pad "18" thru_hole oval (at 15.24 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 23 "D30") (pinfunction "D6") (pintype "tri_state"))
    (pad "19" thru_hole oval (at 15.24 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 22 "D31") (pinfunction "D7") (pintype "tri_state"))
    (pad "20" thru_hole oval (at 15.24 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 96 "~{CS_ROM}") (pinfunction "~{CS}") (pintype "input"))
    (pad "21" thru_hole oval (at 15.24 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 39 "A10") (pinfunction "A10") (pintype "input"))
    (pad "22" thru_hole oval (at 15.24 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 91 "~{RD}") (pinfunction "~{OE}") (pintype "input"))
    (pad "23" thru_hole oval (at 15.24 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 40 "A11") (pinfunction "A11") (pintype "input"))
    (pad "24" thru_hole oval (at 15.24 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 38 "A9") (pinfunction "A9") (pintype "input"))
    (pad "25" thru_hole oval (at 15.24 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 37 "A8") (pinfunction "A8") (pintype "input"))
    (pad "26" thru_hole oval (at 15.24 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 42 "A13") (pinfunction "A13") (pintype "input"))
    (pad "27" thru_hole oval (at 15.24 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 43 "A14") (pinfunction "A14") (pintype "input"))
    (pad "28" thru_hole oval (at 15.24 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "VCC") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-28_W15.24mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-32_W15.24mm_Socket_LongPads" (layer "F.Cu")
    (at 99.06 91.43)
    (descr "32-lead though-hole mounted DIP package, row spacing 15.24 mm (600 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 15.24mm 600mil Socket LongPads")
    (property "Sheetfile" "ROM_RAM.kicad_sch")
    (property "Sheetname" "ROM + RAM")
    (property "ki_description" "512K x 8 Low Power CMOS RAM, DIP-32")
    (property "ki_keywords" "RAM SRAM CMOS MEMORY")
    (attr through_hole)
    (fp_text reference "U4" (at 7.62 -2.33) (layer "F.SilkS"))
    (fp_text value "AS6C4008-55PCN" (at 7.62 40.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 19.05) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 47 "A18") (pinfunction "A18") (pintype "input"))
    (pad "2" thru_hole oval (at 0 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 45 "A16") (pinfunction "A16") (pintype "input"))
    (pad "3" thru_hole oval (at 0 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 43 "A14") (pinfunction "A14") (pintype "input"))
    (pad "4" thru_hole oval (at 0 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 41 "A12") (pinfunction "A12") (pintype "input"))
    (pad "5" thru_hole oval (at 0 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 36 "A7") (pinfunction "A7") (pintype "input"))
    (pad "6" thru_hole oval (at 0 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 35 "A6") (pinfunction "A6") (pintype "input"))
    (pad "7" thru_hole oval (at 0 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 34 "A5") (pinfunction "A5") (pintype "input"))
    (pad "8" thru_hole oval (at 0 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 33 "A4") (pinfunction "A4") (pintype "input"))
    (pad "9" thru_hole oval (at 0 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 32 "A3") (pinfunction "A3") (pintype "input"))
    (pad "10" thru_hole oval (at 0 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 31 "A2") (pinfunction "A2") (pintype "input"))
    (pad "11" thru_hole oval (at 0 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 53 "A1") (pinfunction "A1") (pintype "input"))
    (pad "12" thru_hole oval (at 0 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 54 "A0") (pinfunction "A0") (pintype "input"))
    (pad "13" thru_hole oval (at 0 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 29 "D24") (pinfunction "DQ0") (pintype "tri_state"))
    (pad "14" thru_hole oval (at 0 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 28 "D25") (pinfunction "DQ1") (pintype "tri_state"))
    (pad "15" thru_hole oval (at 0 35.56) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 27 "D26") (pinfunction "DQ2") (pintype "tri_state"))
    (pad "16" thru_hole oval (at 0 38.1) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "VSS") (pintype "power_in"))
    (pad "17" thru_hole oval (at 15.24 38.1) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 26 "D27") (pinfunction "DQ3") (pintype "tri_state"))
    (pad "18" thru_hole oval (at 15.24 35.56) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 25 "D28") (pinfunction "DQ4") (pintype "tri_state"))
    (pad "19" thru_hole oval (at 15.24 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 24 "D29") (pinfunction "DQ5") (pintype "tri_state"))
    (pad "20" thru_hole oval (at 15.24 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 23 "D30") (pinfunction "DQ6") (pintype "tri_state"))
    (pad "21" thru_hole oval (at 15.24 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 22 "D31") (pinfunction "DQ7") (pintype "tri_state"))
    (pad "22" thru_hole oval (at 15.24 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 97 "~{CS_RAM}") (pinfunction "CE#") (pintype "input"))
    (pad "23" thru_hole oval (at 15.24 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 39 "A10") (pinfunction "A10") (pintype "input"))
    (pad "24" thru_hole oval (at 15.24 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 91 "~{RD}") (pinfunction "OE#") (pintype "input"))
    (pad "25" thru_hole oval (at 15.24 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 40 "A11") (pinfunction "A11") (pintype "input"))
    (pad "26" thru_hole oval (at 15.24 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 38 "A9") (pinfunction "A9") (pintype "input"))
    (pad "27" thru_hole oval (at 15.24 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 37 "A8") (pinfunction "A8") (pintype "input"))
    (pad "28" thru_hole oval (at 15.24 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 42 "A13") (pinfunction "A13") (pintype "input"))
    (pad "29" thru_hole oval (at 15.24 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 80 "~{WR}") (pinfunction "WE#") (pintype "input"))
    (pad "30" thru_hole oval (at 15.24 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 46 "A17") (pinfunction "A17") (pintype "input"))
    (pad "31" thru_hole oval (at 15.24 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 44 "A15") (pinfunction "A15") (pintype "input"))
    (pad "32" thru_hole oval (at 15.24 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "VCC") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-32_W15.24mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Button_Switch_THT:KSA_Tactile_SPST" (layer "F.Cu")
    (at 80.01 53.34 -90)
    (descr "KSA http://www.ckswitches.com/media/1457/ksa_ksl.pdf")
    (tags "SWITCH SMD KSA SW")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Push button switch, generic, two pins")
    (property "ki_keywords" "switch normally-open pushbutton push-button")
    (attr through_hole)
    (fp_text reference "SW1" (at 5.08 -2 -90) (layer "F.SilkS"))
    (fp_text value "Reset" (at 2.54 10 -90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.54 4 -90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.778 1.778) (drill 1.143) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "1") (pintype "passive"))
    (pad "2" thru_hole circle (at 5.08 0 270) (size 1.778 1.778) (drill 1.143) (layers "*.Cu" "*.Mask")
      (net 90 "R3 VCC") (pinfunction "2") (pintype "passive"))
