(kicad_pcb
	(version 20240108)
	(generator "pcbnew")
	(generator_version "8.0")
	(general
		(thickness 1.6)
		(legacy_teardrops no)
	)
	(paper "A4")
	(layers
		(0 "F.Cu" signal)
		(31 "B.Cu" signal)
		(32 "B.Adhes" user "B.Adhesive")
		(33 "F.Adhes" user "F.Adhesive")
		(34 "B.Paste" user)
		(35 "F.Paste" user)
		(36 "B.SilkS" user "B.Silkscreen")
		(37 "F.SilkS" user "F.Silkscreen")
		(38 "B.Mask" user)
		(39 "F.Mask" user)
		(40 "Dwgs.User" user "User.Drawings")
		(41 "Cmts.User" user "User.Comments")
		(42 "Eco1.User" user "User.Eco1")
		(43 "Eco2.User" user "User.Eco2")
		(44 "Edge.Cuts" user)
		(45 "Margin" user)
		(46 "B.CrtYd" user "B.Courtyard")
		(47 "F.CrtYd" user "F.Courtyard")
		(48 "B.Fab" user)
		(49 "F.Fab" user)
		(50 "User.1" user)
		(51 "User.2" user)
		(52 "User.3" user)
		(53 "User.4" user)
		(54 "User.5" user)
		(55 "User.6" user)
		(56 "User.7" user)
		(57 "User.8" user)
		(58 "User.9" user)
	)
	(setup
		(stackup
			(layer "F.SilkS"
				(type "Top Silk Screen")
			)
			(layer "F.Paste"
				(type "Top Solder Paste")
			)
			(layer "F.Mask"
				(type "Top Solder Mask")
				(thickness 0.01)
			)
			(layer "F.Cu"
				(type "copper")
				(thickness 0.035)
			)
			(layer "dielectric 1"
				(type "core")
				(thickness 1.51)
				(material "FR4")
				(epsilon_r 4.5)
				(loss_tangent 0.02)
			)
			(layer "B.Cu"
				(type "copper")
				(thickness 0.035)
			)
			(layer "B.Mask"
				(type "Bottom Solder Mask")
				(thickness 0.01)
			)
			(layer "B.Paste"
				(type "Bottom Solder Paste")
			)
			(layer "B.SilkS"
				(type "Bottom Silk Screen")
			)
			(copper_finish "None")
			(dielectric_constraints no)
		)
		(pad_to_mask_clearance 0)
		(allow_soldermask_bridges_in_footprints no)
		(pcbplotparams
			(layerselection 0x00010fc_ffffffff)
			(plot_on_all_layers_selection 0x0000000_00000000)
			(disableapertmacros no)
			(usegerberextensions no)
			(usegerberattributes yes)
			(usegerberadvancedattributes yes)
			(creategerberjobfile yes)
			(dashed_line_dash_ratio 12.000000)
			(dashed_line_gap_ratio 3.000000)
			(svgprecision 4)
			(plotframeref no)
			(viasonmask no)
			(mode 1)
			(useauxorigin no)
			(hpglpennumber 1)
			(hpglpenspeed 20)
			(hpglpendiameter 15.000000)
			(pdf_front_fp_property_popups yes)
			(pdf_back_fp_property_popups yes)
			(dxfpolygonmode yes)
			(dxfimperialunits yes)
			(dxfusepcbnewfont yes)
			(psnegative no)
			(psa4output no)
			(plotreference yes)
			(plotvalue yes)
			(plotfptext yes)
			(plotinvisibletext no)
			(sketchpadsonfab no)
			(subtractmaskfromsilk no)
			(outputformat 1)
			(mirror no)
			(drillshape 1)
			(scaleselection 1)
			(outputdirectory "")
		)
	)
	(net 0 "")
	(net 1 "unconnected-(IC1-LCD_RSTB-Pad120)")
	(net 2 "unconnected-(IC1-SLEEP_IND-Pad3)")
	(net 3 "+4V")
	(net 4 "unconnected-(IC1-SPI_MISO-Pad39)")
	(net 5 "unconnected-(IC1-I2C_SDA-Pad42)")
	(net 6 "unconnected-(IC1-NET_STATUS-Pad6)")
	(net 7 "unconnected-(IC1-SDIO1_DATA1-Pad30)")
	(net 8 "unconnected-(IC1-MAIN_DTR-Pad66)")
	(net 9 "unconnected-(IC1-STATUS-Pad61)")
	(net 10 "GND")
	(net 11 "unconnected-(IC1-SDIO1_VDD-Pad34)")
	(net 12 "unconnected-(IC1-KEYIN3-Pad80)")
	(net 13 "unconnected-(IC1-SD_DET-Pad23)")
	(net 14 "unconnected-(IC1-KEYOUT3-Pad114)")
	(net 15 "unconnected-(IC1-PCM_SYNC-Pad26)")
	(net 16 "unconnected-(IC1-KEYIN1-Pad78)")
	(net 17 "unconnected-(IC1-USB_DM-Pad70)")
	(net 18 "unconnected-(IC1-SDIO1_CMD-Pad33)")
	(net 19 "unconnected-(IC1-USIM2_VDD-Pad128)")
	(net 20 "unconnected-(IC1-AP_READY-Pad2)")
	(net 21 "Net-(D1-K)")
	(net 22 "unconnected-(IC1-LCD_SI{slash}O-Pad125)")
	(net 23 "unconnected-(IC1-GRFC2-Pad144)")
	(net 24 "unconnected-(IC1-USIM_DET-Pad13)")
	(net 25 "unconnected-(IC1-ADC2-Pad43)")
	(net 26 "unconnected-(IC1-SDIO1_DATA3-Pad28)")
	(net 27 "unconnected-(IC1-SPI_MOSI-Pad38)")
	(net 28 "unconnected-(IC1-WAKEUP_IN-Pad1)")
	(net 29 "unconnected-(IC1-KEYOUT2-Pad113)")
	(net 30 "unconnected-(IC1-MAIN_DCD-Pad63)")
	(net 31 "unconnected-(IC1-PCM_CLK-Pad27)")
	(net 32 "unconnected-(IC1-I2C_SCL-Pad41)")
	(net 33 "unconnected-(IC1-SDIO2_DATA3-Pad129)")
	(net 34 "unconnected-(IC1-RESET_N-Pad20)")
	(net 35 "unconnected-(IC1-I2C2_SDA-Pad142)")
	(net 36 "/mic+")
	(net 37 "unconnected-(IC1-I2C2_SCL-Pad141)")
	(net 38 "unconnected-(IC1-WLAN_WAKE-Pad135)")
	(net 39 "unconnected-(IC1-MAIN_RTS-Pad65)")
	(net 40 "unconnected-(IC1-LCD_CLK-Pad123)")
	(net 41 "unconnected-(IC1-BT_EN-Pad139)")
	(net 42 "unconnected-(IC1-SDIO2_DATA1-Pad131)")
	(net 43 "unconnected-(IC1-GRFC1-Pad143)")
	(net 44 "unconnected-(IC1-USB_VBUS-Pad71)")
	(net 45 "unconnected-(IC1-SDIO2_DATA0-Pad132)")
	(net 46 "unconnected-(IC1-LCD_FMARK-Pad119)")
	(net 47 "unconnected-(IC1-AUX_RXD-Pad137)")
	(net 48 "Net-(D2-K)")
	(net 49 "unconnected-(IC1-PCM_DOUT-Pad25)")
	(net 50 "unconnected-(IC1-SDIO2_CMD-Pad134)")
	(net 51 "unconnected-(IC1-LCD_CS-Pad122)")
	(net 52 "unconnected-(IC1-WLAN_EN-Pad136)")
	(net 53 "unconnected-(IC1-RESERVED_5-Pad116)")
	(net 54 "unconnected-(IC1-SDIO1_DATA0-Pad31)")
	(net 55 "/gtx")
	(net 56 "unconnected-(IC1-GPIO1-Pad126)")
	(net 57 "unconnected-(IC1-SDIO1_DATA2-Pad29)")
	(net 58 "unconnected-(IC1-KEYOUT0-Pad83)")
	(net 59 "unconnected-(IC1-GND_3-Pad19)")
	(net 60 "unconnected-(IC1-SDIO2_DATA2-Pad130)")
	(net 61 "/grx")
	(net 62 "unconnected-(IC1-DBG_RXD-Pad11)")
	(net 63 "unconnected-(IC1-GND_5-Pad36)")
	(net 64 "unconnected-(IC1-W_DISABLE#-Pad4)")
	(net 65 "unconnected-(IC1-MAIN_CTS-Pad64)")
	(net 66 "unconnected-(IC1-AUX_TXD-Pad138)")
	(net 67 "mosi")
	(net 68 "unconnected-(IC1-USB_BOOT-Pad115)")
	(net 69 "miso")
	(net 70 "sck")
	(net 71 "unconnected-(IC1-RESERVED_3-Pad81)")
	(net 72 "unconnected-(IC1-RESERVED_4-Pad82)")
	(net 73 "unconnected-(IC1-RESERVED_2-Pad55)")
	(net 74 "reset")
	(net 75 "unconnected-(IC1-SDIO1_CLK-Pad32)")
	(net 76 "unconnected-(IC1-ISINK-Pad140)")
	(net 77 "unconnected-(IC1-LCD_SDC-Pad124)")
	(net 78 "unconnected-(IC1-USB_DP-Pad69)")
	(net 79 "unconnected-(IC1-KEYOUT1-Pad84)")
	(net 80 "unconnected-(IC1-RESERVED_1-Pad18)")
	(net 81 "unconnected-(IC1-GND_13-Pad56)")
	(net 82 "unconnected-(IC1-WLAN_SLP__CLK-Pad118)")
	(net 83 "Net-(Q1-C)")
	(net 84 "unconnected-(IC1-ANT_GNSS-Pad47)")
	(net 85 "unconnected-(IC1-ANT_BT{slash}WIFI__SCAN-Pad35)")
	(net 86 "unconnected-(IC1-ADC1-Pad44)")
	(net 87 "unconnected-(IC1-WLAN_PWR__EN-Pad127)")
	(net 88 "unconnected-(IC1-MAIN_RI-Pad62)")
	(net 89 "unconnected-(IC1-KEYIN2-Pad79)")
	(net 90 "unconnected-(IC1-RESERVED_6-Pad117)")
	(net 91 "unconnected-(IC1-PCM_DIN-Pad24)")
	(net 92 "unconnected-(IC1-ADC0-Pad45)")
	(net 93 "unconnected-(IC1-SPI_CS-Pad37)")
	(net 94 "Net-(Q1-B)")
	(net 95 "unconnected-(IC1-SPI_CLK-Pad40)")
	(net 96 "unconnected-(IC1-SDIO2_CLK-Pad133)")
	(net 97 "unconnected-(IC1-DBG_TXD-Pad12)")
	(net 98 "unconnected-(IC1-LCD_SEL-Pad121)")
	(net 99 "NET_M")
	(net 100 "unconnected-(U1-OE-Pad6)")
	(net 101 "/sRx")
	(net 102 "/sTx")
	(net 103 "+1V8")
	(net 104 "ANT_main")
	(net 105 "Net-(IC1-PWRKEY)")
	(net 106 "Net-(IC1-GND_4)")
	(net 107 "sim_vdd")
	(net 108 "sim_gnd")
	(net 109 "sim_clk")
	(net 110 "sim_io ")
	(net 111 "sim_rst")
	(net 112 "sim_io")
	(net 113 "unconnected-(R6-shield-Pad7)")
	(net 114 "unconnected-(R6-VPP-Pad3)")
	(net 115 "/mic-")
	(net 116 "/spk+")
	(net 117 "/spk-")
	(footprint "Button_Switch_THT:SW_PUSH_6mm_H4.3mm"
		(layer "F.Cu")
		(at 93 71.25 180)
		(descr "tactile push button, 6x6mm e.g. PHAP33xx series, height=4.3mm")
		(tags "tact sw push 6mm")
		(property "Reference" "SW1"
			(at 3 2.25 180)
			(layer "F.SilkS")
		)
		(property "Value" "programmable_button"
			(at 3.75 6.7 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H4.3mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.25 2.25 180)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at 0 0 270)
			(size 2 2)
			(drill 1.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 70 "sck")
			(pinfunction "1")
			(pintype "passive")
		)
		(pad "1" thru_hole circle
			(at 6.5 0 270)
			(size 2 2)
			(drill 1.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 70 "sck")
			(pinfunction "1")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 0 4.5 270)
