(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "EC020-SBC")
    (date "2023-11-23")
    (rev "V0.12")
    (company "SVDW")
    (comment 1 "UART + IO + power supply")
  )
  (lib_symbols
    (symbol "74xx:74HC14" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 1.27 0))
      (property "Value" "74HC14" (at 0 -1.27 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "HCMOS not inverter" (at 0 0 0))
      (property "ki_description" "Hex inverter schmitt trigger" (at 0 0 0))
      (property "ki_fp_filters" "DIP*W7.62mm*" (at 0 0 0))
      (symbol "74HC14_1_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "1")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "2")
        )
      )
      (symbol "74HC14_1_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_2_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "3")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "4")
        )
      )
      (symbol "74HC14_2_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_3_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "5")
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "6")
        )
      )
      (symbol "74HC14_3_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_4_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "8")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "9")
        )
      )
      (symbol "74HC14_4_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_5_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "10")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "11")
        )
      )
      (symbol "74HC14_5_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_6_0"
        (polyline
          (pts
            (xy -3.81 3.81)
            (xy -3.81 -3.81)
            (xy 3.81 0)
            (xy -3.81 3.81)
          )
          (fill (type background))
        )
        (pin output inverted (at 7.62 0 180) (length 3.81)
          (name "~")
          (number "12")
        )
        (pin input line (at -7.62 0 0) (length 3.81)
          (name "~")
          (number "13")
        )
      )
      (symbol "74HC14_6_1"
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
            (xy -0.635 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -1.27)
            (xy -0.635 -1.27)
            (xy -0.635 1.27)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "74HC14_7_0"
        (pin power_in line (at 0 12.7 270) (length 5.08)
          (name "VCC")
          (number "14")
        )
        (pin power_in line (at 0 -12.7 90) (length 5.08)
          (name "GND")
          (number "7")
        )
      )
      (symbol "74HC14_7_1"
        (rectangle (start -5.08 7.62) (end 5.08 -7.62)
          (fill (type background))
        )
      )
    )
    (symbol "Connector:Conn_01x01_Pin" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 2.54 0))
      (property "Value" "Conn_01x01_Pin" (at 0 -2.54 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x01, script generated" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x01_Pin_1_1"
        (polyline
          (pts
            (xy 1.27 0)
            (xy 0.8636 0)
          )
          (fill (type none))
        )
        (rectangle (start 0.8636 0.127) (end 0 -0.127)
          (fill (type outline))
        )
        (pin passive line (at 5.08 0 180) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
      )
    )
    (symbol "Connector:Conn_01x02_Pin" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 2.54 0))
      (property "Value" "Conn_01x02_Pin" (at 0 -5.08 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x02, script generated" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x02_Pin_1_1"
        (polyline
          (pts
            (xy 1.27 -2.54)
            (xy 0.8636 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 0)
            (xy 0.8636 0)
          )
          (fill (type none))
        )
        (rectangle (start 0.8636 -2.413) (end 0 -2.667)
          (fill (type outline))
        )
        (rectangle (start 0.8636 0.127) (end 0 -0.127)
          (fill (type outline))
        )
        (pin passive line (at 5.08 0 180) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at 5.08 -2.54 180) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x03" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x03" (at 0 -5.08 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x03, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x03_1_1"
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 3.81) (end 1.27 -3.81)
          (fill (type background))
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x05" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 7.62 0))
      (property "Value" "Conn_01x05" (at 0 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x05, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x05_1_1"
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 5.207) (end 0 4.953)
          (fill (type none))
        )
        (rectangle (start -1.27 6.35) (end 1.27 -6.35)
          (fill (type background))
        )
        (pin passive line (at -5.08 5.08 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x06" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 7.62 0))
      (property "Value" "Conn_01x06" (at 0 -10.16 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x06_1_1"
        (rectangle (start -1.27 -7.493) (end 0 -7.747)
          (fill (type none))
        )
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 5.207) (end 0 4.953)
          (fill (type none))
        )
        (rectangle (start -1.27 6.35) (end 1.27 -8.89)
          (fill (type background))
        )
        (pin passive line (at -5.08 5.08 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
        (pin passive line (at -5.08 -7.62 0) (length 3.81)
          (name "Pin_6")
          (number "6")
        )
      )
    )
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:Crystal" (pin_numbers hide) (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "Y" (at 0 3.81 0))
      (property "Value" "Crystal" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "quartz ceramic resonator oscillator" (at 0 0 0))
      (property "ki_description" "Two pin crystal" (at 0 0 0))
      (property "ki_fp_filters" "Crystal*" (at 0 0 0))
      (symbol "Crystal_0_1"
        (rectangle (start -1.143 2.54) (end 1.143 -2.54)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 0)
            (xy -1.905 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.905 -1.27)
            (xy 1.905 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 0)
            (xy 1.905 0)
          )
          (fill (type none))
        )
      )
      (symbol "Crystal_1_1"
        (pin passive line (at -3.81 0 0) (length 1.27)
          (name "1")
          (number "1")
        )
        (pin passive line (at 3.81 0 180) (length 1.27)
          (name "2")
          (number "2")
        )
      )
    )
    (symbol "Device:LED" (pin_numbers hide) (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "D" (at 0 2.54 0))
      (property "Value" "LED" (at 0 -2.54 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "LED diode" (at 0 0 0))
      (property "ki_description" "Light emitting diode" (at 0 0 0))
      (property "ki_fp_filters" "LED* LED_SMD:* LED_THT:*" (at 0 0 0))
      (symbol "LED_0_1"
        (polyline
          (pts
            (xy -1.27 -1.27)
            (xy -1.27 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 0)
            (xy 1.27 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 -1.27)
            (xy 1.27 1.27)
            (xy -1.27 0)
            (xy 1.27 -1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -3.048 -0.762)
            (xy -4.572 -2.286)
            (xy -3.81 -2.286)
            (xy -4.572 -2.286)
            (xy -4.572 -1.524)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 -0.762)
            (xy -3.302 -2.286)
            (xy -2.54 -2.286)
            (xy -3.302 -2.286)
            (xy -3.302 -1.524)
          )
          (fill (type none))
        )
      )
      (symbol "LED_1_1"
        (pin passive line (at -3.81 0 0) (length 2.54)
          (name "K")
          (number "1")
        )
