(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "EC020-SBC")
    (date "2023-11-23")
    (rev "V0.12")
    (company "SVDW")
    (comment 1 "MC68EC020")
  )
  (lib_symbols
    (symbol "74xx:74HC14" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 1.27 0))
      (property "Value" "74HC14" (at 0 -1.27 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "HCMOS not inverter" (at 0 0 0))
      (property "ki_description" "Hex inverter schmitt trigger" (at 0 0 0))
      (property "ki_fp_filters" "DIP*W7.62mm*" (at 0 0 0))
      (symbol "74HC14_1_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "1")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "2")
        )
      )
      (symbol "74HC14_1_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_2_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "3")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "4")
        )
      )
      (symbol "74HC14_2_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_3_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "5")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "6")
        )
      )
      (symbol "74HC14_3_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_4_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "8")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "9")
        )
      )
      (symbol "74HC14_4_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_5_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "10")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "11")
        )
      )
      (symbol "74HC14_5_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_6_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "12")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "13")
        )
      )
      (symbol "74HC14_6_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_7_0"
        (pin power_in line (at 0 12.7 270) (length 5.08)
          (name "VCC")
          (number "14")
        )
        (pin power_in line (at 0 -12.7 90) (length 5.08)
          (name "GND")
          (number "7")
        )
      )
      (symbol "74HC14_7_1"
        (rectangle (start -5.08 7.62) (end 5.08 -7.62)
          (fill (type background))
        )
      )
    )
    (symbol "74xx:74HC164" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 1.905 -13.97 0))
      (property "Value" "74HC164" (at 1.905 -16.51 0))
      (property "Footprint" "" (at 22.86 -7.62 0))
      (property "Datasheet" "https://assets.nexperia.com/documents/data-sheet/74HC_HCT164.pdf" (at 22.86 -7.62 0))
      (property "ki_keywords" "8-bit shift register" (at 0 0 0))
      (property "ki_description" "8-bit serial-in parallel-out shift register" (at 0 0 0))
      (property "ki_fp_filters" "SOIC*3.9x8.7*P1.27mm* ?SSOP*P0.65mm* DIP*W7.62mm*" (at 0 0 0))
      (symbol "74HC164_0_1"
        (rectangle (start 7.62 10.16) (end -7.62 -12.7)
          (fill (type background))
        )
      )
      (symbol "74HC164_1_1"
        (pin input line (at -10.16 0 0) (length 2.54)
          (name "DSA")
          (number "1")
        )
        (pin output line (at 10.16 -2.54 180) (length 2.54)
          (name "Q4")
          (number "10")
        )
        (pin output line (at 10.16 -5.08 180) (length 2.54)
          (name "Q5")
          (number "11")
        )
        (pin output line (at 10.16 -7.62 180) (length 2.54)
          (name "Q6")
          (number "12")
        )
        (pin output line (at 10.16 -10.16 180) (length 2.54)
          (name "Q7")
          (number "13")
        )
        (pin power_in line (at 0 12.7 270) (length 2.54)
          (name "VCC")
          (number "14")
        )
        (pin input line (at -10.16 -2.54 0) (length 2.54)
          (name "DSB")
          (number "2")
        )
        (pin output line (at 10.16 7.62 180) (length 2.54)
          (name "Q0")
          (number "3")
        )
        (pin output line (at 10.16 5.08 180) (length 2.54)
          (name "Q1")
          (number "4")
        )
        (pin output line (at 10.16 2.54 180) (length 2.54)
          (name "Q2")
          (number "5")
        )
        (pin output line (at 10.16 0 180) (length 2.54)
          (name "Q3")
          (number "6")
        )
        (pin power_in line (at 0 -15.24 90) (length 2.54)
          (name "GND")
          (number "7")
        )
        (pin input line (at -10.16 -7.62 0) (length 2.54)
          (name "CP")
          (number "8")
        )
        (pin input line (at -10.16 5.08 0) (length 2.54)
          (name "~{MR}")
          (number "9")
        )
      )
    )
    (symbol "Connector_Generic:Conn_02x04_Odd_Even" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 1.27 5.08 0))
      (property "Value" "Conn_02x04_Odd_Even" (at 1.27 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, double row, 02x04, odd/even pin numbering scheme (row 1 odd numbers, row 2 even numbers), script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_2x??_*" (at 0 0 0))
      (symbol "Conn_02x04_Odd_Even_1_1"
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 3.81) (end 3.81 -6.35)
          (fill (type background))
        )
        (rectangle (start 3.81 -4.953) (end 2.54 -5.207)
          (fill (type none))
        )
        (rectangle (start 3.81 -2.413) (end 2.54 -2.667)
          (fill (type none))
        )
        (rectangle (start 3.81 0.127) (end 2.54 -0.127)
          (fill (type none))
        )
        (rectangle (start 3.81 2.667) (end 2.54 2.413)
          (fill (type none))
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at 7.62 2.54 180) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at 7.62 0 180) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
        (pin passive line (at 7.62 -2.54 180) (length 3.81)
          (name "Pin_6")
          (number "6")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_7")
          (number "7")
        )
        (pin passive line (at 7.62 -5.08 180) (length 3.81)
          (name "Pin_8")
          (number "8")
        )
      )
    )
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:R" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.032 0 90))
      (property "Value" "R" (at 0 0 90))
      (property "Footprint" "" (at -1.778 0 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_0_1"
        (rectangle (start -1.016 -2.54) (end 1.016 2.54)
          (fill (type none))
        )
      )
      (symbol "R_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Oscillator:ACO-xxxMHz" (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "X" (at -5.08 6.35 0))
      (property "Value" "ACO-xxxMHz" (at 1.27 -6.35 0))