    (pad "3" thru_hole circle (at 5.08 7.62 270) (size 1.778 1.778) (drill 1.143) (layers "*.Cu" "*.Mask"))
    (pad "4" thru_hole circle (at 2.54 7.62 270) (size 1.778 1.778) (drill 1.143) (layers "*.Cu" "*.Mask"))
    (pad "5" thru_hole circle (at 0 7.62 270) (size 1.778 1.778) (drill 1.143) (layers "*.Cu" "*.Mask"))
    (model "${KICAD6_3DMODEL_DIR}/Button_Switch_THT.3dshapes/KSA_Tactile_SPST.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-16_W7.62mm_Socket_LongPads" (layer "F.Cu")
    (at 99.06 86.36 90)
    (descr "16-lead though-hole mounted DIP package, row spacing 7.62 mm (300 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 7.62mm 300mil Socket LongPads")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (attr through_hole)
    (fp_text reference "U2" (at 10.16 0 90) (layer "F.SilkS"))
    (fp_text value "74HC139" (at 3.81 20.11 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 3.81 8.89 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 19 "Net-(CPU1-~{AS})") (pinfunction "~{E}") (pintype "input"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 48 "Net-(CPU1-A19)") (pinfunction "A0") (pintype "input"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 49 "Net-(CPU1-A20)") (pinfunction "A1") (pintype "input"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 96 "~{CS_ROM}") (pinfunction "~{Y0}") (pintype "output"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 97 "~{CS_RAM}") (pinfunction "~{Y1}") (pintype "output"))
    (pad "6" thru_hole oval (at 0 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 86 "~{CS_IDE}") (pinfunction "~{Y2}") (pintype "output"))
    (pad "7" thru_hole oval (at 0 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 98 "~{CS_UART}") (pinfunction "~{Y3}") (pintype "output"))
    (pad "8" thru_hole oval (at 0 17.78 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "9" thru_hole oval (at 7.62 17.78 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 99 "unconnected-(U2-~{Y3}-Pad9)") (pinfunction "~{Y3}") (pintype "output+no_connect"))
    (pad "10" thru_hole oval (at 7.62 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 100 "unconnected-(U2-~{Y2}-Pad10)") (pinfunction "~{Y2}") (pintype "output+no_connect"))
    (pad "11" thru_hole oval (at 7.62 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 91 "~{RD}") (pinfunction "~{Y1}") (pintype "output"))
    (pad "12" thru_hole oval (at 7.62 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 80 "~{WR}") (pinfunction "~{Y0}") (pintype "output"))
    (pad "13" thru_hole oval (at 7.62 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "A1") (pintype "input"))
    (pad "14" thru_hole oval (at 7.62 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 21 "Net-(CPU1-R{slash}~{W})") (pinfunction "A0") (pintype "input"))
    (pad "15" thru_hole oval (at 7.62 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 20 "Net-(CPU1-~{DS})") (pinfunction "~{E}") (pintype "input"))
    (pad "16" thru_hole oval (at 7.62 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-16_W7.62mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 119.38 124 -90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C15" (at 2.5 -2.5 90) (layer "F.SilkS"))
    (fp_text value "100pF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 7 "Net-(J7-~{DIOR})") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x02_P2.54mm_Vertical" (layer "F.Cu")
    (at 152.4 50.8 180)
    (descr "Through hole straight pin header, 1x02, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x02 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x02, script generated")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J2" (at 2.54 2.54 90) (layer "F.SilkS"))
    (fp_text value "9V DC" (at 0 4.87) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 1.27 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 180) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 57 "Net-(D3-A)") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 0 2.54 180) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "Pin_2") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x02_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:CP_Radial_D8.0mm_P5.00mm" (layer "F.Cu")
    (at 116.84 68.58 -90)
    (descr "CP, Radial series, Radial, pin pitch=5.00mm, , diameter=8mm, Electrolytic Capacitor")
    (tags "CP Radial series Radial pin pitch 5.00mm  diameter 8mm Electrolytic Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Polarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C13" (at 2.5 -5.25 90) (layer "F.SilkS"))
    (fp_text value "470uF *)" (at 2.5 5.25 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/CP_Radial_D8.0mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 119.38 53.34 -90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R6" (at 10.16 -1.905 -270) (layer "F.SilkS"))
    (fp_text value "3K3" (at 5.08 2.37 -270) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 -270) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 59 "Net-(D5-A)") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Crystal:Crystal_HC18-U_Vertical" (layer "F.Cu")
    (at 152.474 137.414 180)
    (descr "Crystal THT HC-18/U, http://5hertz.com/pdfs/04404_D.pdf")
    (tags "THT crystalHC-18/U")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Two pin crystal")
    (property "ki_keywords" "quartz ceramic resonator oscillator")
    (attr through_hole)
    (fp_text reference "Y1" (at -3.228 3.556) (layer "F.SilkS"))
    (fp_text value "11.0592MHz" (at 2.45 3.525) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.45 0) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 180) (size 1.5 1.5) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 111 "Net-(U7-XIN)") (pinfunction "1") (pintype "passive"))
    (pad "2" thru_hole circle (at 4.9 0 180) (size 1.5 1.5) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 113 "Net-(U7-XOUT)") (pinfunction "2") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Crystal.3dshapes/Crystal_HC18-U_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical" (layer "F.Cu")
    (at 83.82 48.26 90)
    (descr "Through hole straight pin header, 1x06, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x06 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J5" (at 0 -2.33 90) (layer "F.SilkS"))
    (fp_text value "RTC PCF8563" (at 0 15.03 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 6.35) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "Pin_2") (pintype "passive"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 89 "Net-(J5-Pin_3)") (pinfunction "Pin_3") (pintype "passive"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 70 "Net-(J5-Pin_4)") (pinfunction "Pin_4") (pintype "passive"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 95 "unconnected-(J5-Pin_5-Pad5)") (pinfunction "Pin_5") (pintype "passive+no_connect"))
    (pad "6" thru_hole oval (at 0 12.7 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 69 "R6 VCC") (pinfunction "Pin_6") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x06_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 69.86 78.88 -90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C1" (at 7.48 -1.26 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 157.48 60.88 90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C12" (at 2.5 -2.5 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 4 "Net-(J3-Pin_3)") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_QFP:PQFP-100_14x20mm_P0.65mm" (layer "F.Cu")
    (at 83.82 114.3)
    (descr "PQFP, 100 Pin (http://www.microsemi.com/index.php?option=com_docman&task=doc_download&gid=131095), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "PQFP QFP")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (attr smd)