        (pin passive line (at 3.81 0 180) (length 2.54)
          (name "A")
          (number "2")
        )
      )
    )
    (symbol "Device:Polyfuse_Small" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "F" (at -1.905 0 90))
      (property "Value" "Polyfuse_Small" (at 1.905 0 90))
      (property "Footprint" "" (at 1.27 -5.08 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "resettable fuse PTC PPTC polyfuse polyswitch" (at 0 0 0))
      (property "ki_description" "Resettable fuse, polymeric positive temperature coefficient, small symbol" (at 0 0 0))
      (property "ki_fp_filters" "*polyfuse* *PTC*" (at 0 0 0))
      (symbol "Polyfuse_Small_0_1"
        (rectangle (start -0.508 1.27) (end 0.508 -1.27)
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.54)
            (xy 0 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.016 1.27)
            (xy -1.016 0.762)
            (xy 1.016 -0.762)
            (xy 1.016 -1.27)
          )
          (fill (type none))
        )
      )
      (symbol "Polyfuse_Small_1_1"
        (pin passive line (at 0 2.54 270) (length 0.635)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -2.54 90) (length 0.635)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:R" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.032 0 90))
      (property "Value" "R" (at 0 0 90))
      (property "Footprint" "" (at -1.778 0 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_0_1"
        (rectangle (start -1.016 -2.54) (end 1.016 2.54)
          (fill (type none))
        )
      )
      (symbol "R_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:R_Network06" (pin_names (offset 0) hide) (in_bom yes) (on_board yes)
      (property "Reference" "RN" (at -10.16 0 90))
      (property "Value" "R_Network06" (at 7.62 0 90))
      (property "Footprint" "Resistor_THT:R_Array_SIP7" (at 9.525 0 90))
      (property "Datasheet" "http://www.vishay.com/docs/31509/csc.pdf" (at 0 0 0))
      (property "ki_keywords" "R network star-topology" (at 0 0 0))
      (property "ki_description" "6 resistor network, star topology, bussed resistors, small symbol" (at 0 0 0))
      (property "ki_fp_filters" "R?Array?SIP*" (at 0 0 0))
      (symbol "R_Network06_0_1"
        (rectangle (start -8.89 -3.175) (end 6.35 3.175)
          (fill (type background))
        )
        (rectangle (start -8.382 1.524) (end -6.858 -2.54)
          (fill (type none))
        )
        (circle (center -7.62 2.286) (radius 0.254)
          (fill (type outline))
        )
        (rectangle (start -5.842 1.524) (end -4.318 -2.54)
          (fill (type none))
        )
        (circle (center -5.08 2.286) (radius 0.254)
          (fill (type outline))
        )
        (rectangle (start -3.302 1.524) (end -1.778 -2.54)
          (fill (type none))
        )
        (circle (center -2.54 2.286) (radius 0.254)
          (fill (type outline))
        )
        (rectangle (start -0.762 1.524) (end 0.762 -2.54)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -7.62 -2.54)
            (xy -7.62 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -5.08 -2.54)
            (xy -5.08 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 -2.54)
            (xy -2.54 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 -2.54)
            (xy 0 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 -2.54)
            (xy 2.54 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 5.08 -2.54)
            (xy 5.08 -3.81)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -7.62 1.524)
            (xy -7.62 2.286)
            (xy -5.08 2.286)
            (xy -5.08 1.524)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -5.08 1.524)
            (xy -5.08 2.286)
            (xy -2.54 2.286)
            (xy -2.54 1.524)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 1.524)
            (xy -2.54 2.286)
            (xy 0 2.286)
            (xy 0 1.524)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 1.524)
            (xy 0 2.286)
            (xy 2.54 2.286)
            (xy 2.54 1.524)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 1.524)
            (xy 2.54 2.286)
            (xy 5.08 2.286)
            (xy 5.08 1.524)
          )
          (fill (type none))
        )
        (circle (center 0 2.286) (radius 0.254)
          (fill (type outline))
        )
        (rectangle (start 1.778 1.524) (end 3.302 -2.54)
          (fill (type none))
        )
        (circle (center 2.54 2.286) (radius 0.254)
          (fill (type outline))
        )
        (rectangle (start 4.318 1.524) (end 5.842 -2.54)
          (fill (type none))
        )
      )
      (symbol "R_Network06_1_1"
        (pin passive line (at -7.62 5.08 270) (length 2.54)
          (name "common")
          (number "1")
        )
        (pin passive line (at -7.62 -5.08 90) (length 1.27)
          (name "R1")
          (number "2")
        )
        (pin passive line (at -5.08 -5.08 90) (length 1.27)
          (name "R2")
          (number "3")
        )
        (pin passive line (at -2.54 -5.08 90) (length 1.27)
          (name "R3")
          (number "4")
        )
        (pin passive line (at 0 -5.08 90) (length 1.27)
          (name "R4")
          (number "5")
        )
        (pin passive line (at 2.54 -5.08 90) (length 1.27)
          (name "R5")
          (number "6")
        )
        (pin passive line (at 5.08 -5.08 90) (length 1.27)
          (name "R6")
          (number "7")
        )
      )
    )
    (symbol "Diode:1N4001" (pin_numbers hide) (pin_names hide) (in_bom yes) (on_board yes)
      (property "Reference" "D" (at 0 2.54 0))
      (property "Value" "1N4001" (at 0 -2.54 0))
      (property "Footprint" "Diode_THT:D_DO-41_SOD81_P10.16mm_Horizontal" (at 0 0 0))
      (property "Datasheet" "http://www.vishay.com/docs/88503/1n4001.pdf" (at 0 0 0))
      (property "Sim.Device" "D" (at 0 0 0))
      (property "Sim.Pins" "1=K 2=A" (at 0 0 0))
      (property "ki_keywords" "diode" (at 0 0 0))
      (property "ki_description" "50V 1A General Purpose Rectifier Diode, DO-41" (at 0 0 0))
      (property "ki_fp_filters" "D*DO?41*" (at 0 0 0))
      (symbol "1N4001_0_1"
        (polyline
          (pts
            (xy -1.27 1.27)
            (xy -1.27 -1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 0)
            (xy -1.27 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.27 1.27)
            (xy 1.27 -1.27)
            (xy -1.27 0)
            (xy 1.27 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "1N4001_1_1"
        (pin passive line (at -3.81 0 0) (length 2.54)
          (name "K")
          (number "1")
        )
        (pin passive line (at 3.81 0 180) (length 2.54)
          (name "A")
          (number "2")
        )
      )
    )
    (symbol "Interface_UART:16550" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at -21.59 40.64 0))
      (property "Value" "16550" (at 15.24 40.64 0))
      (property "Footprint" "Package_DIP:DIP-40_W15.24mm" (at 0 0 0))
      (property "Datasheet" "http://www.ti.com/lit/ds/symlink/pc16550d.pdf" (at 0 0 0))
      (property "ki_keywords" "1ch UART FIFO" (at 0 0 0))
      (property "ki_description" "PC16550D, Universal Asynchronous Receiver/Transmitter with FIFOs, PDIP-40" (at 0 0 0))
      (property "ki_fp_filters" "DIP*W15.24mm*" (at 0 0 0))
      (symbol "16550_0_1"
        (rectangle (start -21.59 -39.37) (end 21.59 39.37)
          (fill (type background))
        )
      )
      (symbol "16550_1_1"
        (pin bidirectional line (at -25.4 35.56 0) (length 3.81)
          (name "D0")
          (number "1")
        )
        (pin input line (at 25.4 -5.08 180) (length 3.81)
          (name "SIN")
          (number "10")
        )
        (pin output line (at 25.4 -7.62 180) (length 3.81)
          (name "SOUT")
          (number "11")
        )
        (pin input line (at -25.4 5.08 0) (length 3.81)
          (name "CS0")
          (number "12")
        )
        (pin input line (at -25.4 2.54 0) (length 3.81)
          (name "CS1")
          (number "13")
        )
        (pin input line (at -25.4 0 0) (length 3.81)
          (name "~{CS2}")
          (number "14")
        )
        (pin output line (at 25.4 -30.48 180) (length 3.81)