      (property "Footprint" "Oscillator:Oscillator_DIP-14" (at 11.43 -8.89 0))
      (property "Datasheet" "http://www.conwin.com/datasheets/cx/cx030.pdf" (at -2.54 0 0))
      (property "ki_keywords" "Crystal Clock Oscillator" (at 0 0 0))
      (property "ki_description" "HCMOS Crystal Clock Oscillator, DIP14-style metal package" (at 0 0 0))
      (property "ki_fp_filters" "Oscillator*DIP*14*" (at 0 0 0))
      (symbol "ACO-xxxMHz_0_1"
        (rectangle (start -5.08 5.08) (end 5.08 -5.08)
          (fill (type background))
        )
        (polyline
          (pts
            (xy -2.54 -0.635)
            (xy -1.905 -0.635)
            (xy -1.905 0.635)
            (xy -1.27 0.635)
            (xy -1.27 -0.635)
            (xy -0.635 -0.635)
            (xy -0.635 0.635)
            (xy 0 0.635)
            (xy 0 -0.635)
          )
          (fill (type none))
        )
      )
      (symbol "ACO-xxxMHz_1_1"
        (pin no_connect line (at -5.08 1.27 0) (length 2.54) hide
          (name "NC")
          (number "1")
        )
        (pin tri_state line (at 7.62 2.54 180) (length 2.54)
          (name "OUT")
          (number "11")
        )
        (pin power_in line (at -1.27 7.62 270) (length 2.54)
          (name "Vcc")
          (number "14")
        )
        (pin power_in line (at -1.27 -7.62 90) (length 2.54)
          (name "GND")
          (number "4")
        )
        (pin power_in line (at 2.54 -7.62 90) (length 2.54)
          (name "GND")
          (number "7")
        )
        (pin tri_state line (at 7.62 0 180) (length 2.54)
          (name "OUT")
          (number "8")
        )
      )
    )
    (symbol "SVW_custom_lib:74HC139" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 0 0))
      (property "Value" "74HC139" (at 0 0 0))
      (property "Footprint" "Package_DIP:DIP-16_W7.62mm_Socket_LongPads" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (symbol "74HC139_0_0"
        (text "" (at -1.27 -21.59 0))
        (text "" (at -1.27 1.27 0))
        (text_box "74HC139A\ndecoder"
          (at -7.62 8.89 0) (size 13.97 -16.51)
          (fill (type none))
        )
        (text_box "74HC139B\ndecoder"
          (at -7.62 -13.97 0) (size 13.97 -16.51)
          (fill (type none))
        )
      )
      (symbol "74HC139_1_1"
        (pin input line (at -10.16 -5.08 0) (length 2.54)
          (name "~{E}")
          (number "1")
        )
        (pin output line (at 8.89 -21.59 180) (length 2.54)
          (name "~{Y2}")
          (number "10")
        )
        (pin output line (at 8.89 -19.05 180) (length 2.54)
          (name "~{Y1}")
          (number "11")
        )
        (pin output line (at 8.89 -16.51 180) (length 2.54)
          (name "~{Y0}")
          (number "12")
        )
        (pin input line (at -10.16 -19.05 0) (length 2.54)
          (name "A1")
          (number "13")
        )
        (pin input line (at -10.16 -16.51 0) (length 2.54)
          (name "A0")
          (number "14")
        )
        (pin input line (at -10.16 -27.94 0) (length 2.54)
          (name "~{E}")
          (number "15")
        )
        (pin power_in line (at 0 11.43 270) (length 2.54)
          (name "Vcc")
          (number "16")
        )
        (pin input line (at -10.16 6.35 0) (length 2.54)
          (name "A0")
          (number "2")
        )
        (pin input line (at -10.16 3.81 0) (length 2.54)
          (name "A1")
          (number "3")
        )
        (pin output line (at 8.89 6.35 180) (length 2.54)
          (name "~{Y0}")
          (number "4")
        )
        (pin output line (at 8.89 3.81 180) (length 2.54)
          (name "~{Y1}")
          (number "5")
        )
        (pin output line (at 8.89 1.27 180) (length 2.54)
          (name "~{Y2}")
          (number "6")
        )
        (pin output line (at 8.89 -1.27 180) (length 2.54)
          (name "~{Y3}")
          (number "7")
        )
        (pin power_in line (at 0 -33.02 90) (length 2.54)
          (name "GND")
          (number "8")
        )
        (pin output line (at 8.89 -24.13 180) (length 2.54)
          (name "~{Y3}")
          (number "9")
        )
      )
    )
    (symbol "SVW_custom_lib:MC68EC020" (in_bom yes) (on_board yes)
      (property "Reference" "CPU" (at -17.78 5.08 0))
      (property "Value" "MC68EC020" (at -17.78 5.08 0))
      (property "Footprint" "Package_QFP:PQFP-100_14x20mm_P0.65mm" (at -17.78 5.08 0))
      (property "Datasheet" "" (at -17.78 5.08 0))
      (symbol "MC68EC020_0_0"
        (text_box "MC68EC020"
          (at -20.32 41.91 90) (size 43.18 -95.25)
          (fill (type color) (color 0 0 0 0))
        )
      )
      (symbol "MC68EC020_1_1"
        (pin input line (at -22.86 39.37 0) (length 2.54)
          (name "~{BR}")
          (number "1")
        )
        (pin output line (at -22.86 21.59 0) (length 2.54)
          (name "FC0")
          (number "10")
        )
        (pin power_in line (at 16.51 -55.88 90) (length 2.54)
          (name "GND")
          (number "100")
        )
        (pin output line (at -22.86 19.05 0) (length 2.54)
          (name "FC1")
          (number "11")
        )
        (pin output line (at -22.86 16.51 0) (length 2.54)
          (name "FC2")
          (number "12")
        )
        (pin output line (at -22.86 -6.35 0) (length 2.54)
          (name "SIZE0")
          (number "13")
        )
        (pin output line (at -22.86 -8.89 0) (length 2.54)
          (name "SIZE1")
          (number "14")
        )
        (pin input line (at -22.86 -13.97 0) (length 2.54)
          (name "~{CDIS}")
          (number "15")
        )
        (pin input line (at -22.86 -16.51 0) (length 2.54)
          (name "~{AVEC}")
          (number "16")
        )
        (pin input line (at -22.86 -21.59 0) (length 2.54)
          (name "~{DSACK0}")
          (number "17")
        )
        (pin input line (at -22.86 -24.13 0) (length 2.54)
          (name "~{DSACK1}")
          (number "18")
        )
        (pin input line (at -22.86 -29.21 0) (length 2.54)
          (name "~{BERR}")
          (number "19")
        )
        (pin output line (at -22.86 36.83 0) (length 2.54)
          (name "~{BG}")
          (number "2")
        )
        (pin power_in line (at -8.89 -55.88 90) (length 2.54)
          (name "GND")
          (number "20")
        )
        (pin power_in line (at -6.35 -55.88 90) (length 2.54)
          (name "GND")
          (number "21")
        )
        (pin bidirectional line (at -22.86 26.67 0) (length 2.54)
          (name "~{HALT}")
          (number "22")
        )
        (pin output line (at 25.4 -45.72 180) (length 2.54)