			(size 2 2)
			(drill 1.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 10 "GND")
			(pinfunction "2")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 6.5 4.5 270)
			(size 2 2)
			(drill 1.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 10 "GND")
			(pinfunction "2")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Button_Switch_THT.3dshapes/SW_PUSH_6mm_H4.3mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 163.703 97.409)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C14"
			(at -1.651 0 0)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 0)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_Tantalum_SMD:CP_EIA-7343-15_Kemet-W_Pad2.25x2.55mm_HandSolder"
		(layer "F.Cu")
		(at 150 65)
		(descr "Tantalum Capacitor SMD Kemet-W (7343-15 Metric), IPC_7351 nominal, (Body size from: http://www.kemet.com/Lists/ProductCatalog/Attachments/253/KEM_TC101_STD.pdf), generated with kicad-footprint-generator")
		(tags "capacitor tantalum")
		(property "Reference" "C3"
			(at 0 -3.1 0)
			(layer "F.SilkS")
		)
		(property "Value" "100uf"
			(at 0 3.1 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-15_Kemet-W_Pad2.25x2.55mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -3.2 0)
			(size 2.25 2.55)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.111111)
			(net 3 "+4V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 3.2 0)
			(size 2.25 2.55)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.111111)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_Tantalum_SMD.3dshapes/CP_EIA-7343-15_Kemet-W.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 162.814 88.9 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C21"
			(at -1.651 0 90)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 116 "/spk+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/spk-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 107.53 62 -90)
		(descr "Through hole straight pin header, 1x05, 2.54mm pitch, single row")
		(tags "Through hole pin header THT 1x05 2.54mm single row")
		(property "Reference" "J2"
			(at 0 -2.33 90)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Conn_01x05_Socket"
			(at 0 12.49 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x05, script generated"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 0 5.08 180)
			(layer "F.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 10 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 0 2.54 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 74 "reset")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 0 5.08 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 70 "sck")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 0 7.62 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 69 "miso")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(pad "5" thru_hole oval
			(at 0 10.16 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 67 "mosi")
			(pinfunction "Pin_5")
			(pintype "passive")
		)
	)
	(footprint "Package_TO_SOT_SMD:SOT-323_SC-70"
		(layer "F.Cu")
		(at 160.29 100.506 180)
		(descr "SOT-323, SC-70")
		(tags "SOT-323 SC-70")
		(property "Reference" "D3"
			(at -0.05 -2.25 180)
			(layer "F.SilkS")
		)
		(property "Value" "SP0502BAJT"
			(at -0.05 2.05 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "http://www.littelfuse.com/~/media/files/littelfuse/technical%20resources/documents/data%20sheets/sp05xxba.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "TVS Diode Array, 5.5V Standoff, 2 Channels, SC-70 package"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT?323*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 -0.65 90)
			(size 0.45 0.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at -1 0.65 90)
			(size 0.45 0.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "3" smd roundrect
			(at 1 0 90)
			(size 0.45 0.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pinfunction "A")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/SOT-323_SC-70.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
		(layer "F.Cu")
		(at 151 69)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C2"
			(at 0 2 0)
			(layer "F.SilkS")
		)
		(property "Value" "1uf"
			(at 0 1.68 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.0375 0)
			(size 1.175 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.212766)
			(net 3 "+4V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.0375 0)
			(size 1.175 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.212766)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 165.735 97.409)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C13"
			(at 1.651 0 0)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 0)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 161.163 89.9675 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C18"
			(at -1.7265 0 -90)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 -90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/spk-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 163.703 96.52)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C12"
			(at -1.651 -0.127 0)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 0)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_JST:JST_PH_B2B-PH-K_1x02_P2.00mm_Vertical"
		(layer "F.Cu")
		(at 166.963 89.773 90)
		(descr "JST PH series connector, B2B-PH-K (http://www.jst-mfg.com/product/pdf/eng/ePH.pdf), generated with kicad-footprint-generator")
		(tags "connector JST PH side entry")
		(property "Reference" "J3"
			(at -3.191 0.804 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Conn_01x02_Pin"
			(at 1 4 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_JST:JST_PH_B2B-PH-K_1x02_P2.00mm_Vertical"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x02, script generated"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1 1.5 -90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 90)
			(size 1.2 1.75)
			(drill 0.75)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.208333)
			(net 116 "/spk+")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2 0 90)
			(size 1.2 1.75)
			(drill 0.75)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 117 "/spk-")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Connector_JST.3dshapes/JST_PH_B2B-PH-K_1x02_P2.00mm_Vertical.wrl"
			(hide yes)
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 161.983 89.927 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C19"
			(at -1.767 0.069 -90)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 -90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/spk-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "EC200U:EC200U"
		(layer "F.Cu")
		(at 141.05 88)
		(descr "EC200U-3")
		(tags "Integrated Circuit")
		(property "Reference" "IC1"
			(at 0 0 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "EC200U"
			(at 0 0 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Footprint" "EC200U:EC200U"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://drive.google.com/file/d/1eptLu98ynaKmYC8Qn_q-jmLHFTbR9duW/view?usp=sharing"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "LTE standard module Bluetooth wireless communication 4G cat1 module all-network"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Height" "2.6"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Manufacturer_Name" "Quectel"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Manufacturer_Part_Number" "EC200U"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Mouser Part Number" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Mouser Price/Stock" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Arrow Part Number" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Arrow Price/Stock" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -15.5 -12.6 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 28 "unconnected-(IC1-WAKEUP_IN-Pad1)")
			(pinfunction "WAKEUP_IN")
			(pintype "passive")
		)
		(pad "2" smd rect
			(at -15.5 -11.3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 20 "unconnected-(IC1-AP_READY-Pad2)")