          (name "~{BAUDOUT}")
          (number "15")
        )
        (pin input line (at -25.4 -5.08 0) (length 3.81)
          (name "XIN")
          (number "16")
        )
        (pin output line (at -25.4 -12.7 0) (length 3.81)
          (name "XOUT")
          (number "17")
        )
        (pin input line (at -25.4 -20.32 0) (length 3.81)
          (name "~{WR}")
          (number "18")
        )
        (pin input line (at -25.4 -22.86 0) (length 3.81)
          (name "WR")
          (number "19")
        )
        (pin bidirectional line (at -25.4 33.02 0) (length 3.81)
          (name "D1")
          (number "2")
        )
        (pin power_in line (at 0 -43.18 90) (length 3.81)
          (name "GND")
          (number "20")
        )
        (pin input line (at -25.4 -27.94 0) (length 3.81)
          (name "~{RD}")
          (number "21")
        )
        (pin input line (at -25.4 -25.4 0) (length 3.81)
          (name "RD")
          (number "22")
        )
        (pin output line (at 25.4 -20.32 180) (length 3.81)
          (name "DDIS")
          (number "23")
        )
        (pin output line (at 25.4 -17.78 180) (length 3.81)
          (name "~{TXRDY}")
          (number "24")
        )
        (pin input line (at -25.4 -30.48 0) (length 3.81)
          (name "~{ADS}")
          (number "25")
        )
        (pin input line (at -25.4 7.62 0) (length 3.81)
          (name "A2")
          (number "26")
        )
        (pin input line (at -25.4 10.16 0) (length 3.81)
          (name "A1")
          (number "27")
        )
        (pin input line (at -25.4 12.7 0) (length 3.81)
          (name "A0")
          (number "28")
        )
        (pin output line (at 25.4 -15.24 180) (length 3.81)
          (name "~{RXRDY}")
          (number "29")
        )
        (pin bidirectional line (at -25.4 30.48 0) (length 3.81)
          (name "D2")
          (number "3")
        )
        (pin output line (at -25.4 -33.02 0) (length 3.81)
          (name "INTR")
          (number "30")
        )
        (pin output line (at 25.4 7.62 180) (length 3.81)
          (name "~{OUT2}")
          (number "31")
        )
        (pin output line (at 25.4 10.16 180) (length 3.81)
          (name "~{RTS}")
          (number "32")
        )
        (pin output line (at 25.4 12.7 180) (length 3.81)
          (name "~{DTR}")
          (number "33")
        )
        (pin output line (at 25.4 15.24 180) (length 3.81)
          (name "~{OUT1}")
          (number "34")
        )
        (pin input line (at -25.4 -35.56 0) (length 3.81)
          (name "MR")
          (number "35")
        )
        (pin input line (at 25.4 22.86 180) (length 3.81)
          (name "~{CTS}")
          (number "36")
        )
        (pin input line (at 25.4 25.4 180) (length 3.81)
          (name "~{DSR}")
          (number "37")
        )
        (pin input line (at 25.4 27.94 180) (length 3.81)
          (name "~{DCD}")
          (number "38")
        )
        (pin input line (at 25.4 30.48 180) (length 3.81)
          (name "~{RI}")
          (number "39")
        )
        (pin bidirectional line (at -25.4 27.94 0) (length 3.81)
          (name "D3")
          (number "4")
        )
        (pin power_in line (at 0 43.18 270) (length 3.81)
          (name "VCC")
          (number "40")
        )
        (pin bidirectional line (at -25.4 25.4 0) (length 3.81)
          (name "D4")
          (number "5")
        )
        (pin bidirectional line (at -25.4 22.86 0) (length 3.81)
          (name "D5")
          (number "6")
        )
        (pin bidirectional line (at -25.4 20.32 0) (length 3.81)
          (name "D6")
          (number "7")
        )
        (pin bidirectional line (at -25.4 17.78 0) (length 3.81)
          (name "D7")
          (number "8")
        )
        (pin input line (at 25.4 -35.56 180) (length 3.81)
          (name "RCLK")
          (number "9")
        )
      )
    )
    (symbol "Regulator_Linear:LM7805_TO220" (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at -3.81 3.175 0))
      (property "Value" "LM7805_TO220" (at 0 3.175 0))
      (property "Footprint" "Package_TO_SOT_THT:TO-220-3_Vertical" (at 0 5.715 0))
      (property "Datasheet" "https://www.onsemi.cn/PowerSolutions/document/MC7800-D.PDF" (at 0 -1.27 0))
      (property "ki_keywords" "Voltage Regulator 1A Positive" (at 0 0 0))
      (property "ki_description" "Positive 1A 35V Linear Regulator, Fixed Output 5V, TO-220" (at 0 0 0))
      (property "ki_fp_filters" "TO?220*" (at 0 0 0))
      (symbol "LM7805_TO220_0_1"
        (rectangle (start -5.08 1.905) (end 5.08 -5.08)
          (fill (type background))
        )
      )
      (symbol "LM7805_TO220_1_1"
        (pin power_in line (at -7.62 0 0) (length 2.54)
          (name "VI")
          (number "1")
        )
        (pin power_in line (at 0 -7.62 90) (length 2.54)
          (name "GND")
          (number "2")
        )
        (pin power_out line (at 7.62 0 180) (length 2.54)
          (name "VO")
          (number "3")
        )
      )
    )
    (symbol "SVW_custom_lib:IDE_44pin" (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 3.81 -1.27 0))
      (property "Value" "" (at 3.81 -1.27 0))
      (property "Footprint" "" (at 3.81 -1.27 0))
      (property "Datasheet" "" (at 3.81 -1.27 0))
      (symbol "IDE_44pin_1_1"
        (rectangle (start -7.62 30.48) (end 7.62 -27.94)
          (fill (type none))
        )
        (pin input line (at -10.16 27.94 0) (length 2.54)
          (name "~{RESET}")
          (number "1")
        )
        (pin bidirectional line (at 10.16 17.78 180) (length 2.54)
          (name "D11")
          (number "10")
        )
        (pin bidirectional line (at -10.16 15.24 0) (length 2.54)
          (name "D3")
          (number "11")
        )
        (pin bidirectional line (at 10.16 15.24 180) (length 2.54)
          (name "D12")
          (number "12")
        )
        (pin bidirectional line (at -10.16 12.7 0) (length 2.54)
          (name "D2")
          (number "13")
        )
        (pin bidirectional line (at 10.16 12.7 180) (length 2.54)
          (name "D13")
          (number "14")
        )
        (pin bidirectional line (at -10.16 10.16 0) (length 2.54)
          (name "D1")
          (number "15")
        )
        (pin bidirectional line (at 10.16 10.16 180) (length 2.54)
          (name "D14")
          (number "16")
        )
        (pin bidirectional line (at -10.16 7.62 0) (length 2.54)
          (name "D0")
          (number "17")
        )
        (pin bidirectional line (at 10.16 7.62 180) (length 2.54)
          (name "D15")
          (number "18")
        )
        (pin power_in line (at -10.16 5.08 0) (length 2.54)
          (name "GND")
          (number "19")
        )
        (pin power_in line (at 10.16 27.94 180) (length 2.54)
          (name "GND")
          (number "2")
        )
        (pin input line (at -10.16 2.54 0) (length 2.54)
          (name "DMARQ")
          (number "21")
        )
        (pin power_in line (at 10.16 2.54 180) (length 2.54)
          (name "GND")
          (number "22")
        )
        (pin input line (at -10.16 0 0) (length 2.54)
          (name "~{DIOW}")
          (number "23")
        )
        (pin power_in line (at 10.16 0 180) (length 2.54)
          (name "GND")
          (number "24")
        )
        (pin input line (at -10.16 -2.54 0) (length 2.54)
          (name "~{DIOR}")
          (number "25")
        )
        (pin power_in line (at 10.16 -2.54 180) (length 2.54)
          (name "GND")
          (number "26")
        )
        (pin output line (at -10.16 -5.08 0) (length 2.54)
          (name "IORDY")
          (number "27")
        )
        (pin output line (at 10.16 -5.08 180) (length 2.54)
          (name "CSEL")
          (number "28")
        )
        (pin input line (at -10.16 -7.62 0) (length 2.54)
          (name "~{DMACK}")
          (number "29")
        )
        (pin bidirectional line (at -10.16 25.4 0) (length 2.54)
          (name "D7")
          (number "3")
        )
        (pin power_in line (at 10.16 -7.62 180) (length 2.54)
          (name "GND")