    (fp_text reference "MC68EC020" (at -1.27 12.7) (layer "F.SilkS"))
    (fp_text value "MC68EC020" (at 0.762 13.208) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect (at -8.125 -9.425) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{BR}") (pintype "input"))
    (pad "2" smd roundrect (at -8.125 -8.775) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 8 "unconnected-(CPU1-~{BG}-Pad2)") (pinfunction "~{BG}") (pintype "output+no_connect"))
    (pad "3" smd roundrect (at -8.125 -8.125) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "4" smd roundrect (at -8.125 -7.475) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "5" smd roundrect (at -8.125 -6.825) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 9 "CLK") (pinfunction "CLK") (pintype "input"))
    (pad "6" smd roundrect (at -8.125 -6.175) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 10 "~{RESET}") (pinfunction "~{RESET}") (pintype "bidirectional"))
    (pad "7" smd roundrect (at -8.125 -5.525) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "8" smd roundrect (at -8.125 -4.875) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "9" smd roundrect (at -8.125 -4.225) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 11 "unconnected-(CPU1-~{RMC}-Pad9)") (pinfunction "~{RMC}") (pintype "output+no_connect"))
    (pad "10" smd roundrect (at -8.125 -3.575) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 12 "unconnected-(CPU1-FC0-Pad10)") (pinfunction "FC0") (pintype "output+no_connect"))
    (pad "11" smd roundrect (at -8.125 -2.925) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 13 "unconnected-(CPU1-FC1-Pad11)") (pinfunction "FC1") (pintype "output+no_connect"))
    (pad "12" smd roundrect (at -8.125 -2.275) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 14 "FC2") (pinfunction "FC2") (pintype "output"))
    (pad "13" smd roundrect (at -8.125 -1.625) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 15 "unconnected-(CPU1-SIZE0-Pad13)") (pinfunction "SIZE0") (pintype "output+no_connect"))
    (pad "14" smd roundrect (at -8.125 -0.975) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 16 "unconnected-(CPU1-SIZE1-Pad14)") (pinfunction "SIZE1") (pintype "output+no_connect"))
    (pad "15" smd roundrect (at -8.125 -0.325) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{CDIS}") (pintype "input"))
    (pad "16" smd roundrect (at -8.125 0.325) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "~{AVEC}") (pintype "input"))
    (pad "17" smd roundrect (at -8.125 0.975) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 17 "~{DSACK0}") (pinfunction "~{DSACK0}") (pintype "input"))
    (pad "18" smd roundrect (at -8.125 1.625) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{DSACK1}") (pintype "input"))
    (pad "19" smd roundrect (at -8.125 2.275) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{BERR}") (pintype "input"))
    (pad "20" smd roundrect (at -8.125 2.925) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "21" smd roundrect (at -8.125 3.575) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "22" smd roundrect (at -8.125 4.225) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 18 "R5 VCC") (pinfunction "~{HALT}") (pintype "bidirectional"))
    (pad "23" smd roundrect (at -8.125 4.875) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 19 "Net-(CPU1-~{AS})") (pinfunction "~{AS}") (pintype "output"))
    (pad "24" smd roundrect (at -8.125 5.525) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 20 "Net-(CPU1-~{DS})") (pinfunction "~{DS}") (pintype "output"))
    (pad "25" smd roundrect (at -8.125 6.175) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 21 "Net-(CPU1-R{slash}~{W})") (pinfunction "R/~{W}") (pintype "output"))
    (pad "26" smd roundrect (at -8.125 6.825) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "27" smd roundrect (at -8.125 7.475) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 22 "D31") (pinfunction "D31") (pintype "bidirectional"))
    (pad "28" smd roundrect (at -8.125 8.125) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 23 "D30") (pinfunction "D30") (pintype "bidirectional"))
    (pad "29" smd roundrect (at -8.125 8.775) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 24 "D29") (pinfunction "D29") (pintype "bidirectional"))
    (pad "30" smd roundrect (at -8.125 9.425) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 25 "D28") (pinfunction "D28") (pintype "bidirectional"))
    (pad "31" smd roundrect (at -6.175 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 26 "D27") (pinfunction "D27") (pintype "bidirectional"))
    (pad "32" smd roundrect (at -5.525 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 27 "D26") (pinfunction "D26") (pintype "bidirectional"))
    (pad "33" smd roundrect (at -4.875 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 28 "D25") (pinfunction "D25") (pintype "bidirectional"))
    (pad "34" smd roundrect (at -4.225 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 29 "D24") (pinfunction "D24") (pintype "bidirectional"))
    (pad "35" smd roundrect (at -3.575 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "36" smd roundrect (at -2.925 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "37" smd roundrect (at -2.275 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "38" smd roundrect (at -1.625 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "39" smd roundrect (at -0.975 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "40" smd roundrect (at -0.325 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "41" smd roundrect (at 0.325 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "42" smd roundrect (at 0.975 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "43" smd roundrect (at 1.625 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "44" smd roundrect (at 2.275 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "45" smd roundrect (at 2.925 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "46" smd roundrect (at 3.575 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "47" smd roundrect (at 4.225 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "48" smd roundrect (at 4.875 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "49" smd roundrect (at 5.525 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "50" smd roundrect (at 6.175 11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "51" smd roundrect (at 8.125 9.425) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "52" smd roundrect (at 8.125 8.775) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "53" smd roundrect (at 8.125 8.125) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "54" smd roundrect (at 8.125 7.475) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "55" smd roundrect (at 8.125 6.825) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "56" smd roundrect (at 8.125 6.175) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "57" smd roundrect (at 8.125 5.525) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "58" smd roundrect (at 8.125 4.875) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "59" smd roundrect (at 8.125 4.225) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "60" smd roundrect (at 8.125 3.575) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "61" smd roundrect (at 8.125 2.925) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "62" smd roundrect (at 8.125 2.275) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "63" smd roundrect (at 8.125 1.625) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "64" smd roundrect (at 8.125 0.975) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "65" smd roundrect (at 8.125 0.325) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 30 "Net-(CPU1-~{IPL0})") (pinfunction "~{IPL0}") (pintype "input"))