          (name "~{AS}")
          (number "23")
        )
        (pin output line (at 25.4 -48.26 180) (length 2.54)
          (name "~{DS}")
          (number "24")
        )
        (pin output line (at 25.4 -50.8 180) (length 2.54)
          (name "R/~{W}")
          (number "25")
        )
        (pin power_in line (at -3.81 -55.88 90) (length 2.54)
          (name "GND")
          (number "26")
        )
        (pin bidirectional line (at 25.4 -41.91 180) (length 2.54)
          (name "D31")
          (number "27")
        )
        (pin bidirectional line (at 25.4 -39.37 180) (length 2.54)
          (name "D30")
          (number "28")
        )
        (pin bidirectional line (at 25.4 -36.83 180) (length 2.54)
          (name "D29")
          (number "29")
        )
        (pin power_in line (at -13.97 -55.88 90) (length 2.54)
          (name "GND")
          (number "3")
        )
        (pin bidirectional line (at 25.4 -34.29 180) (length 2.54)
          (name "D28")
          (number "30")
        )
        (pin bidirectional line (at 25.4 -31.75 180) (length 2.54)
          (name "D27")
          (number "31")
        )
        (pin bidirectional line (at 25.4 -29.21 180) (length 2.54)
          (name "D26")
          (number "32")
        )
        (pin bidirectional line (at 25.4 -26.67 180) (length 2.54)
          (name "D25")
          (number "33")
        )
        (pin bidirectional line (at 25.4 -24.13 180) (length 2.54)
          (name "D24")
          (number "34")
        )
        (pin power_in line (at -11.43 -55.88 90) (length 2.54)
          (name "GND")
          (number "4")
        )
        (pin power_in line (at -1.27 -55.88 90) (length 2.54)
          (name "GND")
          (number "43")
        )
        (pin power_in line (at -2.54 44.45 270) (length 2.54)
          (name "Vcc")
          (number "44")
        )
        (pin input line (at -22.86 31.75 0) (length 2.54)
          (name "CLK")
          (number "5")
        )
        (pin power_in line (at 0 44.45 270) (length 2.54)
          (name "Vcc")
          (number "57")
        )
        (pin power_in line (at 1.27 -55.88 90) (length 2.54)
          (name "GND")
          (number "58")
        )
        (pin power_in line (at 3.81 -55.88 90) (length 2.54)
          (name "GND")
          (number "59")
        )
        (pin bidirectional line (at -22.86 29.21 0) (length 2.54)
          (name "~{RESET}")
          (number "6")
        )
        (pin input line (at -22.86 -34.29 0) (length 2.54)
          (name "~{IPL0}")
          (number "65")
        )
        (pin input line (at -22.86 -36.83 0) (length 2.54)
          (name "~{IPL1}")
          (number "66")
        )
        (pin input line (at -22.86 -39.37 0) (length 2.54)
          (name "~{IPL2}")
          (number "67")
        )
        (pin power_in line (at 8.89 -55.88 90) (length 2.54)
          (name "GND")
          (number "68")
        )
        (pin power_in line (at 6.35 -55.88 90) (length 2.54)
          (name "GND")
          (number "69")
        )
        (pin power_in line (at -7.62 44.45 270) (length 2.54)
          (name "Vcc")
          (number "7")
        )
        (pin power_in line (at 2.54 44.45 270) (length 2.54)
          (name "Vcc")
          (number "70")
        )
        (pin power_in line (at 5.08 44.45 270) (length 2.54)
          (name "Vcc")
          (number "71")
        )
        (pin power_in line (at 11.43 -55.88 90) (length 2.54)
          (name "GND")
          (number "72")
        )
        (pin output line (at 25.4 34.29 180) (length 2.54)
          (name "A2")
          (number "73")
        )
        (pin output line (at 25.4 31.75 180) (length 2.54)
          (name "A3")
          (number "74")
        )
        (pin output line (at 25.4 29.21 180) (length 2.54)
          (name "A4")
          (number "75")
        )
        (pin output line (at 25.4 26.67 180) (length 2.54)
          (name "A5")
          (number "76")
        )
        (pin output line (at 25.4 24.13 180) (length 2.54)
          (name "A6")
          (number "77")
        )
        (pin output line (at 25.4 21.59 180) (length 2.54)
          (name "A7")
          (number "78")
        )
        (pin power_in line (at -5.08 44.45 270) (length 2.54)
          (name "Vcc")
          (number "8")
        )
        (pin output line (at 25.4 19.05 180) (length 2.54)
          (name "A8")
          (number "80")
        )
        (pin output line (at 25.4 16.51 180) (length 2.54)
          (name "A9")
          (number "81")
        )
        (pin output line (at 25.4 13.97 180) (length 2.54)
          (name "A10")
          (number "82")
        )
        (pin output line (at 25.4 11.43 180) (length 2.54)
          (name "A11")
          (number "83")
        )
        (pin output line (at 25.4 8.89 180) (length 2.54)
          (name "A12")
          (number "84")
        )
        (pin output line (at 25.4 6.35 180) (length 2.54)
          (name "A13")
          (number "85")
        )
        (pin output line (at 25.4 3.81 180) (length 2.54)
          (name "A14")
          (number "86")
        )
        (pin output line (at 25.4 1.27 180) (length 2.54)
          (name "A15")
          (number "87")
        )
        (pin output line (at 25.4 -1.27 180) (length 2.54)
          (name "A16")
          (number "88")
        )
        (pin power_in line (at 13.97 -55.88 90) (length 2.54)
          (name "GND")
          (number "89")
        )
        (pin output line (at -22.86 7.62 0) (length 2.54)
          (name "~{RMC}")
          (number "9")
        )
        (pin power_in line (at 7.62 44.45 270) (length 2.54)
          (name "Vcc")
          (number "90")
        )
        (pin output line (at 25.4 -3.81 180) (length 2.54)
          (name "A17")
          (number "91")
        )
        (pin output line (at 25.4 -6.35 180) (length 2.54)
          (name "A18")
          (number "92")
        )
        (pin output line (at 25.4 -8.89 180) (length 2.54)
          (name "A19")
          (number "93")
        )
        (pin output line (at 25.4 -11.43 180) (length 2.54)
          (name "A20")
          (number "94")
        )
        (pin output line (at 25.4 -13.97 180) (length 2.54)
          (name "A21")
          (number "95")
        )
        (pin output line (at 25.4 -16.51 180) (length 2.54)
          (name "A22")
          (number "96")
        )
        (pin output line (at 25.4 -19.05 180) (length 2.54)
          (name "A23")
          (number "97")
        )
        (pin output line (at 25.4 36.83 180) (length 2.54)