			(pinfunction "AP_READY")
			(pintype "passive")
		)
		(pad "3" smd rect
			(at -15.5 -10 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 2 "unconnected-(IC1-SLEEP_IND-Pad3)")
			(pinfunction "SLEEP_IND")
			(pintype "passive")
		)
		(pad "4" smd rect
			(at -15.5 -8.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 64 "unconnected-(IC1-W_DISABLE#-Pad4)")
			(pinfunction "W_DISABLE#")
			(pintype "passive")
		)
		(pad "5" smd rect
			(at -15.5 -7.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 99 "NET_M")
			(pinfunction "NET_MODE")
			(pintype "passive")
		)
		(pad "6" smd rect
			(at -15.5 -6.1 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "unconnected-(IC1-NET_STATUS-Pad6)")
			(pinfunction "NET_STATUS")
			(pintype "passive")
		)
		(pad "7" smd rect
			(at -15.5 -4.8 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 103 "+1V8")
			(pinfunction "VDD_EXT")
			(pintype "passive")
		)
		(pad "8" smd rect
			(at -15.5 -0.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_1")
			(pintype "passive")
		)
		(pad "9" smd rect
			(at -15.5 0.9 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_2")
			(pintype "passive")
		)
		(pad "10" smd rect
			(at -15.5 2.2 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 108 "sim_gnd")
			(pinfunction "USIM_GND")
			(pintype "passive")
		)
		(pad "11" smd rect
			(at -15.5 3.5 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 62 "unconnected-(IC1-DBG_RXD-Pad11)")
			(pinfunction "DBG_RXD")
			(pintype "passive")
		)
		(pad "12" smd rect
			(at -15.5 4.8 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 97 "unconnected-(IC1-DBG_TXD-Pad12)")
			(pinfunction "DBG_TXD")
			(pintype "passive")
		)
		(pad "13" smd rect
			(at -15.5 6.1 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 24 "unconnected-(IC1-USIM_DET-Pad13)")
			(pinfunction "USIM_DET")
			(pintype "passive")
		)
		(pad "14" smd rect
			(at -15.5 7.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 107 "sim_vdd")
			(pinfunction "USIM_VDD")
			(pintype "passive")
		)
		(pad "15" smd rect
			(at -15.5 8.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 110 "sim_io ")
			(pinfunction "USIM_DATA")
			(pintype "passive")
		)
		(pad "16" smd rect
			(at -15.5 10 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 109 "sim_clk")
			(pinfunction "USIM_CLK")
			(pintype "passive")
		)
		(pad "17" smd rect
			(at -15.5 11.3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 111 "sim_rst")
			(pinfunction "USIM_RST")
			(pintype "passive")
		)
		(pad "18" smd rect
			(at -15.5 12.6 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 80 "unconnected-(IC1-RESERVED_1-Pad18)")
			(pinfunction "RESERVED_1")
			(pintype "passive")
		)
		(pad "19" smd rect
			(at -9.55 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 59 "unconnected-(IC1-GND_3-Pad19)")
			(pinfunction "GND_3")
			(pintype "passive")
		)
		(pad "20" smd rect
			(at -8.25 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 34 "unconnected-(IC1-RESET_N-Pad20)")
			(pinfunction "RESET_N")
			(pintype "passive")
		)
		(pad "21" smd rect
			(at -6.95 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 105 "Net-(IC1-PWRKEY)")
			(pinfunction "PWRKEY")
			(pintype "passive")
		)
		(pad "22" smd rect
			(at -5.65 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 106 "Net-(IC1-GND_4)")
			(pinfunction "GND_4")
			(pintype "passive")
		)
		(pad "23" smd rect
			(at -4.35 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 13 "unconnected-(IC1-SD_DET-Pad23)")
			(pinfunction "SD_DET")
			(pintype "passive")
		)
		(pad "24" smd rect
			(at -3.05 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 91 "unconnected-(IC1-PCM_DIN-Pad24)")
			(pinfunction "PCM_DIN")
			(pintype "passive")
		)
		(pad "25" smd rect
			(at -1.75 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 49 "unconnected-(IC1-PCM_DOUT-Pad25)")
			(pinfunction "PCM_DOUT")
			(pintype "passive")
		)
		(pad "26" smd rect
			(at -0.45 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 15 "unconnected-(IC1-PCM_SYNC-Pad26)")
			(pinfunction "PCM_SYNC")
			(pintype "passive")
		)
		(pad "27" smd rect
			(at 0.85 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 31 "unconnected-(IC1-PCM_CLK-Pad27)")
			(pinfunction "PCM_CLK")
			(pintype "passive")
		)
		(pad "28" smd rect
			(at 2.15 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 26 "unconnected-(IC1-SDIO1_DATA3-Pad28)")
			(pinfunction "SDIO1_DATA3")
			(pintype "passive")
		)
		(pad "29" smd rect
			(at 3.45 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 57 "unconnected-(IC1-SDIO1_DATA2-Pad29)")
			(pinfunction "SDIO1_DATA2")
			(pintype "passive")
		)
		(pad "30" smd rect
			(at 4.75 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 7 "unconnected-(IC1-SDIO1_DATA1-Pad30)")
			(pinfunction "SDIO1_DATA1")
			(pintype "passive")
		)
		(pad "31" smd rect
			(at 6.05 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 54 "unconnected-(IC1-SDIO1_DATA0-Pad31)")
			(pinfunction "SDIO1_DATA0")
			(pintype "passive")
		)
		(pad "32" smd rect
			(at 7.35 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 75 "unconnected-(IC1-SDIO1_CLK-Pad32)")
			(pinfunction "SDIO1_CLK")
			(pintype "passive")
		)
		(pad "33" smd rect
			(at 8.65 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 18 "unconnected-(IC1-SDIO1_CMD-Pad33)")
			(pinfunction "SDIO1_CMD")
			(pintype "passive")
		)
		(pad "34" smd rect
			(at 9.95 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 11 "unconnected-(IC1-SDIO1_VDD-Pad34)")
			(pinfunction "SDIO1_VDD")
			(pintype "passive")
		)
		(pad "35" smd rect
			(at 11.25 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 85 "unconnected-(IC1-ANT_BT{slash}WIFI__SCAN-Pad35)")
			(pinfunction "ANT_BT/WIFI__SCAN")
			(pintype "passive")
		)
		(pad "36" smd rect
			(at 12.55 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 63 "unconnected-(IC1-GND_5-Pad36)")
			(pinfunction "GND_5")
			(pintype "passive")
		)
		(pad "37" smd rect
			(at 15.5 12.6 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 93 "unconnected-(IC1-SPI_CS-Pad37)")
			(pinfunction "SPI_CS")
			(pintype "passive")
		)
		(pad "38" smd rect
			(at 15.5 11.3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 27 "unconnected-(IC1-SPI_MOSI-Pad38)")
			(pinfunction "SPI_MOSI")
			(pintype "passive")
		)
		(pad "39" smd rect
			(at 15.5 10 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 4 "unconnected-(IC1-SPI_MISO-Pad39)")
			(pinfunction "SPI_MISO")
			(pintype "passive")
		)
		(pad "40" smd rect
			(at 15.5 8.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "unconnected-(IC1-SPI_CLK-Pad40)")
			(pinfunction "SPI_CLK")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at 15.5 7.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 32 "unconnected-(IC1-I2C_SCL-Pad41)")
			(pinfunction "I2C_SCL")
			(pintype "passive")
		)
		(pad "42" smd rect
			(at 15.5 6.1 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "unconnected-(IC1-I2C_SDA-Pad42)")
			(pinfunction "I2C_SDA")
			(pintype "passive")
		)
		(pad "43" smd rect
			(at 15.5 4.8 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 25 "unconnected-(IC1-ADC2-Pad43)")
			(pinfunction "ADC2")
			(pintype "passive")
		)
		(pad "44" smd rect
			(at 15.5 3.5 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 86 "unconnected-(IC1-ADC1-Pad44)")
			(pinfunction "ADC1")
			(pintype "passive")
		)
		(pad "45" smd rect
			(at 15.5 2.2 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 92 "unconnected-(IC1-ADC0-Pad45)")
			(pinfunction "ADC0")
			(pintype "passive")
		)
		(pad "46" smd rect
			(at 15.5 0.9 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_6")
			(pintype "passive")
		)
		(pad "47" smd rect
			(at 15.5 -0.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 84 "unconnected-(IC1-ANT_GNSS-Pad47)")
			(pinfunction "ANT_GNSS")
			(pintype "passive")
		)
		(pad "48" smd rect
			(at 15.5 -4.8 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_7")
			(pintype "passive")
		)
