(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(lib_symbols
		(symbol "Connector:Conn_01x02_Pin"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 2.54 0)
			)
			(property "Value" "Conn_01x02_Pin"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x02, script generated"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x02_Pin_1_1"
				(polyline
					(pts
						(xy 1.27 -2.54) (xy 0.8636 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0) (xy 0.8636 0)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 0.8636 -2.413)
					(end 0 -2.667)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 0.8636 0.127)
					(end 0 -0.127)
					(fill
						(type outline)
					)
				)
				(pin passive line
					(at 5.08 0 180)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at 5.08 -2.54 180)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
			)
		)
		(symbol "Connector:Conn_01x02_Socket"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 2.54 0)
			)
			(property "Value" "Conn_01x02_Socket"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x02, script generated"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x02_Socket_1_1"
				(arc
					(start 0 -2.032)
					(mid -0.5058 -2.54)
					(end 0 -3.048)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -2.54) (xy -0.508 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy -0.508 0)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0.508)
					(mid -0.5058 0)
					(end 0 -0.508)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
			)
		)
		(symbol "Connector:Conn_01x05_Socket"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 7.62 0)
			)
			(property "Value" "Conn_01x05_Socket"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x05, script generated"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x05_Socket_1_1"
				(arc
					(start 0 -4.572)
					(mid -0.5058 -5.08)
					(end 0 -5.588)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -2.032)
					(mid -0.5058 -2.54)
					(end 0 -3.048)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -5.08) (xy -0.508 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -2.54) (xy -0.508 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy -0.508 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.54) (xy -0.508 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 5.08) (xy -0.508 5.08)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0.508)
					(mid -0.5058 0)
					(end 0 -0.508)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 3.048)
					(mid -0.5058 2.54)
					(end 0 2.032)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 5.588)
					(mid -0.5058 5.08)
					(end 0 4.572)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
			)
		)
		(symbol "Device:Antenna_Shield"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "AE"
				(at -1.905 4.445 0)
			)
			(property "Value" "Antenna_Shield"
				(at -1.905 2.54 0)
			)
			(property "Footprint" ""
				(at 0 2.54 0)
			)
			(property "Datasheet" "~"
				(at 0 2.54 0)
			)
			(property "Description" "Antenna with extra pin for shielding"
				(at 0 0 0)
			)
			(property "ki_keywords" "antenna"
				(at 0 0 0)
			)
			(symbol "Antenna_Shield_0_1"
				(arc
					(start -0.508 -1.143)
					(mid -0.8485 -2.1032)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -2.667)
					(mid 0.8047 -2.0885)
					(end 0.508 -1.143)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.54) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 5.08) (xy 0 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.905) (xy 2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.08) (xy 0 0) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0.762 -1.905)
					(radius 0.1778)
					(fill
						(type outline)
					)
				)
			)
			(symbol "Antenna_Shield_1_1"
				(pin input line
					(at 0 -5.08 90)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin input line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "Shield")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized_Small"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.254 1.778 0)
			)
			(property "Value" "C_Polarized_Small"
				(at 0.254 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_Small_0_1"
				(rectangle
					(start -1.524 -0.3048)
					(end 1.524 -0.6858)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -1.524 0.6858)
					(end 1.524 0.3048)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.524) (xy -0.762 1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.016 1.27) (xy -1.016 1.778)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Polarized_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 1.8542)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 1.8542)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Small"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.254 1.778 0)
			)
			(property "Value" "C_Small"
				(at 0.254 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "capacitor cap"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_Small_0_1"
				(polyline
					(pts
						(xy -1.524 -0.508) (xy 1.524 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.524 0.508) (xy 1.524 0.508)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 2.032)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 2.032)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:LED"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "LED"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Light emitting diode"
				(at 0 0 0)
			)
			(property "ki_keywords" "LED diode"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "LED* LED_SMD:* LED_THT:*"
				(at 0 0 0)
			)
			(symbol "LED_0_1"
				(polyline
					(pts
						(xy -1.27 -1.27) (xy -1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.27) (xy 1.27 1.27) (xy -1.27 0) (xy 1.27 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.048 -0.762) (xy -4.572 -2.286) (xy -3.81 -2.286) (xy -4.572 -2.286) (xy -4.572 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 -0.762) (xy -3.302 -2.286) (xy -2.54 -2.286) (xy -3.302 -2.286) (xy -3.302 -1.524)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "LED_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