    (pad "66" smd roundrect (at 8.125 -0.325) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{IPL1}") (pintype "input"))
    (pad "67" smd roundrect (at 8.125 -0.975) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "~{IPL2}") (pintype "input"))
    (pad "68" smd roundrect (at 8.125 -1.625) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "69" smd roundrect (at 8.125 -2.275) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "70" smd roundrect (at 8.125 -2.925) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "71" smd roundrect (at 8.125 -3.575) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "72" smd roundrect (at 8.125 -4.225) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "73" smd roundrect (at 8.125 -4.875) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 31 "A2") (pinfunction "A2") (pintype "output"))
    (pad "74" smd roundrect (at 8.125 -5.525) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 32 "A3") (pinfunction "A3") (pintype "output"))
    (pad "75" smd roundrect (at 8.125 -6.175) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 33 "A4") (pinfunction "A4") (pintype "output"))
    (pad "76" smd roundrect (at 8.125 -6.825) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 34 "A5") (pinfunction "A5") (pintype "output"))
    (pad "77" smd roundrect (at 8.125 -7.475) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 35 "A6") (pinfunction "A6") (pintype "output"))
    (pad "78" smd roundrect (at 8.125 -8.125) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 36 "A7") (pinfunction "A7") (pintype "output"))
    (pad "79" smd roundrect (at 8.125 -8.775) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25))
    (pad "80" smd roundrect (at 8.125 -9.425) (size 1.75 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 37 "A8") (pinfunction "A8") (pintype "output"))
    (pad "81" smd roundrect (at 6.175 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 38 "A9") (pinfunction "A9") (pintype "output"))
    (pad "82" smd roundrect (at 5.525 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 39 "A10") (pinfunction "A10") (pintype "output"))
    (pad "83" smd roundrect (at 4.875 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 40 "A11") (pinfunction "A11") (pintype "output"))
    (pad "84" smd roundrect (at 4.225 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 41 "A12") (pinfunction "A12") (pintype "output"))
    (pad "85" smd roundrect (at 3.575 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 42 "A13") (pinfunction "A13") (pintype "output"))
    (pad "86" smd roundrect (at 2.925 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 43 "A14") (pinfunction "A14") (pintype "output"))
    (pad "87" smd roundrect (at 2.275 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 44 "A15") (pinfunction "A15") (pintype "output"))
    (pad "88" smd roundrect (at 1.625 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 45 "A16") (pinfunction "A16") (pintype "output"))
    (pad "89" smd roundrect (at 0.975 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "90" smd roundrect (at 0.325 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "91" smd roundrect (at -0.325 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 46 "A17") (pinfunction "A17") (pintype "output"))
    (pad "92" smd roundrect (at -0.975 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 47 "A18") (pinfunction "A18") (pintype "output"))
    (pad "93" smd roundrect (at -1.625 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 48 "Net-(CPU1-A19)") (pinfunction "A19") (pintype "output"))
    (pad "94" smd roundrect (at -2.275 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 49 "Net-(CPU1-A20)") (pinfunction "A20") (pintype "output"))
    (pad "95" smd roundrect (at -2.925 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "unconnected-(CPU1-A21-Pad95)") (pinfunction "A21") (pintype "output+no_connect"))
    (pad "96" smd roundrect (at -3.575 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "unconnected-(CPU1-A22-Pad96)") (pinfunction "A22") (pintype "output+no_connect"))
    (pad "97" smd roundrect (at -4.225 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 52 "unconnected-(CPU1-A23-Pad97)") (pinfunction "A23") (pintype "output+no_connect"))
    (pad "98" smd roundrect (at -4.875 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 53 "A1") (pinfunction "A1") (pintype "output"))
    (pad "99" smd roundrect (at -5.525 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 54 "A0") (pinfunction "A0") (pintype "output"))
    (pad "100" smd roundrect (at -6.175 -11.125) (size 0.4 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_QFP.3dshapes/PQFP-100_14x20mm_P0.65mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Library:IDE_44pin_SVW" (layer "F.Cu")
    (at 104.3 139.16 90)
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (attr through_hole)
    (fp_text reference "J7" (at 2 -15.4 90 unlocked) (layer "F.SilkS"))
    (fp_text value "IDE/ATA" (at 0 1 90 unlocked) (layer "F.Fab"))
    (fp_text user "IDE" (at 0.222 32.606 90) (layer "F.SilkS"))
    (fp_text user "${REFERENCE}" (at 0 2.5 90 unlocked) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 2 -12 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 10 "~{RESET}") (pinfunction "~{RESET}") (pintype "input"))
    (pad "2" thru_hole circle (at 0 -12 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "3" thru_hole circle (at 2 -10 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 22 "D31") (pinfunction "D7") (pintype "bidirectional"))
    (pad "4" thru_hole circle (at 0 -10 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 72 "unconnected-(J7-D8-Pad4)") (pinfunction "D8") (pintype "bidirectional+no_connect"))
    (pad "5" thru_hole circle (at 2 -8 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 23 "D30") (pinfunction "D6") (pintype "bidirectional"))
    (pad "6" thru_hole circle (at 0 -8 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 73 "unconnected-(J7-D9-Pad6)") (pinfunction "D9") (pintype "bidirectional+no_connect"))
    (pad "7" thru_hole circle (at 2 -6 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 24 "D29") (pinfunction "D5") (pintype "bidirectional"))
    (pad "8" thru_hole circle (at 0 -6 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 74 "unconnected-(J7-D10-Pad8)") (pinfunction "D10") (pintype "bidirectional+no_connect"))
    (pad "9" thru_hole circle (at 2 -4 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 25 "D28") (pinfunction "D4") (pintype "bidirectional"))
    (pad "10" thru_hole circle (at 0 -4 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 75 "unconnected-(J7-D11-Pad10)") (pinfunction "D11") (pintype "bidirectional+no_connect"))
    (pad "11" thru_hole circle (at 2 -2 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 26 "D27") (pinfunction "D3") (pintype "bidirectional"))
    (pad "12" thru_hole circle (at 0 -2 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 76 "unconnected-(J7-D12-Pad12)") (pinfunction "D12") (pintype "bidirectional+no_connect"))
    (pad "13" thru_hole circle (at 2 0 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 27 "D26") (pinfunction "D2") (pintype "bidirectional"))
    (pad "14" thru_hole circle (at 0 0 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 77 "unconnected-(J7-D13-Pad14)") (pinfunction "D13") (pintype "bidirectional+no_connect"))
    (pad "15" thru_hole circle (at 2 2 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 28 "D25") (pinfunction "D1") (pintype "bidirectional"))