          (name "A1")
          (number "98")
        )
        (pin output line (at 25.4 39.37 180) (length 2.54)
          (name "A0")
          (number "99")
        )
      )
    )
    (symbol "Switch:SW_Push" (pin_numbers hide) (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "SW" (at 1.27 2.54 0))
      (property "Value" "SW_Push" (at 0 -1.524 0))
      (property "Footprint" "" (at 0 5.08 0))
      (property "Datasheet" "~" (at 0 5.08 0))
      (property "ki_keywords" "switch normally-open pushbutton push-button" (at 0 0 0))
      (property "ki_description" "Push button switch, generic, two pins" (at 0 0 0))
      (symbol "SW_Push_0_1"
        (circle (center -2.032 0) (radius 0.508)
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 1.27)
            (xy 0 3.048)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 1.27)
            (xy -2.54 1.27)
          )
          (fill (type none))
        )
        (circle (center 2.032 0) (radius 0.508)
          (fill (type none))
        )
        (pin passive line (at -5.08 0 0) (length 2.54)
          (name "1")
          (number "1")
        )
        (pin passive line (at 5.08 0 180) (length 2.54)
          (name "2")
          (number "2")
        )
      )
    )
    (symbol "power:+5V" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -3.81 0))
      (property "Value" "+5V" (at 0 3.556 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"+5V\"" (at 0 0 0))
      (symbol "+5V_0_1"
        (polyline
          (pts
            (xy -0.762 1.27)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.54)
            (xy 0.762 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "+5V_1_1"
        (pin power_in line (at 0 0 90) (length 0) hide
          (name "+5V")
          (number "1")
        )
      )
    )
    (symbol "power:GND" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -6.35 0))
      (property "Value" "GND" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"GND\" , ground" (at 0 0 0))
      (symbol "GND_0_1"
        (polyline
          (pts
            (xy 0 0)
            (xy 0 -1.27)
            (xy 1.27 -1.27)
            (xy 0 -2.54)
            (xy -1.27 -1.27)
            (xy 0 -1.27)
          )
          (fill (type none))
        )
      )
      (symbol "GND_1_1"
        (pin power_in line (at 0 0 270) (length 0) hide
          (name "GND")
          (number "1")
        )
      )
    )
  )
  (junction (at 80.01 92.71) (diameter 0) (color 0 0 0 0))
  (junction (at 40.64 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 101.6 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 191.77 143.51) (diameter 0) (color 0 0 0 0))
  (junction (at 191.77 138.43) (diameter 0) (color 0 0 0 0))
  (junction (at 146.05 27.94) (diameter 0) (color 0 0 0 0))
  (junction (at 152.4 148.59) (diameter 0) (color 0 0 0 0))
  (junction (at 40.64 59.69) (diameter 0) (color 0 0 0 0))
  (junction (at 40.64 162.56) (diameter 0) (color 0 0 0 0))
  (junction (at 165.1 66.04) (diameter 0) (color 0 0 0 0))
  (junction (at 146.05 20.32) (diameter 0) (color 0 0 0 0))
  (junction (at 93.98 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 191.77 140.97) (diameter 0) (color 0 0 0 0))
  (junction (at 80.01 105.41) (diameter 0) (color 0 0 0 0))
  (junction (at 105.41 20.32) (diameter 0) (color 0 0 0 0))
  (junction (at 157.48 27.94) (diameter 0) (color 0 0 0 0))
  (junction (at 102.87 24.13) (diameter 0) (color 0 0 0 0))
  (junction (at 105.41 24.13) (diameter 0) (color 0 0 0 0))
  (junction (at 80.01 82.55) (diameter 0) (color 0 0 0 0))
  (junction (at 165.1 135.89) (diameter 0) (color 0 0 0 0))
  (junction (at 109.22 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 116.84 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 165.1 121.92) (diameter 0) (color 0 0 0 0))
  (junction (at 100.33 24.13) (diameter 0) (color 0 0 0 0))
  (junction (at 107.95 24.13) (diameter 0) (color 0 0 0 0))
  (junction (at 96.52 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 138.43 114.3) (diameter 0) (color 0 0 0 0))
  (junction (at 60.96 76.2) (diameter 0) (color 0 0 0 0))
  (junction (at 77.47 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 114.3 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 99.06 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 55.88 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 80.01 97.79) (diameter 0) (color 0 0 0 0))
  (junction (at 110.49 24.13) (diameter 0) (color 0 0 0 0))
  (junction (at 157.48 20.32) (diameter 0) (color 0 0 0 0))
  (junction (at 40.64 137.16) (diameter 0) (color 0 0 0 0))
  (junction (at 104.14 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 111.76 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 119.38 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 69.85 68.58) (diameter 0) (color 0 0 0 0))
  (junction (at 165.1 163.83) (diameter 0) (color 0 0 0 0))
  (junction (at 106.68 124.46) (diameter 0) (color 0 0 0 0))
  (junction (at 152.4 135.89) (diameter 0) (color 0 0 0 0))
  (no_connect (at 130.81 87.63))
  (no_connect (at 130.81 82.55))
  (no_connect (at 82.55 74.93))
  (no_connect (at 175.26 153.67))
  (no_connect (at 173.99 110.49))
  (no_connect (at 175.26 156.21))
  (no_connect (at 82.55 49.53))
  (no_connect (at 175.26 158.75))
  (no_connect (at 82.55 77.47))
  (no_connect (at 175.26 151.13))
  (no_connect (at 173.99 113.03))
  (no_connect (at 82.55 46.99))
  (no_connect (at 82.55 60.96))
  (no_connect (at 130.81 85.09))
  (no_connect (at 82.55 31.75))
  (no_connect (at 175.26 148.59))
  (wire (pts (xy 130.81 29.21) (xy 134.62 29.21)))
  (wire (pts (xy 173.99 87.63) (xy 177.8 87.63)))
  (wire (pts (xy 130.81 80.01) (xy 137.16 80.01)))
  (wire (pts (xy 137.16 85.09) (xy 154.94 85.09)))
  (wire (pts (xy 191.77 128.27) (xy 191.77 138.43)))
  (wire (pts (xy 130.81 110.49) (xy 133.35 110.49)))
  (wire (pts (xy 154.94 151.13) (xy 152.4 151.13)))
  (wire (pts (xy 146.05 27.94) (xy 146.05 29.21)))
  (wire (pts (xy 110.49 24.13) (xy 113.03 24.13)))
  (wire (pts (xy 175.26 143.51) (xy 179.07 143.51)))
  (wire (pts (xy 102.87 24.13) (xy 105.41 24.13)))
  (wire (pts (xy 173.99 82.55) (xy 177.8 82.55)))
  (wire (pts (xy 130.81 31.75) (xy 134.62 31.75)))
  (wire (pts (xy 130.81 49.53) (xy 134.62 49.53)))
  (wire (pts (xy 100.33 24.13) (xy 102.87 24.13)))
  (wire (pts (xy 130.81 105.41) (xy 133.35 105.41)))
  (wire (pts (xy 82.55 82.55) (xy 80.01 82.55)))
  (wire (pts (xy 81.28 20.32) (xy 81.28 41.91)))
  (wire (pts (xy 153.67 128.27) (xy 154.94 128.27)))
  (wire (pts (xy 116.84 124.46) (xy 119.38 124.46)))
  (wire (pts (xy 104.14 124.46) (xy 106.68 124.46)))