		(pad "49" smd rect
			(at 15.5 -6.1 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 104 "ANT_main")
			(pinfunction "ANT_MAIN")
			(pintype "passive")
		)
		(pad "50" smd rect
			(at 15.5 -7.4 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_8")
			(pintype "passive")
		)
		(pad "51" smd rect
			(at 15.5 -8.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_9")
			(pintype "passive")
		)
		(pad "52" smd rect
			(at 15.5 -10 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_10")
			(pintype "passive")
		)
		(pad "53" smd rect
			(at 15.5 -11.3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_11")
			(pintype "passive")
		)
		(pad "54" smd rect
			(at 15.5 -12.6 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_12")
			(pintype "passive")
		)
		(pad "55" smd rect
			(at 12.55 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 73 "unconnected-(IC1-RESERVED_2-Pad55)")
			(pinfunction "RESERVED_2")
			(pintype "passive")
		)
		(pad "56" smd rect
			(at 11.25 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 81 "unconnected-(IC1-GND_13-Pad56)")
			(pinfunction "GND_13")
			(pintype "passive")
		)
		(pad "57" smd rect
			(at 9.95 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VBAT_RF_1")
			(pintype "passive")
		)
		(pad "58" smd rect
			(at 8.65 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VBAT_RF_2")
			(pintype "passive")
		)
		(pad "59" smd rect
			(at 7.35 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VBAT_BB_1")
			(pintype "passive")
		)
		(pad "60" smd rect
			(at 6.05 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VBAT_BB_2")
			(pintype "passive")
		)
		(pad "61" smd rect
			(at 4.75 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 9 "unconnected-(IC1-STATUS-Pad61)")
			(pinfunction "STATUS")
			(pintype "passive")
		)
		(pad "62" smd rect
			(at 3.45 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 88 "unconnected-(IC1-MAIN_RI-Pad62)")
			(pinfunction "MAIN_RI")
			(pintype "passive")
		)
		(pad "63" smd rect
			(at 2.15 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 30 "unconnected-(IC1-MAIN_DCD-Pad63)")
			(pinfunction "MAIN_DCD")
			(pintype "passive")
		)
		(pad "64" smd rect
			(at 0.85 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 65 "unconnected-(IC1-MAIN_CTS-Pad64)")
			(pinfunction "MAIN_CTS")
			(pintype "passive")
		)
		(pad "65" smd rect
			(at -0.45 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 39 "unconnected-(IC1-MAIN_RTS-Pad65)")
			(pinfunction "MAIN_RTS")
			(pintype "passive")
		)
		(pad "66" smd rect
			(at -1.75 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 8 "unconnected-(IC1-MAIN_DTR-Pad66)")
			(pinfunction "MAIN_DTR")
			(pintype "passive")
		)
		(pad "67" smd rect
			(at -3.05 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 55 "/gtx")
			(pinfunction "MAIN_TXD")
			(pintype "passive")
		)
		(pad "68" smd rect
			(at -4.35 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 61 "/grx")
			(pinfunction "MAIN_RXD")
			(pintype "passive")
		)
		(pad "69" smd rect
			(at -5.65 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 78 "unconnected-(IC1-USB_DP-Pad69)")
			(pinfunction "USB_DP")
			(pintype "passive")
		)
		(pad "70" smd rect
			(at -6.95 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 17 "unconnected-(IC1-USB_DM-Pad70)")
			(pinfunction "USB_DM")
			(pintype "passive")
		)
		(pad "71" smd rect
			(at -8.25 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 44 "unconnected-(IC1-USB_VBUS-Pad71)")
			(pinfunction "USB_VBUS")
			(pintype "passive")
		)
		(pad "72" smd rect
			(at -9.55 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_14")
			(pintype "passive")
		)
		(pad "73" smd rect
			(at 2.4 -1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 116 "/spk+")
			(pinfunction "LOUDSPK__P")
			(pintype "passive")
		)
		(pad "74" smd rect
			(at 2.4 0)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 117 "/spk-")
			(pinfunction "LOUDSPK__N")
			(pintype "passive")
		)
		(pad "75" smd rect
			(at 2.4 1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 36 "/mic+")
			(pinfunction "MIC_P")
			(pintype "passive")
		)
		(pad "76" smd rect
			(at 0.8 -1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_15")
			(pintype "passive")
		)
		(pad "77" smd rect
			(at 0.8 0)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 115 "/mic-")
			(pinfunction "MIC_N")
			(pintype "passive")
		)
		(pad "78" smd rect
			(at 0.8 1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 16 "unconnected-(IC1-KEYIN1-Pad78)")
			(pinfunction "KEYIN1")
			(pintype "passive")
		)
		(pad "79" smd rect
			(at -0.8 -1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 89 "unconnected-(IC1-KEYIN2-Pad79)")
			(pinfunction "KEYIN2")
			(pintype "passive")
		)
		(pad "80" smd rect
			(at -0.8 0)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 12 "unconnected-(IC1-KEYIN3-Pad80)")
			(pinfunction "KEYIN3")
			(pintype "passive")
		)
		(pad "81" smd rect
			(at -0.8 1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 71 "unconnected-(IC1-RESERVED_3-Pad81)")
			(pinfunction "RESERVED_3")
			(pintype "passive")
		)
		(pad "82" smd rect
			(at -2.4 -1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 72 "unconnected-(IC1-RESERVED_4-Pad82)")
			(pinfunction "RESERVED_4")
			(pintype "passive")
		)
		(pad "83" smd rect
			(at -2.4 0)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 58 "unconnected-(IC1-KEYOUT0-Pad83)")
			(pinfunction "KEYOUT0")
			(pintype "passive")
		)
		(pad "84" smd rect
			(at -2.4 1.6)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 79 "unconnected-(IC1-KEYOUT1-Pad84)")
			(pinfunction "KEYOUT1")
			(pintype "passive")
		)
		(pad "85" smd rect
			(at 8.2 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_16")
			(pintype "passive")
		)
		(pad "86" smd rect
			(at 8.2 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_17")
			(pintype "passive")
		)
		(pad "87" smd rect
			(at 8.2 0)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_18")
			(pintype "passive")
		)
		(pad "88" smd rect
			(at 8.2 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_19")
			(pintype "passive")
		)
		(pad "89" smd rect
			(at 8.2 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_20")
			(pintype "passive")
		)
		(pad "90" smd rect
			(at 5 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_21")
			(pintype "passive")
		)
		(pad "91" smd rect
			(at 5 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_22")
			(pintype "passive")
		)
		(pad "92" smd rect
			(at 5 0)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_23")
			(pintype "passive")
		)
		(pad "93" smd rect
			(at 5 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_24")
			(pintype "passive")
		)
		(pad "94" smd rect
			(at 5 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_25")
			(pintype "passive")
		)
		(pad "95" smd rect
			(at 1.6 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_26")
			(pintype "passive")
		)
		(pad "96" smd rect
			(at 1.6 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_27")
			(pintype "passive")
		)
		(pad "97" smd rect
			(at 1.6 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_28")
			(pintype "passive")
		)
		(pad "98" smd rect
			(at 1.6 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_29")
			(pintype "passive")
		)
		(pad "99" smd rect
			(at -1.6 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_30")
			(pintype "passive")
		)
		(pad "100" smd rect
			(at -1.6 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_31")
			(pintype "passive")
		)
		(pad "101" smd rect
			(at -1.6 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_32")
			(pintype "passive")
		)
		(pad "102" smd rect
			(at -1.6 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_33")
			(pintype "passive")
		)
		(pad "103" smd rect
			(at -5 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_34")
			(pintype "passive")
		)
		(pad "104" smd rect
			(at -5 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_35")
			(pintype "passive")
		)