          (number "30")
        )
        (pin output line (at -10.16 -10.16 0) (length 2.54)
          (name "INTRQ")
          (number "31")
        )
        (pin input line (at 10.16 -10.16 180) (length 2.54)
          (name "~{IOCS16}")
          (number "32")
        )
        (pin input line (at -10.16 -12.7 0) (length 2.54)
          (name "A1")
          (number "33")
        )
        (pin output line (at 10.16 -12.7 180) (length 2.54)
          (name "PDIAG")
          (number "34")
        )
        (pin input line (at -10.16 -15.24 0) (length 2.54)
          (name "A0")
          (number "35")
        )
        (pin input line (at 10.16 -15.24 180) (length 2.54)
          (name "A2")
          (number "36")
        )
        (pin input line (at -10.16 -17.78 0) (length 2.54)
          (name "~{CS0}")
          (number "37")
        )
        (pin input line (at 10.16 -17.78 180) (length 2.54)
          (name "~{CS1}")
          (number "38")
        )
        (pin output line (at -10.16 -20.32 0) (length 2.54)
          (name "~{ACTIVE}")
          (number "39")
        )
        (pin bidirectional line (at 10.16 25.4 180) (length 2.54)
          (name "D8")
          (number "4")
        )
        (pin power_in line (at 10.16 -20.32 180) (length 2.54)
          (name "GND")
          (number "40")
        )
        (pin power_in line (at -10.16 -22.86 0) (length 2.54)
          (name "Vcc")
          (number "41")
        )
        (pin power_in line (at 10.16 -22.86 180) (length 2.54)
          (name "Vcc")
          (number "42")
        )
        (pin power_in line (at -10.16 -25.4 0) (length 2.54)
          (name "GND")
          (number "43")
        )
        (pin input line (at 10.16 -25.4 180) (length 2.54)
          (name "~{TYPE}")
          (number "44")
        )
        (pin bidirectional line (at -10.16 22.86 0) (length 2.54)
          (name "D6")
          (number "5")
        )
        (pin bidirectional line (at 10.16 22.86 180) (length 2.54)
          (name "D9")
          (number "6")
        )
        (pin bidirectional line (at -10.16 20.32 0) (length 2.54)
          (name "D5")
          (number "7")
        )
        (pin bidirectional line (at 10.16 20.32 180) (length 2.54)
          (name "D10")
          (number "8")
        )
        (pin bidirectional line (at -10.16 17.78 0) (length 2.54)
          (name "D4")
          (number "9")
        )
      )
    )
    (symbol "power:+5V" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -3.81 0))
      (property "Value" "+5V" (at 0 3.556 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"+5V\"" (at 0 0 0))
      (symbol "+5V_0_1"
        (polyline
          (pts
            (xy -0.762 1.27)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.54)
            (xy 0.762 1.27)
          )
          (fill (type none))
        )
      )
      (symbol "+5V_1_1"
        (pin power_in line (at 0 0 90) (length 0) hide
          (name "+5V")
          (number "1")
        )
      )
    )
    (symbol "power:GND" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -6.35 0))
      (property "Value" "GND" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "global power" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"GND\" , ground" (at 0 0 0))
      (symbol "GND_0_1"
        (polyline
          (pts
            (xy 0 0)
            (xy 0 -1.27)
            (xy 1.27 -1.27)
            (xy 0 -2.54)
            (xy -1.27 -1.27)
            (xy 0 -1.27)
          )
          (fill (type none))
        )
      )
      (symbol "GND_1_1"
        (pin power_in line (at 0 0 270) (length 0) hide
          (name "GND")
          (number "1")
        )
      )
    )
    (symbol "power:PWR_FLAG" (power) (pin_numbers hide) (pin_names (offset 0) hide) (in_bom yes) (on_board yes)
      (property "Reference" "#FLG" (at 0 1.905 0))
      (property "Value" "PWR_FLAG" (at 0 3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "flag power" (at 0 0 0))
      (property "ki_description" "Special symbol for telling ERC where power comes from" (at 0 0 0))
      (symbol "PWR_FLAG_0_0"
        (pin power_out line (at 0 0 90) (length 0)
          (name "pwr")
          (number "1")
        )
      )
      (symbol "PWR_FLAG_0_1"
        (polyline
          (pts
            (xy 0 0)
            (xy 0 1.27)
            (xy -1.016 1.905)
            (xy 0 2.54)
            (xy 1.016 1.905)
            (xy 0 1.27)
          )
          (fill (type none))
        )
      )
    )
  )
  (junction (at 243.84 59.69) (diameter 0) (color 0 0 0 0))
  (junction (at 130.81 64.77) (diameter 0) (color 0 0 0 0))
  (junction (at 76.2 135.89) (diameter 0) (color 0 0 0 0))
  (junction (at 96.52 161.29) (diameter 0) (color 0 0 0 0))
  (junction (at 59.69 163.83) (diameter 0) (color 0 0 0 0))
  (junction (at 203.2 59.69) (diameter 0) (color 0 0 0 0))
  (junction (at 104.14 161.29) (diameter 0) (color 0 0 0 0))
  (junction (at 50.8 115.57) (diameter 0) (color 0 0 0 0))
  (junction (at 107.95 41.91) (diameter 0) (color 0 0 0 0))
  (junction (at 143.51 77.47) (diameter 0) (color 0 0 0 0))
  (junction (at 247.65 85.09) (diameter 0) (color 0 0 0 0))
  (junction (at 243.84 62.23) (diameter 0) (color 0 0 0 0))
  (junction (at 247.65 80.01) (diameter 0) (color 0 0 0 0))
  (junction (at 60.96 171.45) (diameter 0) (color 0 0 0 0))
  (junction (at 109.22 67.31) (diameter 0) (color 0 0 0 0))
  (junction (at 138.43 64.77) (diameter 0) (color 0 0 0 0))
  (junction (at 71.12 171.45) (diameter 0) (color 0 0 0 0))
  (junction (at 50.8 163.83) (diameter 0) (color 0 0 0 0))
  (junction (at 50.8 171.45) (diameter 0) (color 0 0 0 0))
  (junction (at 107.95 100.33) (diameter 0) (color 0 0 0 0))
  (junction (at 243.84 82.55) (diameter 0) (color 0 0 0 0))
  (junction (at 102.87 97.79) (diameter 0) (color 0 0 0 0))
  (junction (at 243.84 64.77) (diameter 0) (color 0 0 0 0))
  (junction (at 81.28 163.83) (diameter 0) (color 0 0 0 0))
  (junction (at 190.5 64.77) (diameter 0) (color 0 0 0 0))
  (junction (at 243.84 92.71) (diameter 0) (color 0 0 0 0))
  (junction (at 123.19 41.91) (diameter 0) (color 0 0 0 0))
  (junction (at 130.81 80.01) (diameter 0) (color 0 0 0 0))
  (junction (at 76.2 49.53) (diameter 0) (color 0 0 0 0))
  (junction (at 243.84 69.85) (diameter 0) (color 0 0 0 0))
  (junction (at 43.18 49.53) (diameter 0) (color 0 0 0 0))
  (no_connect (at 236.22 87.63))
  (no_connect (at 101.6 107.95))
  (no_connect (at 236.22 52.07))
  (no_connect (at 236.22 54.61))
  (no_connect (at 215.9 72.39))
  (no_connect (at 236.22 36.83))
  (no_connect (at 236.22 49.53))
  (no_connect (at 236.22 44.45))
  (no_connect (at 236.22 67.31))
  (no_connect (at 236.22 41.91))
  (no_connect (at 236.22 74.93))
  (no_connect (at 109.22 95.25))
  (no_connect (at 236.22 72.39))
  (no_connect (at 215.9 67.31))
  (no_connect (at 215.9 82.55))
  (no_connect (at 146.05 69.85))
  (no_connect (at 101.6 110.49))
  (no_connect (at 101.6 113.03))
  (no_connect (at 236.22 39.37))
  (no_connect (at 236.22 46.99))
  (wire (pts (xy 236.22 59.69) (xy 243.84 59.69)))
  (wire (pts (xy 203.2 69.85) (xy 203.2 59.69)))
  (wire (pts (xy 236.22 64.77) (xy 243.84 64.77)))
  (wire (pts (xy 71.12 171.45) (xy 81.28 171.45)))
  (wire (pts (xy 212.09 62.23) (xy 215.9 62.23)))
  (wire (pts (xy 190.5 64.77) (xy 215.9 64.77)))
  (wire (pts (xy 243.84 64.77) (xy 243.84 69.85)))
  (wire (pts (xy 50.8 163.83) (xy 59.69 163.83)))
  (wire (pts (xy 50.8 171.45) (xy 50.8 168.91)))
  (wire (pts (xy 146.05 81.28) (xy 146.05 85.09)))
  (wire (pts (xy 236.22 34.29) (xy 243.84 34.29)))
  (wire (pts (xy 236.22 69.85) (xy 243.84 69.85)))
  (wire (pts (xy 143.51 67.31) (xy 143.51 77.47)))
  (wire (pts (xy 243.84 82.55) (xy 243.84 92.71)))
  (wire (pts (xy 102.87 96.52) (xy 102.87 97.79)))
  (wire (pts (xy 39.37 97.79) (xy 50.8 97.79)))
  (wire (pts (xy 215.9 69.85) (xy 203.2 69.85)))
  (wire (pts (xy 123.19 33.02) (xy 123.19 41.91)))
  (wire (pts (xy 243.84 59.69) (xy 243.84 62.23)))
  (wire (pts (xy 193.04 59.69) (xy 203.2 59.69)))
  (wire (pts (xy 96.52 161.29) (xy 104.14 161.29)))
  (wire (pts (xy 243.84 92.71) (xy 247.65 92.71)))
  (wire (pts (xy 236.22 85.09) (xy 247.65 85.09)))