  (wire (pts (xy 80.01 107.95) (xy 82.55 107.95)))
  (wire (pts (xy 69.85 39.37) (xy 77.47 39.37)))
  (wire (pts (xy 173.99 85.09) (xy 184.15 85.09)))
  (wire (pts (xy 72.39 90.17) (xy 82.55 90.17)))
  (wire (pts (xy 60.96 76.2) (xy 64.77 76.2)))
  (wire (pts (xy 165.1 121.92) (xy 165.1 123.19)))
  (wire (pts (xy 106.68 124.46) (xy 109.22 124.46)))
  (wire (pts (xy 173.99 105.41) (xy 179.07 105.41)))
  (wire (pts (xy 109.22 124.46) (xy 111.76 124.46)))
  (wire (pts (xy 130.81 52.07) (xy 134.62 52.07)))
  (wire (pts (xy 139.7 82.55) (xy 154.94 82.55)))
  (wire (pts (xy 80.01 82.55) (xy 80.01 92.71)))
  (wire (pts (xy 130.81 100.33) (xy 133.35 100.33)))
  (wire (pts (xy 148.59 114.3) (xy 148.59 93.98)))
  (wire (pts (xy 80.01 105.41) (xy 80.01 107.95)))
  (wire (pts (xy 151.13 105.41) (xy 151.13 119.38)))
  (wire (pts (xy 154.94 128.27) (xy 154.94 143.51)))
  (wire (pts (xy 40.64 39.37) (xy 40.64 44.45)))
  (wire (pts (xy 137.16 85.09) (xy 137.16 80.01)))
  (wire (pts (xy 175.26 146.05) (xy 179.07 146.05)))
  (wire (pts (xy 130.81 44.45) (xy 134.62 44.45)))
  (wire (pts (xy 82.55 92.71) (xy 80.01 92.71)))
  (wire (pts (xy 26.67 162.56) (xy 26.67 153.67)))
  (wire (pts (xy 157.48 20.32) (xy 170.18 20.32)))
  (wire (pts (xy 80.01 46.99) (xy 72.39 46.99)))
  (wire (pts (xy 154.94 105.41) (xy 151.13 105.41)))
  (wire (pts (xy 157.48 27.94) (xy 170.18 27.94)))
  (wire (pts (xy 77.47 39.37) (xy 82.55 39.37)))
  (wire (pts (xy 143.51 147.32) (xy 143.51 135.89)))
  (wire (pts (xy 152.4 148.59) (xy 152.4 135.89)))
  (wire (pts (xy 130.81 95.25) (xy 133.35 95.25)))
  (wire (pts (xy 130.81 92.71) (xy 133.35 92.71)))
  (wire (pts (xy 80.01 97.79) (xy 80.01 105.41)))
  (wire (pts (xy 130.81 116.84) (xy 154.94 116.84)))
  (wire (pts (xy 146.05 27.94) (xy 157.48 27.94)))
  (wire (pts (xy 81.28 20.32) (xy 77.47 20.32)))
  (wire (pts (xy 105.41 24.13) (xy 107.95 24.13)))
  (wire (pts (xy 74.93 102.87) (xy 82.55 102.87)))
  (wire (pts (xy 153.67 121.92) (xy 165.1 121.92)))
  (wire (pts (xy 130.81 114.3) (xy 138.43 114.3)))
  (wire (pts (xy 72.39 46.99) (xy 72.39 68.58)))
  (wire (pts (xy 82.55 97.79) (xy 80.01 97.79)))
  (wire (pts (xy 111.76 124.46) (xy 114.3 124.46)))
  (wire (pts (xy 191.77 140.97) (xy 196.85 140.97)))
  (wire (pts (xy 130.81 41.91) (xy 134.62 41.91)))
  (wire (pts (xy 72.39 68.58) (xy 69.85 68.58)))
  (wire (pts (xy 81.28 41.91) (xy 82.55 41.91)))
  (wire (pts (xy 130.81 77.47) (xy 139.7 77.47)))
  (wire (pts (xy 143.51 163.83) (xy 165.1 163.83)))
  (wire (pts (xy 130.81 119.38) (xy 151.13 119.38)))
  (wire (pts (xy 55.88 25.4) (xy 57.15 25.4)))
  (wire (pts (xy 91.44 124.46) (xy 93.98 124.46)))
  (wire (pts (xy 40.64 162.56) (xy 26.67 162.56)))
  (wire (pts (xy 105.41 20.32) (xy 105.41 24.13)))
  (wire (pts (xy 143.51 154.94) (xy 143.51 163.83)))
  (wire (pts (xy 36.83 39.37) (xy 40.64 39.37)))
  (wire (pts (xy 138.43 114.3) (xy 148.59 114.3)))
  (wire (pts (xy 130.81 72.39) (xy 134.62 72.39)))
  (wire (pts (xy 130.81 59.69) (xy 134.62 59.69)))
  (wire (pts (xy 130.81 62.23) (xy 134.62 62.23)))
  (wire (pts (xy 130.81 67.31) (xy 134.62 67.31)))
  (wire (pts (xy 153.67 66.04) (xy 165.1 66.04)))
  (wire (pts (xy 173.99 90.17) (xy 184.15 90.17)))
  (wire (pts (xy 40.64 59.69) (xy 40.64 62.23)))
  (wire (pts (xy 96.52 124.46) (xy 99.06 124.46)))
  (wire (pts (xy 54.61 39.37) (xy 55.88 39.37)))
  (wire (pts (xy 148.59 93.98) (xy 154.94 93.98)))
  (wire (pts (xy 130.81 54.61) (xy 134.62 54.61)))
  (wire (pts (xy 99.06 124.46) (xy 101.6 124.46)))
  (wire (pts (xy 26.67 59.69) (xy 40.64 59.69)))
  (wire (pts (xy 80.01 36.83) (xy 80.01 46.99)))
  (wire (pts (xy 175.26 140.97) (xy 179.07 140.97)))
  (wire (pts (xy 130.81 74.93) (xy 134.62 74.93)))
  (wire (pts (xy 26.67 39.37) (xy 26.67 59.69)))
  (wire (pts (xy 93.98 124.46) (xy 96.52 124.46)))
  (wire (pts (xy 143.51 135.89) (xy 152.4 135.89)))
  (wire (pts (xy 130.81 39.37) (xy 134.62 39.37)))
  (wire (pts (xy 101.6 124.46) (xy 104.14 124.46)))
  (wire (pts (xy 153.67 107.95) (xy 153.67 121.92)))
  (wire (pts (xy 139.7 77.47) (xy 139.7 82.55)))
  (wire (pts (xy 105.41 20.32) (xy 146.05 20.32)))
  (wire (pts (xy 130.81 97.79) (xy 133.35 97.79)))
  (wire (pts (xy 146.05 20.32) (xy 157.48 20.32)))
  (wire (pts (xy 104.14 124.46) (xy 104.14 130.81)))
  (wire (pts (xy 191.77 138.43) (xy 191.77 140.97)))
  (wire (pts (xy 26.67 137.16) (xy 26.67 146.05)))
  (wire (pts (xy 191.77 143.51) (xy 191.77 146.05)))
  (wire (pts (xy 76.2 85.09) (xy 82.55 85.09)))
  (wire (pts (xy 40.64 30.48) (xy 40.64 39.37)))
  (wire (pts (xy 114.3 124.46) (xy 116.84 124.46)))
  (wire (pts (xy 165.1 63.5) (xy 165.1 66.04)))
  (wire (pts (xy 152.4 135.89) (xy 165.1 135.89)))
  (wire (pts (xy 40.64 137.16) (xy 26.67 137.16)))
  (wire (pts (xy 130.81 36.83) (xy 134.62 36.83)))
  (wire (pts (xy 130.81 107.95) (xy 133.35 107.95)))
  (wire (pts (xy 97.79 24.13) (xy 100.33 24.13)))
  (wire (pts (xy 138.43 114.3) (xy 138.43 128.27)))
  (wire (pts (xy 165.1 66.04) (xy 165.1 77.47)))
  (wire (pts (xy 152.4 151.13) (xy 152.4 148.59)))
  (wire (pts (xy 173.99 107.95) (xy 185.42 107.95)))
  (wire (pts (xy 191.77 140.97) (xy 191.77 143.51)))
  (wire (pts (xy 130.81 34.29) (xy 134.62 34.29)))
  (wire (pts (xy 154.94 148.59) (xy 152.4 148.59)))
  (wire (pts (xy 69.85 66.04) (xy 69.85 68.58)))
  (wire (pts (xy 80.01 92.71) (xy 80.01 97.79)))
  (wire (pts (xy 107.95 24.13) (xy 110.49 24.13)))
  (wire (pts (xy 154.94 107.95) (xy 153.67 107.95)))
  (wire (pts (xy 130.81 69.85) (xy 134.62 69.85)))
  (wire (pts (xy 82.55 105.41) (xy 80.01 105.41)))
  (wire (pts (xy 119.38 124.46) (xy 121.92 124.46)))
  (wire (pts (xy 55.88 25.4) (xy 55.88 39.37)))
  (wire (pts (xy 82.55 36.83) (xy 80.01 36.83)))
  (wire (pts (xy 77.47 29.21) (xy 77.47 39.37)))
  (wire (pts (xy 130.81 57.15) (xy 134.62 57.15)))
  (wire (pts (xy 130.81 46.99) (xy 134.62 46.99)))
  (wire (pts (xy 130.81 64.77) (xy 134.62 64.77)))
  (wire (pts (xy 130.81 102.87) (xy 133.35 102.87)))
  (global_label "~{WR}" (shape output) (at 179.07 105.41 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 184.6972 105.41 0))
  )
  (global_label "D24" (shape bidirectional) (at 133.35 92.71 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 92.71 0))
  )
  (global_label "FC2" (shape output) (at 82.55 52.07 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 76.0761 52.07 0))
  )
  (global_label "CLK" (shape input) (at 154.94 156.21 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 148.4661 156.21 0))
  )
  (global_label "~{DSACK0}" (shape output) (at 212.09 140.97 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 222.3134 140.97 0))