    (pad "16" thru_hole circle (at 0 2 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 78 "unconnected-(J7-D14-Pad16)") (pinfunction "D14") (pintype "bidirectional+no_connect"))
    (pad "17" thru_hole circle (at 2 4 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 29 "D24") (pinfunction "D0") (pintype "bidirectional"))
    (pad "18" thru_hole circle (at 0 4 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 79 "unconnected-(J7-D15-Pad18)") (pinfunction "D15") (pintype "bidirectional+no_connect"))
    (pad "19" thru_hole circle (at 2 6 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "21" thru_hole circle (at 2 8 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "DMARQ") (pintype "input"))
    (pad "22" thru_hole circle (at 0 8 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "23" thru_hole circle (at 2 10 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 80 "~{WR}") (pinfunction "~{DIOW}") (pintype "input"))
    (pad "24" thru_hole circle (at 0 10 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "25" thru_hole circle (at 2 12 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 7 "Net-(J7-~{DIOR})") (pinfunction "~{DIOR}") (pintype "input"))
    (pad "26" thru_hole circle (at 0 12 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "27" thru_hole circle (at 2 14 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 81 "unconnected-(J7-IORDY-Pad27)") (pinfunction "IORDY") (pintype "output+no_connect"))
    (pad "28" thru_hole circle (at 0 14 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 82 "unconnected-(J7-CSEL-Pad28)") (pinfunction "CSEL") (pintype "output+no_connect"))
    (pad "29" thru_hole circle (at 2 16 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "~{DMACK}") (pintype "input"))
    (pad "30" thru_hole circle (at 0 16 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "31" thru_hole circle (at 2 18 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 83 "unconnected-(J7-INTRQ-Pad31)") (pinfunction "INTRQ") (pintype "output+no_connect"))
    (pad "32" thru_hole circle (at 0 18 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 84 "unconnected-(J7-~{IOCS16}-Pad32)") (pinfunction "~{IOCS16}") (pintype "input+no_connect"))
    (pad "33" thru_hole circle (at 2 20 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 53 "A1") (pinfunction "A1") (pintype "input"))
    (pad "34" thru_hole circle (at 0 20 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 85 "unconnected-(J7-PDIAG-Pad34)") (pinfunction "PDIAG") (pintype "output+no_connect"))
    (pad "35" thru_hole circle (at 2 22 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 54 "A0") (pinfunction "A0") (pintype "input"))
    (pad "36" thru_hole circle (at 0 22 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 31 "A2") (pinfunction "A2") (pintype "input"))
    (pad "37" thru_hole circle (at 2 24 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 86 "~{CS_IDE}") (pinfunction "~{CS0}") (pintype "input"))
    (pad "38" thru_hole circle (at 0 24 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "~{CS1}") (pintype "input"))
    (pad "39" thru_hole circle (at 2 26 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 87 "unconnected-(J7-~{ACTIVE}-Pad39)") (pinfunction "~{ACTIVE}") (pintype "output+no_connect"))
    (pad "40" thru_hole circle (at 0 26 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "41" thru_hole circle (at 2 28 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "42" thru_hole circle (at 0 28 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (pad "43" thru_hole circle (at 2 30 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "44" thru_hole circle (at 0 30 90) (size 1.524 1.524) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 88 "unconnected-(J7-~{TYPE}-Pad44)") (pinfunction "~{TYPE}") (pintype "input+no_connect"))
  )
  (footprint "LED_THT:LED_D5.0mm" (layer "F.Cu")
    (at 147.3195 58.43 -90)
    (descr "LED, diameter 5.0mm, 2 pins, http://cdn-reichelt.de/documents/datenblatt/A500/LL-504BC2E-009.pdf")
    (tags "LED diameter 5.0mm 2 pins")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Light emitting diode")
    (property "ki_keywords" "LED diode")
    (attr through_hole)
    (fp_text reference "D4" (at 5.07 -2.540462 90) (layer "F.SilkS"))
    (fp_text value "LED (power)" (at 1.27 3.96 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.25 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "K") (pintype "passive"))
    (pad "2" thru_hole circle (at 2.54 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 58 "Net-(D4-A)") (pinfunction "A") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/LED_THT.3dshapes/LED_D5.0mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 119.38 96.52 90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "ROM_RAM.kicad_sch")
    (property "Sheetname" "ROM + RAM")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C9" (at 2.5 -2.5 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.54 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 119.38 111.3 -90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R8" (at 5.08 -2.37 90) (layer "F.SilkS"))
    (fp_text value "100R" (at 5.08 2.37 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 91 "~{RD}") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 270) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 7 "Net-(J7-~{DIOR})") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x01_P2.54mm_Vertical" (layer "F.Cu")
    (at 70.104 94.488)
    (descr "Through hole straight pin header, 1x01, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x01 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x01, script generated")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J8" (at 1.016 -2.33) (layer "F.SilkS"))
    (fp_text value "Ground test pin" (at 0 2.33) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "Pin_1") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x01_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_THT:TO-220-3_Vertical" (layer "F.Cu")
    (at 162.56 55.88 -90)
    (descr "TO-220-3, Vertical, RM 2.54mm, see https://www.vishay.com/docs/66542/to-220-1.pdf")
    (tags "TO-220-3 Vertical RM 2.54mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Positive 1A 35V Linear Regulator, Fixed Output 5V, TO-220")
    (property "ki_keywords" "Voltage Regulator 1A Positive")
    (attr through_hole)
    (fp_text reference "U6" (at -5.08 -2.54 90) (layer "F.SilkS"))
    (fp_text value "LM7805" (at 2.54 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at -5.08 -2.54 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.905 2) (drill 1.1) (layers "*.Cu" "*.Mask")
      (net 5 "Net-(#FLG01-pwr)") (pinfunction "VI") (pintype "power_in"))
    (pad "2" thru_hole oval (at 2.54 0 270) (size 1.905 2) (drill 1.1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "3" thru_hole oval (at 5.08 0 270) (size 1.905 2) (drill 1.1) (layers "*.Cu" "*.Mask")
      (net 4 "Net-(J3-Pin_3)") (pinfunction "VO") (pintype "power_out"))
    (model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_THT.3dshapes/TO-220-3_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Oscillator:Oscillator_DIP-8+DIP-14_LargePads_SVW" (layer "F.Cu")
    (at 88.9 64.77 180)
    (descr "Oscillator, DIP14, Large Pads, http://cdn-reichelt.de/documents/datenblatt/B400/OSZI.pdf")
    (tags "oscillator")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "HCMOS Crystal Clock Oscillator, DIP14-style metal package")
    (property "ki_keywords" "Crystal Clock Oscillator")
    (attr through_hole)
    (fp_text reference "X1" (at 7.62 -11.26 180) (layer "F.SilkS"))