  (wire (pts (xy 203.2 90.17) (xy 203.2 87.63)))
  (wire (pts (xy 101.6 77.47) (xy 143.51 77.47)))
  (wire (pts (xy 146.05 64.77) (xy 138.43 64.77)))
  (wire (pts (xy 212.09 77.47) (xy 215.9 77.47)))
  (wire (pts (xy 101.6 67.31) (xy 109.22 67.31)))
  (wire (pts (xy 107.95 100.33) (xy 107.95 129.54)))
  (wire (pts (xy 41.91 115.57) (xy 50.8 115.57)))
  (wire (pts (xy 76.2 49.53) (xy 43.18 49.53)))
  (wire (pts (xy 43.18 49.53) (xy 43.18 87.63)))
  (wire (pts (xy 35.56 163.83) (xy 35.56 168.91)))
  (wire (pts (xy 130.81 64.77) (xy 130.81 68.58)))
  (wire (pts (xy 138.43 90.17) (xy 146.05 90.17)))
  (wire (pts (xy 135.89 57.15) (xy 142.24 57.15)))
  (wire (pts (xy 101.6 80.01) (xy 130.81 80.01)))
  (wire (pts (xy 142.24 62.23) (xy 146.05 62.23)))
  (wire (pts (xy 189.23 64.77) (xy 190.5 64.77)))
  (wire (pts (xy 163.83 81.28) (xy 146.05 81.28)))
  (wire (pts (xy 38.1 135.89) (xy 76.2 135.89)))
  (wire (pts (xy 101.6 100.33) (xy 107.95 100.33)))
  (wire (pts (xy 151.13 163.83) (xy 165.1 163.83)))
  (wire (pts (xy 236.22 80.01) (xy 247.65 80.01)))
  (wire (pts (xy 146.05 67.31) (xy 143.51 67.31)))
  (wire (pts (xy 142.24 87.63) (xy 146.05 87.63)))
  (wire (pts (xy 104.14 82.55) (xy 101.6 82.55)))
  (wire (pts (xy 38.1 123.19) (xy 38.1 135.89)))
  (wire (pts (xy 205.74 85.09) (xy 215.9 85.09)))
  (wire (pts (xy 146.05 97.79) (xy 128.27 97.79)))
  (wire (pts (xy 107.95 100.33) (xy 109.22 100.33)))
  (wire (pts (xy 107.95 41.91) (xy 107.95 33.02)))
  (wire (pts (xy 143.51 77.47) (xy 143.51 95.25)))
  (wire (pts (xy 109.22 92.71) (xy 105.41 92.71)))
  (wire (pts (xy 109.22 72.39) (xy 109.22 67.31)))
  (wire (pts (xy 243.84 92.71) (xy 243.84 95.25)))
  (wire (pts (xy 50.8 87.63) (xy 43.18 87.63)))
  (wire (pts (xy 130.81 92.71) (xy 146.05 92.71)))
  (polyline (pts (xy 26.67 151.13) (xy 26.67 179.07)))
  (wire (pts (xy 203.2 87.63) (xy 215.9 87.63)))
  (wire (pts (xy 128.27 85.09) (xy 101.6 85.09)))
  (wire (pts (xy 130.81 80.01) (xy 130.81 92.71)))
  (wire (pts (xy 59.69 163.83) (xy 63.5 163.83)))
  (wire (pts (xy 107.95 33.02) (xy 110.49 33.02)))
  (wire (pts (xy 107.95 129.54) (xy 114.3 129.54)))
  (wire (pts (xy 109.22 67.31) (xy 114.3 67.31)))
  (wire (pts (xy 104.14 161.29) (xy 104.14 170.18)))
  (wire (pts (xy 143.51 95.25) (xy 146.05 95.25)))
  (wire (pts (xy 118.11 33.02) (xy 123.19 33.02)))
  (wire (pts (xy 146.05 72.39) (xy 109.22 72.39)))
  (polyline (pts (xy 26.67 151.13) (xy 93.98 151.13)))
  (wire (pts (xy 243.84 62.23) (xy 243.84 64.77)))
  (wire (pts (xy 81.28 163.83) (xy 105.41 163.83)))
  (wire (pts (xy 243.84 34.29) (xy 243.84 59.69)))
  (wire (pts (xy 39.37 105.41) (xy 50.8 105.41)))
  (wire (pts (xy 101.6 62.23) (xy 123.19 62.23)))
  (wire (pts (xy 151.13 158.75) (xy 165.1 158.75)))
  (wire (pts (xy 81.28 163.83) (xy 78.74 163.83)))
  (wire (pts (xy 151.13 153.67) (xy 165.1 153.67)))
  (wire (pts (xy 213.36 57.15) (xy 215.9 57.15)))
  (wire (pts (xy 247.65 78.74) (xy 247.65 80.01)))
  (wire (pts (xy 236.22 82.55) (xy 243.84 82.55)))
  (wire (pts (xy 123.19 62.23) (xy 123.19 41.91)))
  (polyline (pts (xy 26.67 179.07) (xy 93.98 179.07)))
  (wire (pts (xy 130.81 76.2) (xy 130.81 80.01)))
  (wire (pts (xy 130.81 64.77) (xy 138.43 64.77)))
  (wire (pts (xy 236.22 62.23) (xy 243.84 62.23)))
  (wire (pts (xy 35.56 171.45) (xy 50.8 171.45)))
  (wire (pts (xy 243.84 69.85) (xy 243.84 82.55)))
  (wire (pts (xy 60.96 171.45) (xy 71.12 171.45)))
  (polyline (pts (xy 93.98 179.07) (xy 93.98 151.13)))
  (wire (pts (xy 104.14 180.34) (xy 104.14 177.8)))
  (wire (pts (xy 247.65 80.01) (xy 247.65 85.09)))
  (wire (pts (xy 101.6 64.77) (xy 130.81 64.77)))
  (wire (pts (xy 101.6 123.19) (xy 101.6 128.27)))
  (wire (pts (xy 128.27 97.79) (xy 128.27 85.09)))
  (wire (pts (xy 43.18 163.83) (xy 45.72 163.83)))
  (wire (pts (xy 102.87 97.79) (xy 109.22 97.79)))
  (wire (pts (xy 50.8 171.45) (xy 60.96 171.45)))
  (wire (pts (xy 105.41 92.71) (xy 105.41 158.75)))
  (wire (pts (xy 142.24 57.15) (xy 142.24 62.23)))
  (wire (pts (xy 50.8 123.19) (xy 38.1 123.19)))
  (wire (pts (xy 201.93 34.29) (xy 215.9 34.29)))
  (wire (pts (xy 101.6 97.79) (xy 102.87 97.79)))
  (wire (pts (xy 50.8 115.57) (xy 50.8 118.11)))
  (wire (pts (xy 138.43 64.77) (xy 138.43 90.17)))
  (wire (pts (xy 212.09 74.93) (xy 215.9 74.93)))
  (wire (pts (xy 43.18 49.53) (xy 34.29 49.53)))
  (wire (pts (xy 96.52 161.29) (xy 96.52 165.1)))
  (wire (pts (xy 104.14 161.29) (xy 105.41 161.29)))
  (wire (pts (xy 203.2 59.69) (xy 215.9 59.69)))
  (text_box "100Hz"
    (at 101.6 26.67 0) (size 29.21 29.21)
    (fill (type none))
  )
  (text "VCC\nGND\nSDA\nSCL\nCOT\nINT (1Hz/32Hz)\n" (at 154.94 73.66 0))
  (text "Power supply (optional)" (at 50.8 153.67 0))
  (text "5V\n3V3\nRxD\nTxD\nGND" (at 118.11 104.14 0))
  (text "GND\nVCC\nCIPO\nCOPI\nSCK\nCS" (at 154.94 99.06 0))
  (text "USB\n\nExternal" (at 111.76 165.1 0))
  (global_label "D25" (shape tri_state) (at 50.8 59.69 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 59.69 0))
  )
  (global_label "~{RD}" (shape input) (at 50.8 120.65 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 45.3542 120.65 0))
  )
  (global_label "D28" (shape tri_state) (at 50.8 67.31 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 67.31 0))
  )
  (global_label "D30" (shape bidirectional) (at 215.9 39.37 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 39.37 0))
  )
  (global_label "A0" (shape input) (at 212.09 77.47 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 206.8861 77.47 0))
  )
  (global_label "A1" (shape input) (at 50.8 82.55 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 45.5961 82.55 0))
  )
  (global_label "R5 VCC" (shape input) (at 165.1 158.75 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 175.0815 158.75 0))
  )
  (global_label "~{RD}" (shape input) (at 181.61 64.77 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 176.1642 64.77 0))
  )
  (global_label "D24" (shape bidirectional) (at 215.9 54.61 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 54.61 0))
  )
  (global_label "~{WR}" (shape input) (at 50.8 113.03 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 45.1728 113.03 0))
  )
  (global_label "D29" (shape bidirectional) (at 215.9 41.91 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 41.91 0))
  )
  (global_label "A2" (shape input) (at 50.8 85.09 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 45.5961 85.09 0))
  )
  (global_label "D29" (shape tri_state) (at 50.8 69.85 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 69.85 0))
  )
  (global_label "~{RESET}" (shape input) (at 201.93 34.29 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 193.2791 34.29 0))
  )
  (global_label "R3 VCC" (shape input) (at 165.1 153.67 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 175.0815 153.67 0))
  )
  (global_label "R4 VCC" (shape input) (at 102.87 96.52 90) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 102.87 86.5385 90))
  )
  (global_label "D27" (shape bidirectional) (at 215.9 46.99 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 46.99 0))
  )
  (global_label "FC2" (shape input) (at 50.8 90.17 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 44.3261 90.17 0))
  )
  (global_label "A1" (shape input) (at 212.09 74.93 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 206.8861 74.93 0))
  )
  (global_label "D26" (shape bidirectional) (at 215.9 49.53 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 49.53 0))
  )
  (global_label "R2 VCC" (shape input) (at 151.13 151.13 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 161.1115 151.13 0))
  )
  (global_label "D30" (shape tri_state) (at 50.8 72.39 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 72.39 0))
  )
  (global_label "~{CS_IDE}" (shape input) (at 215.9 80.01 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 206.5233 80.01 0))
  )
  (global_label "D27" (shape tri_state) (at 50.8 64.77 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 64.77 0))
  )
  (global_label "A0" (shape input) (at 50.8 80.01 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 45.5961 80.01 0))
  )
  (global_label "R6 VCC" (shape input) (at 151.13 161.29 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 161.1115 161.29 0))