  )
  (global_label "~{RD}" (shape output) (at 185.42 107.95 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 190.8658 107.95 0))
  )
  (global_label "A8" (shape output) (at 134.62 49.53 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 49.53 0))
  )
  (global_label "~{RESET}" (shape bidirectional) (at 77.47 29.21 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 67.7078 29.21 0))
  )
  (global_label "~{CS_IDE}" (shape output) (at 177.8 87.63 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 187.1767 87.63 0))
  )
  (global_label "A1" (shape output) (at 134.62 31.75 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 31.75 0))
  )
  (global_label "A12" (shape output) (at 134.62 59.69 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 59.69 0))
  )
  (global_label "A4" (shape output) (at 134.62 39.37 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 39.37 0))
  )
  (global_label "A10" (shape output) (at 134.62 54.61 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 54.61 0))
  )
  (global_label "A5" (shape output) (at 134.62 41.91 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 41.91 0))
  )
  (global_label "A3" (shape output) (at 134.62 36.83 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 36.83 0))
  )
  (global_label "R3 VCC" (shape input) (at 40.64 30.48 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 30.6585 30.48 0))
  )
  (global_label "A13" (shape output) (at 134.62 62.23 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 62.23 0))
  )
  (global_label "A0" (shape output) (at 134.62 29.21 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 29.21 0))
  )
  (global_label "D25" (shape bidirectional) (at 133.35 95.25 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 95.25 0))
  )
  (global_label "A2" (shape output) (at 134.62 34.29 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 34.29 0))
  )
  (global_label "UART_INT" (shape input) (at 59.69 102.87 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 48.257 102.87 0))
  )
  (global_label "RESET" (shape output) (at 57.15 25.4 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 65.8009 25.4 0))
  )
  (global_label "A15" (shape output) (at 134.62 67.31 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 67.31 0))
  )
  (global_label "D29" (shape bidirectional) (at 133.35 105.41 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 105.41 0))
  )
  (global_label "A14" (shape output) (at 134.62 64.77 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 64.77 0))
  )
  (global_label "A18" (shape output) (at 134.62 74.93 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 74.93 0))
  )
  (global_label "D27" (shape bidirectional) (at 133.35 100.33 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 100.33 0))
  )
  (global_label "~{CS_ROM}" (shape output) (at 177.8 82.55 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 188.2048 82.55 0))
  )
  (global_label "A7" (shape output) (at 134.62 46.99 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 46.99 0))
  )
  (global_label "~{DSACK0}" (shape input) (at 72.39 90.17 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 62.1666 90.17 0))
  )
  (global_label "D30" (shape bidirectional) (at 133.35 107.95 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 107.95 0))
  )
  (global_label "A6" (shape output) (at 134.62 44.45 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 44.45 0))
  )
  (global_label "CLK" (shape input) (at 72.39 68.58 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 78.8639 68.58 0))
  )
  (global_label "A16" (shape output) (at 134.62 69.85 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 69.85 0))
  )
  (global_label "R2 VCC" (shape input) (at 191.77 128.27 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 201.7515 128.27 0))
  )
  (global_label "A17" (shape output) (at 134.62 72.39 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 72.39 0))
  )
  (global_label "~{CS_UART}" (shape output) (at 184.15 90.17 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 195.1596 90.17 0))
  )
  (global_label "~{CS_RAM}" (shape output) (at 184.15 85.09 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 194.3129 85.09 0))
  )
  (global_label "D26" (shape bidirectional) (at 133.35 97.79 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 97.79 0))
  )
  (global_label "D28" (shape bidirectional) (at 133.35 102.87 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 102.87 0))
  )
  (global_label "A11" (shape output) (at 134.62 57.15 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0334 57.15 0))
  )
  (global_label "D31" (shape bidirectional) (at 133.35 110.49 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 141.0561 110.49 0))
  )
  (global_label "A9" (shape output) (at 134.62 52.07 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 139.8239 52.07 0))
  )
  (global_label "R5 VCC" (shape input) (at 77.47 20.32 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 67.4885 20.32 0))
  )
  (symbol (lib_id "Device:C_Polarized") (at 40.64 55.88 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C2" (at 44.45 54.356 0))
    (property "Value" "10uF" (at 44.45 56.896 0))
    (property "Footprint" "Capacitor_THT:CP_Radial_D4.0mm_P2.00mm" (at 41.6052 59.69 0))
    (property "Datasheet" "~" (at 40.64 55.88 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 165.1 63.5 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR013" (at 165.1 67.31 0))
    (property "Value" "+5V" (at 165.1 59.69 0))
    (property "Footprint" "" (at 165.1 63.5 0))
    (property "Datasheet" "" (at 165.1 63.5 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR013") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 143.51 151.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C3" (at 147.32 150.495 0))
    (property "Value" "100nF" (at 147.32 153.035 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 144.4752 154.94 0))
    (property "Datasheet" "~" (at 143.51 151.13 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 60.96 76.2 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR05" (at 60.96 82.55 0))
    (property "Value" "GND" (at 60.96 81.28 0))
    (property "Footprint" "" (at 60.96 76.2 0))
    (property "Datasheet" "" (at 60.96 76.2 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR05") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 82.55 29.21 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR08" (at 82.55 33.02 0))
    (property "Value" "+5V" (at 82.55 25.4 0))
    (property "Footprint" "" (at 82.55 29.21 0))