		(pad "105" smd rect
			(at -5 0)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_36")
			(pintype "passive")
		)
		(pad "106" smd rect
			(at -5 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_37")
			(pintype "passive")
		)
		(pad "107" smd rect
			(at -5 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_38")
			(pintype "passive")
		)
		(pad "108" smd rect
			(at -8.2 -9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_39")
			(pintype "passive")
		)
		(pad "109" smd rect
			(at -8.2 -4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_40")
			(pintype "passive")
		)
		(pad "110" smd rect
			(at -8.2 0)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_41")
			(pintype "passive")
		)
		(pad "111" smd rect
			(at -8.2 4.8)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_42")
			(pintype "passive")
		)
		(pad "112" smd rect
			(at -8.2 9.6)
			(size 2 3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND_43")
			(pintype "passive")
		)
		(pad "113" smd rect
			(at -10.85 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 29 "unconnected-(IC1-KEYOUT2-Pad113)")
			(pinfunction "KEYOUT2")
			(pintype "passive")
		)
		(pad "114" smd rect
			(at -12.15 -14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 14 "unconnected-(IC1-KEYOUT3-Pad114)")
			(pinfunction "KEYOUT3")
			(pintype "passive")
		)
		(pad "115" smd rect
			(at -10.85 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 68 "unconnected-(IC1-USB_BOOT-Pad115)")
			(pinfunction "USB_BOOT")
			(pintype "passive")
		)
		(pad "116" smd rect
			(at -12.15 14)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 53 "unconnected-(IC1-RESERVED_5-Pad116)")
			(pinfunction "RESERVED_5")
			(pintype "passive")
		)
		(pad "117" smd rect
			(at -11 -11)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 90 "unconnected-(IC1-RESERVED_6-Pad117)")
			(pinfunction "RESERVED_6")
			(pintype "passive")
		)
		(pad "118" smd rect
			(at -11 -9)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 82 "unconnected-(IC1-WLAN_SLP__CLK-Pad118)")
			(pinfunction "WLAN_SLP__CLK")
			(pintype "passive")
		)
		(pad "119" smd rect
			(at -11 -7)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 46 "unconnected-(IC1-LCD_FMARK-Pad119)")
			(pinfunction "LCD_FMARK")
			(pintype "passive")
		)
		(pad "120" smd rect
			(at -11 -5)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "unconnected-(IC1-LCD_RSTB-Pad120)")
			(pinfunction "LCD_RSTB")
			(pintype "passive")
		)
		(pad "121" smd rect
			(at -11 -3)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 98 "unconnected-(IC1-LCD_SEL-Pad121)")
			(pinfunction "LCD_SEL")
			(pintype "passive")
		)
		(pad "122" smd rect
			(at -11 -1)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 51 "unconnected-(IC1-LCD_CS-Pad122)")
			(pinfunction "LCD_CS")
			(pintype "passive")
		)
		(pad "123" smd rect
			(at -11 1)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 40 "unconnected-(IC1-LCD_CLK-Pad123)")
			(pinfunction "LCD_CLK")
			(pintype "passive")
		)
		(pad "124" smd rect
			(at -11 3)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 77 "unconnected-(IC1-LCD_SDC-Pad124)")
			(pinfunction "LCD_SDC")
			(pintype "passive")
		)
		(pad "125" smd rect
			(at -11 5)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "unconnected-(IC1-LCD_SI{slash}O-Pad125)")
			(pinfunction "LCD_SI/O")
			(pintype "passive")
		)
		(pad "126" smd rect
			(at -11 7)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 56 "unconnected-(IC1-GPIO1-Pad126)")
			(pinfunction "GPIO1")
			(pintype "passive")
		)
		(pad "127" smd rect
			(at -11 9)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 87 "unconnected-(IC1-WLAN_PWR__EN-Pad127)")
			(pinfunction "WLAN_PWR__EN")
			(pintype "passive")
		)
		(pad "128" smd rect
			(at -11 11)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 19 "unconnected-(IC1-USIM2_VDD-Pad128)")
			(pinfunction "USIM2_VDD")
			(pintype "passive")
		)
		(pad "129" smd rect
			(at -13 -11)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 33 "unconnected-(IC1-SDIO2_DATA3-Pad129)")
			(pinfunction "SDIO2_DATA3")
			(pintype "passive")
		)
		(pad "130" smd rect
			(at -13 -9)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 60 "unconnected-(IC1-SDIO2_DATA2-Pad130)")
			(pinfunction "SDIO2_DATA2")
			(pintype "passive")
		)
		(pad "131" smd rect
			(at -13 -7)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 42 "unconnected-(IC1-SDIO2_DATA1-Pad131)")
			(pinfunction "SDIO2_DATA1")
			(pintype "passive")
		)
		(pad "132" smd rect
			(at -13 -5)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 45 "unconnected-(IC1-SDIO2_DATA0-Pad132)")
			(pinfunction "SDIO2_DATA0")
			(pintype "passive")
		)
		(pad "133" smd rect
			(at -13 -3)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 96 "unconnected-(IC1-SDIO2_CLK-Pad133)")
			(pinfunction "SDIO2_CLK")
			(pintype "passive")
		)
		(pad "134" smd rect
			(at -13 -1)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 50 "unconnected-(IC1-SDIO2_CMD-Pad134)")
			(pinfunction "SDIO2_CMD")
			(pintype "passive")
		)
		(pad "135" smd rect
			(at -13 1)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 38 "unconnected-(IC1-WLAN_WAKE-Pad135)")
			(pinfunction "WLAN_WAKE")
			(pintype "passive")
		)
		(pad "136" smd rect
			(at -13 3)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 52 "unconnected-(IC1-WLAN_EN-Pad136)")
			(pinfunction "WLAN_EN")
			(pintype "passive")
		)
		(pad "137" smd rect
			(at -13 5)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 47 "unconnected-(IC1-AUX_RXD-Pad137)")
			(pinfunction "AUX_RXD")
			(pintype "passive")
		)
		(pad "138" smd rect
			(at -13 7)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 66 "unconnected-(IC1-AUX_TXD-Pad138)")
			(pinfunction "AUX_TXD")
			(pintype "passive")
		)
		(pad "139" smd rect
			(at -13 9)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 41 "unconnected-(IC1-BT_EN-Pad139)")
			(pinfunction "BT_EN")
			(pintype "passive")
		)
		(pad "140" smd rect
			(at -13 11)
			(size 1.1 1.1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 76 "unconnected-(IC1-ISINK-Pad140)")
			(pinfunction "ISINK")
			(pintype "passive")
		)
		(pad "141" smd rect
			(at -15.5 -3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 37 "unconnected-(IC1-I2C2_SCL-Pad141)")
			(pinfunction "I2C2_SCL")
			(pintype "passive")
		)
		(pad "142" smd rect
			(at -15.5 -1.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 35 "unconnected-(IC1-I2C2_SDA-Pad142)")
			(pinfunction "I2C2_SDA")
			(pintype "passive")
		)
		(pad "143" smd rect
			(at 15.5 -1.7 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 43 "unconnected-(IC1-GRFC1-Pad143)")
			(pinfunction "GRFC1")
			(pintype "passive")
		)
		(pad "144" smd rect
			(at 15.5 -3 90)
			(size 0.8 2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 23 "unconnected-(IC1-GRFC2-Pad144)")
			(pinfunction "GRFC2")
			(pintype "passive")
		)
		(model "D:/Projects/Sandeep_old_pc/kicad libs & 3d downloaded/quectel ec200u/EC200UEUAA-N05-MN0AA--3DModel-STEP-258128.STEP"
			(offset
				(xyz 0 0 0.4)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 90)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 135 107 180)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R5"
			(at 0 -1.65 180)
			(layer "F.SilkS")
		)
		(property "Value" "1K"
			(at 0 1.65 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0 180)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 106 "Net-(IC1-GND_4)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0 180)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 105 "Net-(IC1-PWRKEY)")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 165.7085 96.52)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C11"
			(at 1.6775 0 0)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 0)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:SOT-23"
		(layer "F.Cu")
		(at 113.9375 81 180)
		(descr "SOT, 3 Pin (https://www.jedec.org/system/files/docs/to-236h.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "SOT TO_SOT_SMD")