  )
  (global_label "R6 VCC" (shape input) (at 114.3 67.31 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 124.2815 67.31 0))
  )
  (global_label "UART_INT" (shape output) (at 50.8 125.73 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 39.367 125.73 0))
  )
  (global_label "A2" (shape input) (at 236.22 77.47 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 241.4239 77.47 0))
  )
  (global_label "D31" (shape tri_state) (at 50.8 74.93 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 74.93 0))
  )
  (global_label "~{RESET}" (shape input) (at 151.13 156.21 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 159.7809 156.21 0))
  )
  (global_label "D25" (shape bidirectional) (at 215.9 52.07 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 52.07 0))
  )
  (global_label "D26" (shape tri_state) (at 50.8 62.23 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 62.23 0))
  )
  (global_label "D31" (shape bidirectional) (at 215.9 36.83 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 36.83 0))
  )
  (global_label "R7 VCC" (shape input) (at 101.6 69.85 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 111.5815 69.85 0))
  )
  (global_label "D24" (shape tri_state) (at 50.8 57.15 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 43.0939 57.15 0))
  )
  (global_label "~{CS_UART}" (shape input) (at 50.8 92.71 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 39.7904 92.71 0))
  )
  (global_label "~{WR}" (shape input) (at 212.09 62.23 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 206.4628 62.23 0))
  )
  (global_label "R7 VCC" (shape input) (at 165.1 163.83 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 175.0815 163.83 0))
  )
  (global_label "RESET" (shape input) (at 50.8 128.27 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 42.1491 128.27 0))
  )
  (global_label "D28" (shape bidirectional) (at 215.9 44.45 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 208.1939 44.45 0))
  )
  (netclass_flag "" (length 2.54) (shape round) (at 105.41 92.71 0) (fields_autoplaced)
    (property "Netclass" "Power" (at 106.1085 90.17 0) (show_name))
  )
  (symbol (lib_id "Regulator_Linear:LM7805_TO220") (at 71.12 163.83 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U6" (at 71.12 157.48 0))
    (property "Value" "LM7805" (at 71.12 160.02 0))
    (property "Footprint" "Package_TO_SOT_THT:TO-220-3_Vertical" (at 71.12 158.115 0))
    (property "Datasheet" "https://www.onsemi.cn/PowerSolutions/document/MC7800-D.PDF" (at 71.12 165.1 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 193.04 59.69 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR042" (at 193.04 63.5 0))
    (property "Value" "+5V" (at 193.04 55.88 0))
    (property "Footprint" "" (at 193.04 59.69 0))
    (property "Datasheet" "" (at 193.04 59.69 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR042") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 34.29 57.15 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR024" (at 34.29 63.5 0))
    (property "Value" "GND" (at 34.29 62.23 0))
    (property "Footprint" "" (at 34.29 57.15 0))
    (property "Datasheet" "" (at 34.29 57.15 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR024") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 142.24 87.63 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "#PWR038" (at 142.24 91.44 0))
    (property "Value" "+5V" (at 142.24 82.55 0))
    (property "Footprint" "" (at 142.24 87.63 0))
    (property "Datasheet" "" (at 142.24 87.63 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR038") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "74xx:74HC14") (at 115.57 41.91 0) (unit 3)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U1" (at 115.57 34.29 0))
    (property "Value" "74HC14" (at 115.57 36.83 0))
    (property "Footprint" "Package_DIP:DIP-14_W7.62mm_Socket_LongPads" (at 115.57 41.91 0))
    (property "Datasheet" "http://www.ti.com/lit/gpn/sn74HC14" (at 115.57 41.91 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "8")
    (pin "9")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U1") (unit 3)
        )
        (path
          (reference "U1") (unit 3)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 190.5 68.58 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C15" (at 194.31 67.945 0))
    (property "Value" "100pF" (at 194.31 70.485 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 191.4652 72.39 0))
    (property "Datasheet" "~" (at 190.5 68.58 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C15") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 135.89 57.15 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR036" (at 135.89 63.5 0))
    (property "Value" "GND" (at 135.89 62.23 0))
    (property "Footprint" "" (at 135.89 57.15 0))
    (property "Datasheet" "" (at 135.89 57.15 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR036") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 96.52 180.34 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR030" (at 96.52 186.69 0))
    (property "Value" "GND" (at 96.52 185.42 0))
    (property "Footprint" "" (at 96.52 180.34 0))
    (property "Datasheet" "" (at 96.52 180.34 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR030") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Diode:1N4001") (at 39.37 163.83 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "D3" (at 39.37 158.75 0))
    (property "Value" "1N4001" (at 39.37 161.29 0))
    (property "Footprint" "Diode_THT:D_DO-41_SOD81_P10.16mm_Horizontal" (at 39.37 163.83 0))
    (property "Datasheet" "http://www.vishay.com/docs/88503/1n4001.pdf" (at 39.37 163.83 0))
    (property "Sim.Device" "D" (at 39.37 163.83 0))
    (property "Sim.Pins" "1=K 2=A" (at 39.37 163.83 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "D3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 146.05 59.69 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR039" (at 146.05 63.5 0))
    (property "Value" "+5V" (at 146.05 55.88 0))
    (property "Footprint" "" (at 146.05 59.69 0))
    (property "Datasheet" "" (at 146.05 59.69 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR039") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 243.84 95.25 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR046" (at 243.84 101.6 0))
    (property "Value" "GND" (at 243.84 100.33 0))
    (property "Footprint" "" (at 243.84 95.25 0))
    (property "Datasheet" "" (at 243.84 95.25 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR046") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 185.42 64.77 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R8" (at 185.42 62.23 90))
    (property "Value" "100R" (at 185.42 64.77 90))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 185.42 66.548 90))
    (property "Datasheet" "~" (at 185.42 64.77 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R8") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:PWR_FLAG") (at 60.96 171.45 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#FLG02" (at 60.96 173.355 0))
    (property "Value" "PWR_FLAG" (at 60.96 176.53 0))
    (property "Footprint" "" (at 60.96 171.45 0))
    (property "Datasheet" "~" (at 60.96 171.45 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#FLG02") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:Crystal") (at 39.37 101.6 270) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "Y1" (at 43.18 100.965 90))
    (property "Value" "11.0592MHz" (at 43.18 103.505 90))
    (property "Footprint" "Crystal:Crystal_HC18-U_Vertical" (at 39.37 101.6 0))
    (property "Datasheet" "~" (at 39.37 101.6 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "Y1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 109.22 102.87 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR033" (at 109.22 109.22 0))
    (property "Value" "GND" (at 109.22 107.95 0))
    (property "Footprint" "" (at 109.22 102.87 0))
    (property "Datasheet" "" (at 109.22 102.87 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR033") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x05") (at 114.3 97.79 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J4" (at 113.03 90.17 0))