    (property "Datasheet" "" (at 82.55 29.21 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR08") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 40.64 48.26 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R1" (at 43.18 47.625 0))
    (property "Value" "100R" (at 43.18 50.165 0))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 38.862 48.26 90))
    (property "Datasheet" "~" (at 40.64 48.26 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 146.05 29.21 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR011" (at 146.05 35.56 0))
    (property "Value" "GND" (at 146.05 34.29 0))
    (property "Footprint" "" (at 146.05 29.21 0))
    (property "Datasheet" "" (at 146.05 29.21 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR011") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 105.41 20.32 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR010" (at 105.41 24.13 0))
    (property "Value" "+5V" (at 105.41 16.51 0))
    (property "Footprint" "" (at 105.41 20.32 0))
    (property "Datasheet" "" (at 105.41 20.32 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR010") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Switch:SW_Push") (at 31.75 39.37 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "SW1" (at 31.75 33.02 0))
    (property "Value" "Reset" (at 31.75 35.56 0))
    (property "Footprint" "Button_Switch_THT:KSA_Tactile_SPST" (at 31.75 34.29 0))
    (property "Datasheet" "~" (at 31.75 34.29 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "SW1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 157.48 24.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C6" (at 161.29 23.495 0))
    (property "Value" "100nF" (at 161.29 26.035 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 158.4452 27.94 0))
    (property "Datasheet" "~" (at 157.48 24.13 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 40.64 162.56 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR03" (at 40.64 168.91 0))
    (property "Value" "GND" (at 40.64 167.64 0))
    (property "Footprint" "" (at 40.64 162.56 0))
    (property "Datasheet" "" (at 40.64 162.56 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR03") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 170.18 24.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C7" (at 173.99 23.495 0))
    (property "Value" "100nF" (at 173.99 26.035 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 171.1452 27.94 0))
    (property "Datasheet" "~" (at 170.18 24.13 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 179.07 138.43 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR017" (at 179.07 142.24 0))
    (property "Value" "+5V" (at 179.07 134.62 0))
    (property "Footprint" "" (at 179.07 138.43 0))
    (property "Datasheet" "" (at 179.07 138.43 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR017") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 40.64 62.23 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR01" (at 40.64 68.58 0))
    (property "Value" "GND" (at 40.64 67.31 0))
    (property "Footprint" "" (at 40.64 62.23 0))
    (property "Datasheet" "" (at 40.64 62.23 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR01") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 48.26 39.37 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 48.26 31.75 0))
    (property "Value" "74HC14" (at 48.26 34.29 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 48.26 39.37 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 48.26 39.37 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 80.01 82.55 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR07" (at 80.01 86.36 0))
    (property "Value" "+5V" (at 80.01 78.74 0))
    (property "Footprint" "" (at 80.01 82.55 0))
    (property "Datasheet" "" (at 80.01 82.55 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR07") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 26.67 149.86 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C1" (at 29.21 148.59 0))
    (property "Value" "100nF" (at 29.21 151.13 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 27.6352 153.67 0))
    (property "Datasheet" "~" (at 26.67 149.86 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "SVW_custom_lib:MC68EC020") (at 105.41 68.58 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "CPU1" (at 114.9859 25.4 0))
    (property "Value" "MC68EC020" (at 87.63 63.5 0))
    (property "Footprint" "Package_QFP:PQFP-100_14x20mm_P0.65mm" (at 87.63 63.5 0))
    (property "Datasheet" "" (at 87.63 63.5 0))
    (pin "1")
    (pin "10")
    (pin "100")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "20")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "29")
    (pin "3")
    (pin "30")
    (pin "31")
    (pin "32")
    (pin "33")
    (pin "34")
    (pin "4")
    (pin "43")
    (pin "44")
    (pin "5")
    (pin "57")
    (pin "58")
    (pin "59")
    (pin "6")
    (pin "65")
    (pin "66")
    (pin "67")
    (pin "68")
    (pin "69")
    (pin "7")
    (pin "70")
    (pin "71")
    (pin "72")
    (pin "73")
    (pin "74")
    (pin "75")
    (pin "76")
    (pin "77")
    (pin "78")
    (pin "8")
    (pin "80")
    (pin "81")
    (pin "82")
    (pin "83")
    (pin "84")
    (pin "85")
    (pin "86")
    (pin "87")
    (pin "88")
    (pin "89")
    (pin "9")
    (pin "90")
    (pin "91")
    (pin "92")
    (pin "93")
    (pin "94")
    (pin "95")
    (pin "96")
    (pin "97")
    (pin "98")
    (pin "99")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "CPU1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 165.1 123.19 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR014" (at 165.1 129.54 0))
    (property "Value" "GND" (at 165.1 128.27 0))
    (property "Footprint" "" (at 165.1 123.19 0))
    (property "Datasheet" "" (at 165.1 123.19 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR014") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 165.1 163.83 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR016" (at 165.1 170.18 0))
    (property "Value" "GND" (at 165.1 168.91 0))
    (property "Footprint" "" (at 165.1 163.83 0))
    (property "Datasheet" "" (at 165.1 163.83 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR016") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 104.14 130.81 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR09" (at 104.14 137.16 0))
    (property "Value" "GND" (at 104.14 135.89 0))
    (property "Footprint" "" (at 104.14 130.81 0))
    (property "Datasheet" "" (at 104.14 130.81 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR09") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 40.64 149.86 0) (unit 7)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 46.99 149.225 0))