		(property "Reference" "Q1"
			(at 0 -3 180)
			(layer "F.SilkS")
		)
		(property "Value" "BC817"
			(at 0 2.4 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BC818-D.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT?23*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.9375 -0.95 180)
			(size 1.475 0.6)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 94 "Net-(Q1-B)")
			(pinfunction "B")
			(pintype "input")
		)
		(pad "2" smd roundrect
			(at -0.9375 0.95 180)
			(size 1.475 0.6)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pinfunction "E")
			(pintype "passive")
		)
		(pad "3" smd roundrect
			(at 0.9375 0 180)
			(size 1.475 0.6)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 83 "Net-(Q1-C)")
			(pinfunction "C")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/SOT-23.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_SO:VSSOP-8_2.4x2.1mm_P0.5mm"
		(layer "F.Cu")
		(at 112.55 72)
		(descr "http://www.ti.com/lit/ml/mpds050d/mpds050d.pdf")
		(tags "VSSOP DCU R-PDSO-G8 Pitch0.5mm")
		(property "Reference" "U1"
			(at 0 -2.54 0)
			(layer "F.SilkS")
		)
		(property "Value" "TXB0102DCU"
			(at 0 2.413 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Package_SO:VSSOP-8_2.4x2.1mm_P0.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "http://www.ti.com/lit/ds/symlink/txb0102.pdf"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "2-Bit Bidirectional Voltage-Level Translator in VSSOP Package With Auto Direction Sensing and ±15-kV ESD Protection"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "VSSOP*P0.5mm*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.25 0)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -1.55 -0.75)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 102 "/sTx")
			(pinfunction "B2")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at -1.55 -0.25)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "3" smd rect
			(at -1.55 0.25)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 103 "+1V8")
			(pinfunction "VCCA")
			(pintype "power_in")
		)
		(pad "4" smd rect
			(at -1.55 0.75)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 61 "/grx")
			(pinfunction "A2")
			(pintype "bidirectional")
		)
		(pad "5" smd rect
			(at 1.55 0.75)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 55 "/gtx")
			(pinfunction "A1")
			(pintype "bidirectional")
		)
		(pad "6" smd rect
			(at 1.55 0.25)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 100 "unconnected-(U1-OE-Pad6)")
			(pinfunction "OE")
			(pintype "input")
		)
		(pad "7" smd rect
			(at 1.55 -0.25)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VCCB")
			(pintype "power_in")
		)
		(pad "8" smd rect
			(at 1.55 -0.75)
			(size 0.75 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 101 "/sRx")
			(pinfunction "B1")
			(pintype "bidirectional")
		)
		(model "${KICAD8_3DMODEL_DIR}/Package_SO.3dshapes/VSSOP-8_2.4x2.1mm_P0.5mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 114 90)
		(descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "LED handsolder")
		(property "Reference" "D1"
			(at 0 -1.65 0)
			(layer "F.SilkS")
		)
		(property "Value" "LED"
			(at 0 1.65 0)
			(layer "F.Fab")
		)
		(property "Footprint" "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "LED* LED_SMD:* LED_THT:*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.025 0)
			(size 1.15 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.217391)
			(net 21 "Net-(D1-K)")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.025 0)
			(size 1.15 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.217391)
			(net 3 "+4V")
			(pinfunction "A")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 161.925 87.63 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C22"
			(at 1.651 -0.127 -90)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 -90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 116 "/spk+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 117 81 90)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R2"
			(at -3 0 -90)
			(layer "F.SilkS")
		)
		(property "Value" "47k"
			(at 0 1.65 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0 90)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 94 "Net-(Q1-B)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0 90)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_SO:SOIC-8W_5.3x5.3mm_P1.27mm"
		(layer "F.Cu")
		(at 101.35 72.365 180)
		(descr "8-Lead Plastic Small Outline (SM) - 5.28 mm Body [SOIC] (http://ww1.microchip.com/downloads/en/PackagingSpec/00000049BQ.pdf)")
		(tags "SOIC 1.27")
		(property "Reference" "U2"
			(at 0 -0.635 180)
			(layer "F.SilkS")
		)
		(property "Value" "ATtiny85-20S"
			(at 0 3.68 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Package_SO:SOIC-8W_5.3x5.3mm_P1.27mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "http://ww1.microchip.com/downloads/en/DeviceDoc/atmel-2586-avr-8-bit-microcontroller-attiny25-attiny45-attiny85_datasheet.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "20MHz, 8kB Flash, 512B SRAM, 512B EEPROM, debugWIRE, SOIC-8W"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOIC*5.3x5.3mm*P1.27mm*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -3.65 -1.905 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 74 "reset")
			(pinfunction "~{RESET}/PB5")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at -3.65 -0.635 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 101 "/sRx")
			(pinfunction "XTAL1/PB3")
			(pintype "bidirectional")
		)
		(pad "3" smd rect
			(at -3.65 0.635 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 102 "/sTx")
			(pinfunction "XTAL2/PB4")
			(pintype "bidirectional")
		)
		(pad "4" smd rect
			(at -3.65 1.905 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "5" smd rect
			(at 3.65 1.905 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 67 "mosi")
			(pinfunction "AREF/PB0")
			(pintype "bidirectional")
		)
		(pad "6" smd rect
			(at 3.65 0.635 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 69 "miso")
			(pinfunction "PB1")
			(pintype "bidirectional")
		)
		(pad "7" smd rect
			(at 3.65 -0.635 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 70 "sck")
			(pinfunction "PB2")
			(pintype "bidirectional")
		)
		(pad "8" smd rect
			(at 3.65 -1.905 180)
			(size 1.7 0.65)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "+4V")
			(pinfunction "VCC")
			(pintype "power_in")
		)
		(model "C:/Users/Sandeep/Pictures/3d files/ATTINY85-20SU--3DModel-STEP-269445.STEP"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 119 81 -90)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R3"
			(at 3 0 90)
			(layer "F.SilkS")
		)
		(property "Value" "4.7k"
			(at 0 1.65 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0 270)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 99 "NET_M")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0 270)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 94 "Net-(Q1-B)")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 164.9215 98.679 180)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C16"
			(at 1.7265 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "33pf"
			(at 0 1.05 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 180)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 180)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 180)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 180)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 180)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_JST:JST_PH_S2B-PH-K_1x02_P2.00mm_Horizontal"
		(layer "F.Cu")
		(at 163.55 66 90)
		(descr "JST PH series connector, S2B-PH-K (http://www.jst-mfg.com/product/pdf/eng/ePH.pdf), generated with kicad-footprint-generator")
		(tags "connector JST PH top entry")
		(property "Reference" "J1"
			(at 1 -2.55 -90)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 1 8.45 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_JST:JST_PH_S2B-PH-K_1x02_P2.00mm_Horizontal"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x02, script generated"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1 2.5 -90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole roundrect