    (property "Value" "USB RS232" (at 113.03 105.41 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical" (at 114.3 97.79 0))
    (property "Datasheet" "~" (at 114.3 97.79 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 114.3 114.3 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR034" (at 114.3 118.11 0))
    (property "Value" "+5V" (at 114.3 110.49 0))
    (property "Footprint" "" (at 114.3 114.3 0))
    (property "Datasheet" "" (at 114.3 114.3 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR034") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x06") (at 151.13 64.77 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J5" (at 149.86 55.88 0))
    (property "Value" "RTC PCF8563" (at 146.05 74.93 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical" (at 151.13 64.77 0))
    (property "Datasheet" "~" (at 151.13 64.77 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "SVW_custom_lib:IDE_44pin") (at 226.06 62.23 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J7" (at 226.06 30.48 0))
    (property "Value" "IDE/ATA" (at 229.87 63.5 0))
    (property "Footprint" "Library:IDE_44pin_SVW" (at 229.87 63.5 0))
    (property "Datasheet" "" (at 229.87 63.5 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "29")
    (pin "3")
    (pin "30")
    (pin "31")
    (pin "32")
    (pin "33")
    (pin "34")
    (pin "35")
    (pin "36")
    (pin "37")
    (pin "38")
    (pin "39")
    (pin "4")
    (pin "40")
    (pin "41")
    (pin "42")
    (pin "43")
    (pin "44")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:PWR_FLAG") (at 104.14 161.29 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#FLG03" (at 104.14 159.385 0))
    (property "Value" "PWR_FLAG" (at 104.14 157.48 0))
    (property "Footprint" "" (at 104.14 161.29 0))
    (property "Datasheet" "~" (at 104.14 161.29 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#FLG03") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 76.2 135.89 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR028" (at 76.2 142.24 0))
    (property "Value" "GND" (at 76.2 140.97 0))
    (property "Footprint" "" (at 76.2 135.89 0))
    (property "Datasheet" "" (at 76.2 135.89 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR028") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 104.14 173.99 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C13" (at 107.95 172.466 0))
    (property "Value" "470uF *)" (at 107.95 175.006 0))
    (property "Footprint" "Capacitor_THT:CP_Radial_D8.0mm_P5.00mm" (at 105.1052 177.8 0))
    (property "Datasheet" "~" (at 104.14 173.99 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C13") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Interface_UART:16550") (at 76.2 92.71 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U4" (at 78.1559 49.53 0))
    (property "Value" "16550" (at 78.1559 52.07 0))
    (property "Footprint" "Package_DIP:DIP-40_W15.24mm_Socket_LongPads" (at 76.2 92.71 0))
    (property "Datasheet" "http://www.ti.com/lit/ds/symlink/pc16550d.pdf" (at 76.2 92.71 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "20")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "29")
    (pin "3")
    (pin "30")
    (pin "31")
    (pin "32")
    (pin "33")
    (pin "34")
    (pin "35")
    (pin "36")
    (pin "37")
    (pin "38")
    (pin "39")
    (pin "4")
    (pin "40")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "U4") (unit 1)
        )
        (path
          (reference "U7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:PWR_FLAG") (at 59.69 163.83 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#FLG01" (at 59.69 161.925 0))
    (property "Value" "PWR_FLAG" (at 59.69 160.02 0))
    (property "Footprint" "" (at 59.69 163.83 0))
    (property "Datasheet" "~" (at 59.69 163.83 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#FLG01") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 247.65 88.9 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C16" (at 251.46 88.265 0))
    (property "Value" "100nF" (at 251.46 90.805 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 248.6152 92.71 0))
    (property "Datasheet" "~" (at 247.65 88.9 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C16") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 203.2 90.17 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR043" (at 203.2 96.52 0))
    (property "Value" "GND" (at 203.2 95.25 0))
    (property "Footprint" "" (at 203.2 90.17 0))
    (property "Datasheet" "" (at 203.2 90.17 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR043") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 140.97 151.13 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR037" (at 140.97 154.94 0))
    (property "Value" "+5V" (at 140.97 147.32 0))
    (property "Footprint" "" (at 140.97 151.13 0))
    (property "Datasheet" "" (at 140.97 151.13 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR037") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 119.38 82.55 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR035" (at 119.38 86.36 0))
    (property "Value" "+5V" (at 119.38 78.74 0))
    (property "Footprint" "" (at 119.38 82.55 0))
    (property "Datasheet" "" (at 119.38 82.55 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR035") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 190.5 72.39 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR041" (at 190.5 78.74 0))
    (property "Value" "GND" (at 190.5 77.47 0))
    (property "Footprint" "" (at 190.5 72.39 0))
    (property "Datasheet" "" (at 190.5 72.39 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR041") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 213.36 57.15 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "#PWR045" (at 213.36 63.5 0))
    (property "Value" "GND" (at 213.36 60.96 0))
    (property "Footprint" "" (at 213.36 57.15 0))
    (property "Datasheet" "" (at 213.36 57.15 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR045") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 130.81 72.39 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R7" (at 133.35 71.755 0))
    (property "Value" "4K7" (at 133.35 74.295 0))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 129.032 72.39 90))
    (property "Datasheet" "~" (at 130.81 72.39 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 114.3 118.11 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R5" (at 116.84 117.475 0))
    (property "Value" "3K3" (at 116.84 120.015 0))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 112.522 118.11 90))
    (property "Datasheet" "~" (at 114.3 118.11 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 96.52 168.91 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R3" (at 99.06 168.275 0))
    (property "Value" "3K3" (at 99.06 170.815 0))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 94.742 168.91 90))
    (property "Datasheet" "~" (at 96.52 168.91 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:LED") (at 107.95 82.55 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "D5" (at 106.3625 77.47 0))
    (property "Value" "LED (att)" (at 106.3625 80.01 0))
    (property "Footprint" "LED_THT:LED_D5.0mm" (at 107.95 82.55 0))
    (property "Datasheet" "~" (at 107.95 82.55 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "D5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 96.52 161.29 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR029" (at 96.52 165.1 0))
    (property "Value" "+5V" (at 96.52 157.48 0))
    (property "Footprint" "" (at 96.52 161.29 0))
    (property "Datasheet" "" (at 96.52 161.29 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR029") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 132.08 175.26 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR048" (at 132.08 181.61 0))
    (property "Value" "GND" (at 132.08 180.34 0))
    (property "Footprint" "" (at 132.08 175.26 0))
    (property "Datasheet" "" (at 132.08 175.26 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR048") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 107.95 45.72 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C14" (at 111.76 45.085 0))
    (property "Value" "100nF" (at 111.76 47.625 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 108.9152 49.53 0))