    (property "Value" "74HC14" (at 46.99 151.765 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 40.64 149.86 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 40.64 149.86 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 7)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_02x04_Odd_Even") (at 184.15 140.97 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J1" (at 185.42 133.35 0))
    (property "Value" "Wait state" (at 185.42 135.89 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_2x04_P2.54mm_Vertical" (at 184.15 140.97 0))
    (property "Datasheet" "~" (at 184.15 140.97 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC164") (at 165.1 148.59 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U3" (at 167.0559 134.62 0))
    (property "Value" "74HC164" (at 167.0559 137.16 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 187.96 156.21 0))
    (property "Datasheet" "https://assets.nexperia.com/documents/data-sheet/74HC_HCT164.pdf" (at 187.96 156.21 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 204.47 140.97 0) (unit 6)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 204.47 133.35 0))
    (property "Value" "74HC14" (at 204.47 135.89 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 204.47 140.97 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 204.47 140.97 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 6)
        )
      )
    )
  )
  (symbol (lib_id "Oscillator:ACO-xxxMHz") (at 62.23 68.58 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "X1" (at 69.85 59.69 0))
    (property "Value" "16MHz" (at 71.12 62.23 0))
    (property "Footprint" "Oscillator:Oscillator_DIP-8+DIP-14_LargePads_SVW" (at 73.66 77.47 0))
    (property "Datasheet" "http://www.conwin.com/datasheets/cx/cx030.pdf" (at 59.69 68.58 0))
    (pin "1")
    (pin "11")
    (pin "14")
    (pin "4")
    (pin "7")
    (pin "8")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "X1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 146.05 24.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C4" (at 149.86 23.495 0))
    (property "Value" "100nF" (at 149.86 26.035 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 147.0152 27.94 0))
    (property "Datasheet" "~" (at 146.05 24.13 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 153.67 69.85 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C5" (at 157.48 69.215 0))
    (property "Value" "100nF" (at 157.48 71.755 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 154.6352 73.66 0))
    (property "Datasheet" "~" (at 153.67 69.85 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 165.1 135.89 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR015" (at 165.1 139.7 0))
    (property "Value" "+5V" (at 165.1 132.08 0))
    (property "Footprint" "" (at 165.1 135.89 0))
    (property "Datasheet" "" (at 165.1 135.89 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR015") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 67.31 102.87 0) (unit 4)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 67.31 95.25 0))
    (property "Value" "74HC14" (at 67.31 97.79 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 67.31 102.87 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 67.31 102.87 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 4)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 40.64 137.16 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR02" (at 40.64 140.97 0))
    (property "Value" "+5V" (at 40.64 133.35 0))
    (property "Footprint" "" (at 40.64 137.16 0))
    (property "Datasheet" "" (at 40.64 137.16 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR02") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 146.05 128.27 0) (unit 5)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 146.05 120.65 0))
    (property "Value" "74HC14" (at 146.05 123.19 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 146.05 128.27 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 146.05 128.27 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 5)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 60.96 60.96 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR04" (at 60.96 64.77 0))
    (property "Value" "+5V" (at 60.96 57.15 0))
    (property "Footprint" "" (at 60.96 60.96 0))
    (property "Datasheet" "" (at 60.96 60.96 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR04") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "SVW_custom_lib:74HC139") (at 165.1 88.9 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U2" (at 167.0559 76.2 0))
    (property "Value" "74HC139" (at 167.0559 78.74 0))
    (property "Footprint" "Package_DIP:DIP-16_W7.62mm_Socket_LongPads" (at 165.1 88.9 0))
    (property "Datasheet" "" (at 165.1 88.9 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 62.23 39.37 0) (unit 2)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 62.23 31.75 0))
    (property "Value" "74HC14" (at 62.23 34.29 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 62.23 39.37 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 62.23 39.37 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 2)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 76.2 85.09 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "#PWR06" (at 76.2 91.44 0))
    (property "Value" "GND" (at 76.2 88.9 0))
    (property "Footprint" "" (at 76.2 85.09 0))
    (property "Datasheet" "" (at 76.2 85.09 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR06") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 153.67 73.66 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR012" (at 153.67 80.01 0))
    (property "Value" "GND" (at 153.67 78.74 0))
    (property "Footprint" "" (at 153.67 73.66 0))
    (property "Datasheet" "" (at 153.67 73.66 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR012") (unit 1)
        )
      )
    )
  )
  (sheet (at 80.01 167.64) (size 35.56 12.7) (fields_autoplaced)
    (fill (color 0 0 0 0.0000))
    (property "Sheetname" "ROM + RAM" (at 80.01 166.9284 0))
    (property "Sheetfile" "ROM_RAM.kicad_sch" (at 80.01 180.9246 0))
    (instances
      (project "MC68EC020_SBC"
        (path (page "2"))
      )
    )
  )
  (sheet (at 119.38 167.64) (size 31.75 11.43) (fields_autoplaced)
    (fill (color 0 0 0 0.0000))
    (property "Sheetname" "UART + IO" (at 119.38 166.9284 0))
    (property "Sheetfile" "UAR_IO.kicad_sch" (at 119.38 179.6546 0))
    (property "Field2" "" (at 119.38 167.64 0))
    (instances
      (project "MC68EC020_SBC"
        (path (page "3"))
      )
    )
  )
  (sheet_instances
    (path (page "1"))
  )
)