			(at 0 0 90)
			(size 1.2 1.75)
			(drill 0.75)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(roundrect_rratio 0.208333)
			(net 3 "+4V")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 2 0 90)
			(size 1.2 1.75)
			(drill 0.75)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 10 "GND")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Connector_JST.3dshapes/JST_PH_S2B-PH-K_1x02_P2.00mm_Horizontal.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Sensor_Audio:CUI_CMC-4013-SMT"
		(layer "F.Cu")
		(at 164.846 102.594)
		(descr "Omnidirectional, -42dB, reflowable, electret condenser microphone https://www.cuidevices.com/product/resource/cmc-4013-smt-tr.pdf")
		(tags "Microphone CUI ")
		(property "Reference" "MK1"
			(at -0.127 3.07 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Microphone"
			(at 0 3 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Sensor_Audio:CUI_CMC-4013-SMT"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Microphone"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd custom
			(at 0 -1.375)
			(size 0.75 0.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 115 "/mic-")
			(pinfunction "-")
			(pintype "passive")
			(zone_connect 0)
			(options
				(clearance outline)
				(anchor circle)
			)
			(primitives
				(gr_circle
					(center 0 1.375)
					(end 1.375 1.375)
					(width 0.75)
					(fill no)
				)
			)
		)
		(pad "2" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 36 "/mic+")
			(pinfunction "+")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Sensor_Audio.3dshapes/CUI_CMC-4013-SMT.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 161.1115 87.63 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C17"
			(at 1.651 -0.0755 -90)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 -90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 -90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 116 "/spk+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Connector_Coaxial:U.FL_Molex_MCRF_73412-0110_Vertical"
		(layer "F.Cu")
		(at 164 82 -90)
		(descr "Molex Microcoaxial RF Connectors (MCRF), mates Hirose U.FL, (http://www.molex.com/pdm_docs/sd/734120110_sd.pdf)")
		(tags "mcrf hirose ufl u.fl microcoaxial")
		(property "Reference" "AE1"
			(at -3.133 -0.084 180)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "U.FL "
			(at 0 -3.302 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_Coaxial:U.FL_Molex_MCRF_73412-0110_Vertical"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 3.5 90)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at 0 1.5 270)
			(size 1 1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 104 "ANT_main")
			(pinfunction "A")
			(pintype "input")
		)
		(pad "2" smd rect
			(at -1.475 0 270)
			(size 1.05 2.2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "Shield")
			(pintype "input")
		)
		(pad "2" smd rect
			(at 0 -1.5 270)
			(size 1 1)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "Shield")
			(pintype "input")
		)
		(pad "2" smd rect
			(at 1.475 0 270)
			(size 1.05 2.2)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 10 "GND")
			(pinfunction "Shield")
			(pintype "input")
		)
		(model "${KICAD8_3DMODEL_DIR}/Connector_Coaxial.3dshapes/U.FL_Molex_MCRF_73412-0110_Vertical.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
		(model "${KICAD8_3DMODEL_DIR}/Connector_Coaxial.3dshapes/U.FL_Hirose_U.FL-R-SMT-1_Vertical.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 -90)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 164 74 180)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R4"
			(at -3 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "2.2k"
			(at 0 1.65 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0 180)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0 180)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 48 "Net-(D2-K)")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 163.703 88.9 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C20"
			(at 1.651 -0.127 90)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 90)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 116 "/spk+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/spk-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
		(layer "F.Cu")
		(at 147 69 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C1"
			(at 0 -2 180)
			(layer "F.SilkS")
		)
		(property "Value" "100nf"
			(at 0 1.68 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.0375 0 180)
			(size 1.175 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.212766)
			(net 3 "+4V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.0375 0 180)
			(size 1.175 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.212766)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "F.Cu")
		(at 164.9215 99.568 180)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C15"
			(at -1.7025 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "10pf"
			(at 0 1.05 180)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.68 180)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 180)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 180)
			(size 0.458 0.36)
			(layers "F.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 180)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 180)
			(size 0.635 0.4)
			(layers "F.Cu" "F.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 118 90)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R1"
			(at 0 -1.65 0)
			(layer "F.SilkS")
		)
		(property "Value" "2.2k"
			(at 0 1.65 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 83 "Net-(Q1-C)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0)
			(size 1.2 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.208333)
			(net 21 "Net-(D1-K)")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
		(layer "F.Cu")
		(at 164 72)
		(descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "LED handsolder")
		(property "Reference" "D2"
			(at 3 0 0)
			(layer "F.SilkS")
		)
		(property "Value" "LED"
			(at 0 1.65 0)
			(layer "F.Fab")
		)
		(property "Footprint" "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "LED* LED_SMD:* LED_THT:*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.025 0)
			(size 1.15 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.217391)
			(net 48 "Net-(D2-K)")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.025 0)
			(size 1.15 1.4)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.217391)
			(net 3 "+4V")
			(pinfunction "A")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 144.145 87.122 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C6"
			(at -0.254 0.635 -90)
			(layer "B.SilkS")
		)
		(property "Value" "10pf"
			(at 0 -1.05 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 144.907 87.122 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C7"
			(at -0.127 -0.889 90)
			(layer "B.SilkS")
		)
		(property "Value" "33pf"
			(at 0 -1.05 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 145 89 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C10"
			(at -0.154 0.669 -90)
			(layer "B.SilkS")
		)
		(property "Value" "33pf"
			(at 0 -1.05 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 -90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 144.145 89 90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C9"
			(at 0.1 -0.635 -90)
			(layer "B.SilkS")
		)
		(property "Value" "10pf"
			(at 0 -1.05 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 -90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 90)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 90)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 90)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 90)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/mic-")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Symbol:OSHW-Logo_11.4x12mm_SilkScreen"
		(layer "B.Cu")
		(at 139.5222 71.9836 180)