    (property "Datasheet" "~" (at 107.95 45.72 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C14") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 114.3 33.02 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R4" (at 114.3 27.94 90))
    (property "Value" "100K" (at 114.3 30.48 90))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 114.3 34.798 90))
    (property "Datasheet" "~" (at 114.3 33.02 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x01_Pin") (at 127 175.26 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J8" (at 127.635 171.45 0))
    (property "Value" "Ground test pin" (at 127.635 173.99 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x01_P2.54mm_Vertical" (at 127 175.26 0))
    (property "Datasheet" "~" (at 127 175.26 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J8") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 81.28 167.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C12" (at 85.09 167.005 0))
    (property "Value" "100nF" (at 85.09 169.545 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 82.2452 171.45 0))
    (property "Datasheet" "~" (at 81.28 167.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C12") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 104.14 180.34 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR031" (at 104.14 186.69 0))
    (property "Value" "GND" (at 104.14 185.42 0))
    (property "Footprint" "" (at 104.14 180.34 0))
    (property "Datasheet" "" (at 104.14 180.34 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR031") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 50.8 167.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C11" (at 54.61 166.116 0))
    (property "Value" "220uF" (at 54.61 168.656 0))
    (property "Footprint" "Capacitor_THT:CP_Radial_D8.0mm_P5.00mm" (at 51.7652 171.45 0))
    (property "Datasheet" "~" (at 50.8 167.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C11") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 107.95 49.53 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR032" (at 107.95 55.88 0))
    (property "Value" "GND" (at 107.95 54.61 0))
    (property "Footprint" "" (at 107.95 49.53 0))
    (property "Datasheet" "" (at 107.95 49.53 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR032") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 205.74 85.09 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR044" (at 205.74 88.9 0))
    (property "Value" "+5V" (at 205.74 81.28 0))
    (property "Footprint" "" (at 205.74 85.09 0))
    (property "Datasheet" "" (at 205.74 85.09 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR044") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 34.29 53.34 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C10" (at 38.1 52.705 0))
    (property "Value" "100nF" (at 38.1 55.245 0))
    (property "Footprint" "Capacitor_THT:C_Disc_D7.0mm_W2.5mm_P5.00mm" (at 35.2552 57.15 0))
    (property "Datasheet" "~" (at 34.29 53.34 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "C10") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_Network06") (at 146.05 158.75 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "RN1" (at 146.304 146.05 90))
    (property "Value" "6x 10K" (at 146.304 148.59 90))
    (property "Footprint" "Resistor_THT:R_Array_SIP7" (at 146.05 168.275 90))
    (property "Datasheet" "http://www.vishay.com/docs/31509/csc.pdf" (at 146.05 158.75 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "RN1") (unit 1)
        )
        (path
          (reference "RN1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x03") (at 110.49 161.29 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J3" (at 109.22 156.21 0))
    (property "Value" "Power" (at 109.22 166.37 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x03_P2.54mm_Vertical" (at 110.49 161.29 0))
    (property "Datasheet" "~" (at 110.49 161.29 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:Conn_01x02_Pin") (at 30.48 168.91 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J2" (at 31.115 165.1 0))
    (property "Value" "9V DC" (at 31.115 167.64 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x02_P2.54mm_Vertical" (at 30.48 168.91 0))
    (property "Datasheet" "~" (at 30.48 168.91 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:Polyfuse_Small") (at 48.26 163.83 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "F1" (at 48.26 158.75 90))
    (property "Value" "500 mA" (at 48.26 161.29 90))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P7.62mm_Horizontal" (at 53.34 162.56 0))
    (property "Datasheet" "~" (at 48.26 163.83 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "F1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 163.83 81.28 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR040" (at 163.83 87.63 0))
    (property "Value" "GND" (at 163.83 86.36 0))
    (property "Footprint" "" (at 163.83 81.28 0))
    (property "Datasheet" "" (at 163.83 81.28 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR040") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:LED") (at 96.52 176.53 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "D4" (at 100.33 177.4825 90))
    (property "Value" "LED (power)" (at 100.33 180.0225 90))
    (property "Footprint" "LED_THT:LED_D5.0mm" (at 96.52 176.53 0))
    (property "Datasheet" "~" (at 96.52 176.53 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "D4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 41.91 115.57 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR025" (at 41.91 121.92 0))
    (property "Value" "GND" (at 41.91 120.65 0))
    (property "Footprint" "" (at 41.91 115.57 0))
    (property "Datasheet" "" (at 41.91 115.57 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR025") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 247.65 78.74 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "#PWR047" (at 247.65 82.55 0))
    (property "Value" "+5V" (at 247.65 74.93 0))
    (property "Footprint" "" (at 247.65 78.74 0))
    (property "Datasheet" "" (at 247.65 78.74 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR047") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 71.12 171.45 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR026" (at 71.12 177.8 0))
    (property "Value" "GND" (at 71.12 176.53 0))
    (property "Footprint" "" (at 71.12 171.45 0))
    (property "Datasheet" "" (at 71.12 171.45 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR026") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:+5V") (at 76.2 49.53 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR027" (at 76.2 53.34 0))
    (property "Value" "+5V" (at 76.2 45.72 0))
    (property "Footprint" "" (at 76.2 49.53 0))
    (property "Datasheet" "" (at 76.2 49.53 0))
    (pin "1")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "#PWR027") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R") (at 115.57 82.55 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R6" (at 115.57 77.47 90))
    (property "Value" "3K3" (at 115.57 80.01 90))
    (property "Footprint" "Resistor_THT:R_Axial_DIN0207_L6.3mm_D2.5mm_P10.16mm_Horizontal" (at 115.57 84.328 90))
    (property "Datasheet" "~" (at 115.57 82.55 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "R6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x06") (at 151.13 90.17 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J6" (at 149.86 82.55 0))
    (property "Value" "SD card adapter" (at 151.13 100.33 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical" (at 151.13 90.17 0))
    (property "Datasheet" "~" (at 151.13 90.17 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "J6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:LED") (at 114.3 125.73 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "D6" (at 118.11 126.6825 90))
    (property "Value" "LED (tx)" (at 118.11 129.2225 90))
    (property "Footprint" "LED_THT:LED_D5.0mm" (at 114.3 125.73 0))
    (property "Datasheet" "~" (at 114.3 125.73 0))
    (pin "1")
    (pin "2")
    (instances
      (project "MC68EC020_SBC"
        (path
          (reference "D6") (unit 1)
        )
      )
    )
  )
)