    (fp_text value "16MHz" (at 7.62 3.74 180) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 -3.81 180) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 180) (size 2.5 2.5) (drill 1) (layers "*.Cu" "*.Mask")
      (net 112 "unconnected-(X1-NC-Pad1)") (pinfunction "NC") (pintype "no_connect"))
    (pad "4" thru_hole circle (at 8 0 180) (size 2.5 2.5) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "7" thru_hole circle (at 15.24 0 180) (size 2.5 2.5) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "8" thru_hole circle (at 15.24 -7.62 180) (size 2.5 2.5) (drill 1) (layers "*.Cu" "*.Mask")
      (net 9 "CLK") (pinfunction "OUT") (pintype "tri_state"))
    (pad "11" thru_hole circle (at 8 -8 180) (size 2.5 2.5) (drill 0.762) (layers "*.Cu" "*.Mask")
      (net 9 "CLK") (pinfunction "OUT") (pintype "tri_state"))
    (pad "14" thru_hole circle (at 0 -7.62 180) (size 2.5 2.5) (drill 1) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Vcc") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Oscillator.3dshapes/Oscillator_DIP-14.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-40_W15.24mm_Socket_LongPads" (layer "F.Cu")
    (at 147.315 81.28)
    (descr "40-lead though-hole mounted DIP package, row spacing 15.24 mm (600 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 15.24mm 600mil Socket LongPads")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "PC16550D, Universal Asynchronous Receiver/Transmitter with FIFOs, PDIP-40")
    (property "ki_keywords" "1ch UART FIFO")
    (attr through_hole)
    (fp_text reference "U7" (at 15.245 -2.33) (layer "F.SilkS"))
    (fp_text value "16550" (at 7.62 50.59) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 24.13) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 29 "D24") (pinfunction "D0") (pintype "bidirectional"))
    (pad "2" thru_hole oval (at 0 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 28 "D25") (pinfunction "D1") (pintype "bidirectional"))
    (pad "3" thru_hole oval (at 0 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 27 "D26") (pinfunction "D2") (pintype "bidirectional"))
    (pad "4" thru_hole oval (at 0 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 26 "D27") (pinfunction "D3") (pintype "bidirectional"))
    (pad "5" thru_hole oval (at 0 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 25 "D28") (pinfunction "D4") (pintype "bidirectional"))
    (pad "6" thru_hole oval (at 0 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 24 "D29") (pinfunction "D5") (pintype "bidirectional"))
    (pad "7" thru_hole oval (at 0 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 23 "D30") (pinfunction "D6") (pintype "bidirectional"))
    (pad "8" thru_hole oval (at 0 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 22 "D31") (pinfunction "D7") (pintype "bidirectional"))
    (pad "9" thru_hole oval (at 0 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 110 "Net-(U7-RCLK)") (pinfunction "RCLK") (pintype "input"))
    (pad "10" thru_hole oval (at 0 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 66 "R4 VCC") (pinfunction "SIN") (pintype "input"))
    (pad "11" thru_hole oval (at 0 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 60 "Net-(D6-K)") (pinfunction "SOUT") (pintype "output"))
    (pad "12" thru_hole oval (at 0 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "CS0") (pintype "input"))
    (pad "13" thru_hole oval (at 0 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 14 "FC2") (pinfunction "CS1") (pintype "input"))
    (pad "14" thru_hole oval (at 0 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 98 "~{CS_UART}") (pinfunction "~{CS2}") (pintype "input"))
    (pad "15" thru_hole oval (at 0 35.56) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 110 "Net-(U7-RCLK)") (pinfunction "~{BAUDOUT}") (pintype "output"))
    (pad "16" thru_hole oval (at 0 38.1) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 111 "Net-(U7-XIN)") (pinfunction "XIN") (pintype "input"))
    (pad "17" thru_hole oval (at 0 40.64) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 113 "Net-(U7-XOUT)") (pinfunction "XOUT") (pintype "output"))
    (pad "18" thru_hole oval (at 0 43.18) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 80 "~{WR}") (pinfunction "~{WR}") (pintype "input"))
    (pad "19" thru_hole oval (at 0 45.72) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "WR") (pintype "input"))
    (pad "20" thru_hole oval (at 0 48.26) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "21" thru_hole oval (at 15.24 48.26) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 91 "~{RD}") (pinfunction "~{RD}") (pintype "input"))
    (pad "22" thru_hole oval (at 15.24 45.72) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "RD") (pintype "input"))
    (pad "23" thru_hole oval (at 15.24 43.18) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 114 "unconnected-(U7-DDIS-Pad23)") (pinfunction "DDIS") (pintype "output+no_connect"))
    (pad "24" thru_hole oval (at 15.24 40.64) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 115 "unconnected-(U7-~{TXRDY}-Pad24)") (pinfunction "~{TXRDY}") (pintype "output+no_connect"))
    (pad "25" thru_hole oval (at 15.24 38.1) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "~{ADS}") (pintype "input"))
    (pad "26" thru_hole oval (at 15.24 35.56) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 31 "A2") (pinfunction "A2") (pintype "input"))
    (pad "27" thru_hole oval (at 15.24 33.02) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 53 "A1") (pinfunction "A1") (pintype "input"))
    (pad "28" thru_hole oval (at 15.24 30.48) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 54 "A0") (pinfunction "A0") (pintype "input"))
    (pad "29" thru_hole oval (at 15.24 27.94) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 116 "unconnected-(U7-~{RXRDY}-Pad29)") (pinfunction "~{RXRDY}") (pintype "output+no_connect"))
    (pad "30" thru_hole oval (at 15.24 25.4) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 94 "UART_INT") (pinfunction "INTR") (pintype "output"))
    (pad "31" thru_hole oval (at 15.24 22.86) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 102 "Net-(J6-Pin_6)") (pinfunction "~{OUT2}") (pintype "output"))
    (pad "32" thru_hole oval (at 15.24 20.32) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 62 "Net-(D5-K)") (pinfunction "~{RTS}") (pintype "output"))
    (pad "33" thru_hole oval (at 15.24 17.78) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 101 "Net-(J6-Pin_4)") (pinfunction "~{DTR}") (pintype "output"))
    (pad "34" thru_hole oval (at 15.24 15.24) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 70 "Net-(J5-Pin_4)") (pinfunction "~{OUT1}") (pintype "output"))
    (pad "35" thru_hole oval (at 15.24 12.7) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 93 "RESET") (pinfunction "MR") (pintype "input"))
    (pad "36" thru_hole oval (at 15.24 10.16) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 92 "R7 VCC") (pinfunction "~{CTS}") (pintype "input"))
    (pad "37" thru_hole oval (at 15.24 7.62) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 69 "R6 VCC") (pinfunction "~{DSR}") (pintype "input"))
    (pad "38" thru_hole oval (at 15.24 5.08) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 89 "Net-(J5-Pin_3)") (pinfunction "~{DCD}") (pintype "input"))
    (pad "39" thru_hole oval (at 15.24 2.54) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 103 "Net-(U7-~{RI})") (pinfunction "~{RI}") (pintype "input"))
    (pad "40" thru_hole oval (at 15.24 0) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "VCC") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-40_W15.24mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (layer "F.Cu")