		(descr "Open Source Hardware Logo")
		(tags "Logo OSHW")
		(property "Reference" "REF**"
			(at 0 0 180)
			(layer "B.SilkS")
			(hide yes)
		)
		(property "Value" "OSHW-Logo_11.4x12mm_SilkScreen"
			(at 0.75 0 180)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Footprint" "Symbol:OSHW-Logo_11.4x12mm_SilkScreen"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(attr exclude_from_pos_files exclude_from_bom)
	)
	(footprint "Package_TO_SOT_SMD:SOT-323_SC-70"
		(layer "B.Cu")
		(at 159.893 84.963 90)
		(descr "SOT-323, SC-70")
		(tags "SOT-323 SC-70")
		(property "Reference" "D4"
			(at -0.05 2.25 -90)
			(layer "B.SilkS")
		)
		(property "Value" "SP0502BAJT"
			(at -0.05 -2.05 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" "http://www.littelfuse.com/~/media/files/littelfuse/technical%20resources/documents/data%20sheets/sp05xxba.pdf"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "TVS Diode Array, 5.5V Standoff, 2 Channels, SC-70 package"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT?323*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0.65 180)
			(size 0.45 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/spk-")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at -1 -0.65 180)
			(size 0.45 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 116 "/spk+")
			(pinfunction "K")
			(pintype "passive")
		)
		(pad "3" smd roundrect
			(at 1 0 180)
			(size 0.45 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pinfunction "A")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/SOT-323_SC-70.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
		(layer "B.Cu")
		(at 118.0375 89 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C4"
			(at 0 1.68 180)
			(layer "B.SilkS")
		)
		(property "Value" "100nf"
			(at 0 -1.68 180)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.0375 0 180)
			(size 1.175 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.212766)
			(net 108 "sim_gnd")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.0375 0 180)
			(size 1.175 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.212766)
			(net 107 "sim_vdd")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Micro sim 6 pin sim 800:micro sim 6 pin"
		(layer "B.Cu")
		(at 104.089 92.2685 180)
		(property "Reference" "R6"
			(at -1.911 -5.7315 0)
			(unlocked yes)
			(layer "B.SilkS")
		)
		(property "Value" "sim_holder"
			(at 0 -1 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "Micro sim 6 pin sim 800:micro sim 6 pin"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -14.597 -6.743 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(fp_text user "${REFERENCE}"
			(at 0 -2.5 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -14.097 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 108 "sim_gnd")
			(pinfunction "GND")
			(pintype "input")
		)
		(pad "2" smd roundrect
			(at -12.827 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 107 "sim_vdd")
			(pinfunction "VCC")
			(pintype "input")
		)
		(pad "3" smd roundrect
			(at -11.557 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 114 "unconnected-(R6-VPP-Pad3)")
			(pinfunction "VPP")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at -10.287 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 111 "sim_rst")
			(pinfunction "RST")
			(pintype "input")
		)
		(pad "5" smd roundrect
			(at -9.017 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 112 "sim_io")
			(pinfunction "I/O")
			(pintype "input")
		)
		(pad "6" smd roundrect
			(at -7.747 -1.143 270)
			(size 2.286 0.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 109 "sim_clk")
			(pinfunction "CLK")
			(pintype "input")
		)
		(pad "7" smd roundrect
			(at -15.875 -15.693 270)
			(size 3 2)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 113 "unconnected-(R6-shield-Pad7)")
			(pinfunction "shield")
			(pintype "input")
		)
		(pad "8" smd roundrect
			(at -15.875 -2.921 270)
			(size 3 2)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
		)
		(pad "9" smd roundrect
			(at -0.127 -2.921 270)
			(size 3 2)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
		)
		(pad "10" smd roundrect
			(at 0.053 -15.621 270)
			(size 3 2)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
		)
		(model "D:/Projects/Sandeep_old_pc/kicad libs & 3d downloaded/sim tray sim800 6pin.STEP"
			(offset
				(xyz -7.7 -8.9 1.35)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
		(layer "B.Cu")
		(at 113.2575 88.97 180)
		(descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor handsolder")
		(property "Reference" "R7"
			(at 0 1.65 180)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.65 180)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1 0 180)
			(size 1.2 1.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.208333)
			(net 107 "sim_vdd")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1 0 180)
			(size 1.2 1.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.208333)
			(net 112 "sim_io")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 144.907 90.932 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C8"
			(at 0 -0.635 90)
			(layer "B.SilkS")
		)
		(property "Value" "33pf"
			(at 0 -1.05 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
		(layer "B.Cu")
		(at 144.145 90.932 -90)
		(descr "Capacitor SMD 0201 (0603 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://www.vishay.com/docs/20052/crcw0201e3.pdf), generated with kicad-footprint-generator")
		(tags "capacitor handsolder")
		(property "Reference" "C5"
			(at 0 0.635 90)
			(layer "B.SilkS")
		)
		(property "Value" "10pf"
			(at 0 -1.05 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 0 0 90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Root")
		(sheetfile "Busi_card_v1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.68 90)
			(layer "B.Fab")
		)
		(pad "" smd roundrect
			(at -0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "" smd roundrect
			(at 0.4325 0 270)
			(size 0.458 0.36)
			(layers "B.Paste")
			(roundrect_rratio 0.25)
		)
		(pad "1" smd roundrect
			(at -0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "/mic+")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.4075 0 270)
			(size 0.635 0.4)
			(layers "B.Cu" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0201_0603Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(gr_rect
		(start 80 60)
		(end 170 110)
		(fill none)
		(layer "Edge.Cuts")
	)
	(gr_text "Micro SIM"
		(at 102.616 97.2058 90)
		(layer "B.SilkS" knockout)
	)
	(gr_text "Contact info -\nMB - +91xx3234xx\nEmail - kicad@kicad.com"
		(at 156.7434 105.8164 0)
		(layer "B.SilkS")
	)
	(gr_text "LTE MODULE EC200U"
		(at 139 107 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "ATtiny85"
		(at 98.298 77.1398 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "8Ohm\n500mW"
		(at 165.989 94.107 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "SANDEEP SINGH\n"
		(at 82.1944 86.7664 0)
		(layer "F.SilkS")
	)
	(gr_text "MIC-4013"
		(at 160.909 106.426 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "s-"
		(at 169.0878 88.4682 90)
		(layer "F.SilkS" knockout)
	)
	(gr_text "Prog. port\n"
		(at 109.4994 62.3316 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "Flicker slowly - Network searching\nFlicker normally - Idle\nFlicker fast - Data transfer \nAlways high - Voice calling"
		(at 101 97 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "Anttena"
		(at 161.163 78.9178 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "s+"
		(at 169.0878 91.1606 90)
		(layer "F.SilkS" knockout)
	)
	(gr_text "Embedded Engineer\n"
		(at 82.4738 107.8738 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "PRESS*"
		(at 85 74 0)
		(layer "F.SilkS" knockout)
	)
	(gr_text "BATTERY\n3V3-4V3"
		(at 158.3436 61.849 270)
		(layer "F.SilkS" knockout)
	)
	(zone
		(net 10)
		(net_name "GND")
		(layers "F&B.Cu")
		(hatch edge 0.5)
		(connect_pads
			(clearance 0.5)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 76 59) (xy 171 59) (xy 171 110) (xy 79 110) (xy 79 60) (xy 76 60)
			)
		)
	)
)