    (at 139.7 63.5 90)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=10.16mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 10.16mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resistor")
    (property "ki_keywords" "R res resistor")
    (attr through_hole)
    (fp_text reference "R7" (at -1.905 0.635 90) (layer "F.SilkS"))
    (fp_text value "4K7" (at 5.08 2.37 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 5.08 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 89 "Net-(J5-Pin_3)") (pintype "passive"))
    (pad "2" thru_hole oval (at 10.16 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 101 "Net-(J6-Pin_4)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P7.62mm_Horizontal" (layer "F.Cu")
    (at 156.21 66.04)
    (descr "Resistor, Axial_DIN0207 series, Axial, Horizontal, pin pitch=7.62mm, 0.25W = 1/4W, length*diameter=6.3*2.5mm^2, http://cdn-reichelt.de/documents/datenblatt/B400/1_4W%23YAG.pdf")
    (tags "Resistor Axial_DIN0207 series Axial Horizontal pin pitch 7.62mm 0.25W = 1/4W length 6.3mm diameter 2.5mm")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Resettable fuse, polymeric positive temperature coefficient, small symbol")
    (property "ki_keywords" "resettable fuse PTC PPTC polyfuse polyswitch")
    (attr through_hole)
    (fp_text reference "F1" (at 3.81 -2.37) (layer "F.SilkS"))
    (fp_text value "500 mA" (at 3.81 2.37) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 3.81 0) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 55 "Net-(D3-K)") (pintype "passive"))
    (pad "2" thru_hole oval (at 7.62 0) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 5 "Net-(#FLG01-pwr)") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Resistor_THT.3dshapes/R_Axial_DIN0207_L6.3mm_D2.5mm_P7.62mm_Horizontal.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:CP_Radial_D8.0mm_P5.00mm" (layer "F.Cu")
    (at 157.4 73.66 180)
    (descr "CP, Radial series, Radial, pin pitch=5.00mm, , diameter=8mm, Electrolytic Capacitor")
    (tags "CP Radial series Radial pin pitch 5.00mm  diameter 8mm Electrolytic Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Polarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C11" (at 2.5 -5.25) (layer "F.SilkS"))
    (fp_text value "220uF" (at 2.5 5.25) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 -4) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 5 "Net-(#FLG01-pwr)") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/CP_Radial_D8.0mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (layer "F.Cu")
    (at 126.995 86.36 90)
    (descr "14-lead though-hole mounted DIP package, row spacing 7.62 mm (300 mils), Socket, LongPads")
    (tags "THT DIP DIL PDIP 2.54mm 7.62mm 300mil Socket LongPads")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "8-bit serial-in parallel-out shift register")
    (property "ki_keywords" "8-bit shift register")
    (attr through_hole)
    (fp_text reference "U3" (at 0 -3.043 90) (layer "F.SilkS"))
    (fp_text value "74HC164" (at 3.81 17.57 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 3.81 7.62 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "DSA") (pintype "input"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "DSB") (pintype "input"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 64 "Net-(J1-Pin_3)") (pinfunction "Q0") (pintype "output"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 63 "Net-(J1-Pin_5)") (pinfunction "Q1") (pintype "output"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 67 "Net-(J1-Pin_7)") (pinfunction "Q2") (pintype "output"))
    (pad "6" thru_hole oval (at 0 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 105 "unconnected-(U3-Q3-Pad6)") (pinfunction "Q3") (pintype "output+no_connect"))
    (pad "7" thru_hole oval (at 0 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "GND") (pintype "power_in"))
    (pad "8" thru_hole oval (at 7.62 15.24 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 9 "CLK") (pinfunction "CP") (pintype "input"))
    (pad "9" thru_hole oval (at 7.62 12.7 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 104 "Net-(U3-~{MR})") (pinfunction "~{MR}") (pintype "input"))
    (pad "10" thru_hole oval (at 7.62 10.16 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 106 "unconnected-(U3-Q4-Pad10)") (pinfunction "Q4") (pintype "output+no_connect"))
    (pad "11" thru_hole oval (at 7.62 7.62 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 107 "unconnected-(U3-Q5-Pad11)") (pinfunction "Q5") (pintype "output+no_connect"))
    (pad "12" thru_hole oval (at 7.62 5.08 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 108 "unconnected-(U3-Q6-Pad12)") (pinfunction "Q6") (pintype "output+no_connect"))
    (pad "13" thru_hole oval (at 7.62 2.54 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 109 "unconnected-(U3-Q7-Pad13)") (pinfunction "Q7") (pintype "output+no_connect"))
    (pad "14" thru_hole oval (at 7.62 0 90) (size 2.4 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "VCC") (pintype "power_in"))
    (model "${KICAD6_3DMODEL_DIR}/Package_DIP.3dshapes/DIP-14_W7.62mm_Socket.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical" (layer "F.Cu")
    (at 129.54 48.26 90)
    (descr "Through hole straight pin header, 1x05, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x05 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x05, script generated (kicad-library-utils/schlib/autogen/connector/)")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J4" (at 0 -2.33 90) (layer "F.SilkS"))
    (fp_text value "USB RS232" (at 0 12.49 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 5.08) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 68 "Net-(J3-Pin_1)") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 0 2.54 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 71 "unconnected-(J4-Pin_2-Pad2)") (pinfunction "Pin_2") (pintype "passive+no_connect"))
    (pad "3" thru_hole oval (at 0 5.08 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 66 "R4 VCC") (pinfunction "Pin_3") (pintype "passive"))
    (pad "4" thru_hole oval (at 0 7.62 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 60 "Net-(D6-K)") (pinfunction "Pin_4") (pintype "passive"))
    (pad "5" thru_hole oval (at 0 10.16 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pinfunction "Pin_5") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x05_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 88.9 129.54 180)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C6" (at 0 -2.54) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 7.62 0) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 180) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_THT:LED_D5.0mm" (layer "F.Cu")
    (at 147.3195 73.67 -90)
    (descr "LED, diameter 5.0mm, 2 pins, http://cdn-reichelt.de/documents/datenblatt/A500/LL-504BC2E-009.pdf")
    (tags "LED diameter 5.0mm 2 pins")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Light emitting diode")
    (property "ki_keywords" "LED diode")
    (attr through_hole)
    (fp_text reference "D6" (at 5.07 -2.540462 90) (layer "F.SilkS"))
    (fp_text value "LED (tx)" (at 1.27 3.96 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.25 0 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 60 "Net-(D6-K)") (pinfunction "K") (pintype "passive"))
    (pad "2" thru_hole circle (at 2.54 0 270) (size 1.8 1.8) (drill 0.9) (layers "*.Cu" "*.Mask")
      (net 61 "Net-(D6-A)") (pinfunction "A") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/LED_THT.3dshapes/LED_D5.0mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_1x03_P2.54mm_Vertical" (layer "F.Cu")
    (at 139.7 68.58)
    (descr "Through hole straight pin header, 1x03, 2.54mm pitch, single row")
    (tags "Through hole pin header THT 1x03 2.54mm single row")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Generic connector, single row, 01x03, script generated (kicad-library-utils/schlib/autogen/connector/)")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J3" (at 1.905 -1.905 90) (layer "F.SilkS"))
    (fp_text value "Power" (at 0 7.41) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 2.54 90) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 68 "Net-(J3-Pin_1)") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 0 2.54) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Pin_2") (pintype "passive"))
    (pad "3" thru_hole oval (at 0 5.08) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 4 "Net-(J3-Pin_3)") (pinfunction "Pin_3") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x03_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (layer "F.Cu")
    (at 162.56 76.2 90)
    (descr "C, Disc series, Radial, pin pitch=5.00mm, , diameter*width=7*2.5mm^2, Capacitor, http://cdn-reichelt.de/documents/datenblatt/B300/DS_KERKO_TC.pdf")
    (tags "C Disc series Radial pin pitch 5.00mm  diameter 7mm width 2.5mm Capacitor")
    (property "Field2" "")
    (property "Sheetfile" "UAR_IO.kicad_sch")
    (property "Sheetname" "UART + IO")
    (property "ki_description" "Unpolarized capacitor")
    (property "ki_keywords" "cap capacitor")
    (attr through_hole)
    (fp_text reference "C10" (at 2.5 -2.5 90) (layer "F.SilkS"))
    (fp_text value "100nF" (at 2.5 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 2.5 0 90) (layer "F.Fab"))
    (pad "1" thru_hole circle (at 0 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pintype "passive"))
    (pad "2" thru_hole circle (at 5 0 90) (size 1.6 1.6) (drill 0.8) (layers "*.Cu" "*.Mask")
      (net 2 "GND") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Capacitor_THT.3dshapes/C_Disc_D7.0mm_W2.5mm_P5.00mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Connector_PinHeader_2.54mm:PinHeader_2x04_P2.54mm_Vertical" (layer "F.Cu")
    (at 127 73.66 90)
    (descr "Through hole straight pin header, 2x04, 2.54mm pitch, double rows")
    (tags "Through hole pin header THT 2x04 2.54mm double row")
    (property "Sheetfile" "MC68EC020_SBC.kicad_sch")
    (property "Sheetname" "")
    (property "ki_description" "Generic connector, double row, 02x04, odd/even pin numbering scheme (row 1 odd numbers, row 2 even numbers), script generated (kicad-library-utils/schlib/autogen/connector/)")
    (property "ki_keywords" "connector")
    (attr through_hole)
    (fp_text reference "J1" (at 1.27 -2.33 90) (layer "F.SilkS"))
    (fp_text value "Wait state" (at 1.27 9.95 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.27 3.81) (layer "F.Fab"))
    (pad "1" thru_hole rect (at 0 0 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 3 "+5V") (pinfunction "Pin_1") (pintype "passive"))
    (pad "2" thru_hole oval (at 2.54 0 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pinfunction "Pin_2") (pintype "passive"))
    (pad "3" thru_hole oval (at 0 2.54 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 64 "Net-(J1-Pin_3)") (pinfunction "Pin_3") (pintype "passive"))
    (pad "4" thru_hole oval (at 2.54 2.54 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pinfunction "Pin_4") (pintype "passive"))
    (pad "5" thru_hole oval (at 0 5.08 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 63 "Net-(J1-Pin_5)") (pinfunction "Pin_5") (pintype "passive"))
    (pad "6" thru_hole oval (at 2.54 5.08 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pinfunction "Pin_6") (pintype "passive"))
    (pad "7" thru_hole oval (at 0 7.62 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 67 "Net-(J1-Pin_7)") (pinfunction "Pin_7") (pintype "passive"))
    (pad "8" thru_hole oval (at 2.54 7.62 90) (size 1.7 1.7) (drill 1) (layers "*.Cu" "*.Mask")
      (net 65 "R2 VCC") (pinfunction "Pin_8") (pintype "passive"))
    (model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_2x04_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (gr_circle (center 160.52 137.16) (end 163.06 137.16)
    (fill none) (layer "Edge.Cuts"))
  (gr_rect locked (start 66.5 43.18) (end 166.5 143.18)
    (fill none) (layer "Edge.Cuts"))
  (gr_circle (center 160.52 48.26) (end 163.06 48.26)
    (fill none) (layer "Edge.Cuts"))
  (gr_circle (center 71.52 137.16) (end 74.06 137.16)
    (fill none) (layer "Edge.Cuts"))
  (gr_circle (center 71.62 48.26) (end 74.16 48.26)
    (fill none) (layer "Edge.Cuts"))
  (gr_text "16MHz" (at 93.345 70.485 90) (layer "F.SilkS"))
  (gr_text "3V3" (at 132.715 50.165 90) (layer "F.SilkS"))
  (gr_text "CIPO" (at 112.395 50.165 90) (layer "F.SilkS"))
  (gr_text "74HC139" (at 120.015 86.36 90) (layer "F.SilkS"))
  (gr_text "GND" (at 69.088 98.044) (layer "F.SilkS"))
  (gr_text "POWER" (at 143.51 58.42 90) (layer "F.SilkS"))
  (gr_text "COPI" (at 114.935 50.165 90) (layer "F.SilkS"))
  (gr_text "GND\n" (at 107.315 50.165 90) (layer "F.SilkS"))
  (gr_text "W0" (at 127.635 69.215 90) (layer "F.SilkS"))
  (gr_text "USB" (at 140.97 69.215) (layer "F.SilkS"))
  (gr_text "EXT" (at 140.97 74.295) (layer "F.SilkS"))
  (gr_text "RTC" (at 88.9 45.72) (layer "F.SilkS"))
  (gr_text "CS" (at 120.015 52.07 90) (layer "F.SilkS"))
  (gr_text "EC020-SBC\nREV-A\nSVDW 2023" (at 75.565 140.335) (layer "F.SilkS"))
  (gr_text "GND" (at 86.995 49.784 90) (layer "F.SilkS"))
  (gr_text "RX" (at 135.255 50.165 90) (layer "F.SilkS"))
  (gr_text "SD card" (at 109.22 45.72) (layer "F.SilkS"))
  (gr_text "W1" (at 130.175 69.215 90) (layer "F.SilkS"))
  (gr_text "*" (at 75.765 104.415) (layer "F.SilkS"))
  (gr_text "74HC14" (at 92.075 85.09 90) (layer "F.SilkS"))
  (gr_text "W27C512-45" (at 127 132.715) (layer "F.SilkS"))
  (gr_text "5V" (at 130.175 50.165 90) (layer "F.SilkS"))
  (gr_text "SDA" (at 89.535 49.784 90) (layer "F.SilkS"))
  (gr_text "GND\n\n+9V" (at 153.73 51.465) (layer "F.SilkS"))
  (gr_text "TX" (at 137.795 50.165 90) (layer "F.SilkS"))
  (gr_text "W3" (at 135.255 69.215 90) (layer "F.SilkS"))
  (gr_text "AS6C4008-55" (at 101.6 132.715) (layer "F.SilkS"))
  (gr_text "External power" (at 147.32 45.72) (layer "F.SilkS"))
  (gr_text "VCC" (at 109.855 50.165 90) (layer "F.SilkS"))
  (gr_text "ACTIVE" (at 143.51 65.405 90) (layer "F.SilkS"))
  (gr_text "RESET" (at 76.2 50.8) (layer "F.SilkS"))
  (gr_text "TX" (at 143.51 75.565 90) (layer "F.SilkS"))
  (gr_text "W2" (at 132.715 69.215 90) (layer "F.SilkS"))
  (gr_text "SCK" (at 117.475 50.165 90) (layer "F.SilkS"))
  (gr_text "SCL" (at 92.456 49.784 90) (layer "F.SilkS"))
  (gr_text "TL16C550" (at 151.765 132.715) (layer "F.SilkS"))
  (gr_text "Power switch" (at 140.97 71.755) (layer "F.SilkS"))
  (gr_text "NC" (at 94.615 50.165 90) (layer "F.SilkS"))
  (gr_text "HALT" (at 143.51 50.165 90) (layer "F.SilkS"))
  (gr_text "INT" (at 97.155 50.165 90) (layer "F.SilkS"))
  (gr_text "5V" (at 84.455 50.165 90) (layer "F.SilkS"))
  (gr_text "11.0592 MHz" (at 145.796 141.478) (layer "F.SilkS"))
  (gr_text "USB serial" (at 130.81 45.72) (layer "F.SilkS"))
  (gr_text "74HCT164" (at 145.415 86.36 90) (layer "F.SilkS"))
  (gr_text "GND" (at 140.335 50.165 90) (layer "F.SilkS"))
  (zone (net 2) (net_name "GND") (layers "F&B.Cu") (hatch edge 0.5)
    (connect_pads (clearance 0.5))
    (min_thickness 0.25) (filled_areas_thickness no)
    (fill yes (thermal_gap 0.5) (thermal_bridge_width 0.5))
    (polygon
      (pts
        (xy 67.056 43.688)
        (xy 165.862 43.688)
        (xy 166.116 142.24)
        (xy 66.802 142.24)
      )
    )
  )
)