		)
		(symbol "Device:Microphone"
			(pin_names
				(offset 0.0254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "MK"
				(at -3.81 1.27 0)
			)
			(property "Value" "Microphone"
				(at -3.81 -0.635 0)
			)
			(property "Footprint" ""
				(at 0 2.54 90)
			)
			(property "Datasheet" "~"
				(at 0 2.54 90)
			)
			(property "Description" "Microphone"
				(at 0 0 0)
			)
			(property "ki_keywords" "microphone"
				(at 0 0 0)
			)
			(symbol "Microphone_0_1"
				(polyline
					(pts
						(xy -2.54 2.54) (xy -2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 3.81) (xy 0.762 3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.508 4.064) (xy 0.508 3.556)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 0)
					(radius 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "Microphone_1_1"
				(pin passive line
					(at 0 -5.08 90)
					(length 2.54)
					(name "-")
					(number "1")
				)
				(pin passive line
					(at 0 5.08 270)
					(length 2.54)
					(name "+")
					(number "2")
				)
			)
		)
		(symbol "Device:R_Small"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 0.762 0.508 0)
			)
			(property "Value" "R_Small"
				(at 0.762 -1.016 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_Small_0_1"
				(rectangle
					(start -0.762 1.778)
					(end 0.762 -1.778)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 0.762)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 0.762)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_Small_US"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 0.762 0.508 0)
			)
			(property "Value" "R_Small_US"
				(at 0.762 -1.016 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, small US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "r resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_Small_US_1_1"
				(polyline
					(pts
						(xy 0 0) (xy 1.016 -0.381) (xy 0 -0.762) (xy -1.016 -1.143) (xy 0 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.524) (xy 1.016 1.143) (xy 0 0.762) (xy -1.016 0.381) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at 0 2.54 270)
					(length 1.016)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 1.016)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "EC200U:EC200U"
			(pin_names
				(offset 0.762)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "IC"
				(at 52.07 7.62 0)
			)
			(property "Value" "EC200U"
				(at 52.07 5.08 0)
			)
			(property "Footprint" "EC200U"
				(at 52.07 2.54 0)
			)
			(property "Datasheet" "https://drive.google.com/file/d/1eptLu98ynaKmYC8Qn_q-jmLHFTbR9duW/view?usp=sharing"
				(at 52.07 0 0)
			)
			(property "Description" "LTE standard module Bluetooth wireless communication 4G cat1 module all-network"
				(at 52.07 -2.54 0)
			)
			(property "Height" "2.6"
				(at 52.07 -5.08 0)
			)
			(property "Manufacturer_Name" "Quectel"
				(at 52.07 -7.62 0)
			)
			(property "Manufacturer_Part_Number" "EC200U"
				(at 52.07 -10.16 0)
			)
			(property "Mouser Part Number" ""
				(at 52.07 -12.7 0)
			)
			(property "Mouser Price/Stock" ""
				(at 52.07 -15.24 0)
			)
			(property "Arrow Part Number" ""
				(at 52.07 -17.78 0)
			)
			(property "Arrow Price/Stock" ""
				(at 52.07 -20.32 0)
			)
			(symbol "EC200U_0_0"
				(pin passive line
					(at 0 0 0)
					(length 5.08)
					(name "WAKEUP_IN")
					(number "1")
				)
				(pin passive line
					(at 0 -22.86 0)
					(length 5.08)
					(name "USIM_GND")
					(number "10")
				)
				(pin passive line
					(at 55.88 -68.58 180)
					(length 5.08)
					(name "GND_31")
					(number "100")
				)
				(pin passive line
					(at 55.88 -71.12 180)
					(length 5.08)
					(name "GND_32")
					(number "101")
				)
				(pin passive line
					(at 55.88 -73.66 180)
					(length 5.08)
					(name "GND_33")
					(number "102")
				)
				(pin passive line
					(at 55.88 -76.2 180)
					(length 5.08)
					(name "GND_34")
					(number "103")
				)
				(pin passive line
					(at 55.88 -78.74 180)
					(length 5.08)
					(name "GND_35")
					(number "104")
				)
				(pin passive line
					(at 55.88 -81.28 180)
					(length 5.08)
					(name "GND_36")
					(number "105")
				)
				(pin passive line
					(at 55.88 -83.82 180)
					(length 5.08)
					(name "GND_37")
					(number "106")
				)
				(pin passive line
					(at 55.88 -86.36 180)
					(length 5.08)
					(name "GND_38")
					(number "107")
				)
				(pin passive line
					(at 55.88 -88.9 180)
					(length 5.08)
					(name "GND_39")
					(number "108")
				)
				(pin passive line
					(at 55.88 -91.44 180)
					(length 5.08)
					(name "GND_40")
					(number "109")
				)
				(pin passive line
					(at 0 -25.4 0)
					(length 5.08)
					(name "DBG_RXD")
					(number "11")
				)
				(pin passive line
					(at 55.88 -93.98 180)
					(length 5.08)
					(name "GND_41")
					(number "110")
				)
				(pin passive line
					(at 55.88 -96.52 180)
					(length 5.08)
					(name "GND_42")
					(number "111")
				)
				(pin passive line
					(at 55.88 -99.06 180)
					(length 5.08)
					(name "GND_43")
					(number "112")
				)
				(pin passive line
					(at 55.88 -101.6 180)
					(length 5.08)
					(name "KEYOUT2")
					(number "113")
				)
				(pin passive line
					(at 55.88 -104.14 180)
					(length 5.08)
					(name "KEYOUT3")
					(number "114")
				)
				(pin passive line
					(at 55.88 -106.68 180)
					(length 5.08)
					(name "USB_BOOT")
					(number "115")
				)
				(pin passive line
					(at 55.88 -109.22 180)
					(length 5.08)
					(name "RESERVED_5")
					(number "116")
				)
				(pin passive line
					(at 55.88 -111.76 180)
					(length 5.08)
					(name "RESERVED_6")
					(number "117")
				)
				(pin passive line
					(at 55.88 -114.3 180)
					(length 5.08)
					(name "WLAN_SLP__CLK")
					(number "118")
				)
				(pin passive line
					(at 55.88 -116.84 180)
					(length 5.08)
					(name "LCD_FMARK")
					(number "119")
				)
				(pin passive line
					(at 0 -27.94 0)
					(length 5.08)
					(name "DBG_TXD")
					(number "12")
				)
				(pin passive line
					(at 55.88 -119.38 180)
					(length 5.08)
					(name "LCD_RSTB")
					(number "120")
				)
				(pin passive line
					(at 55.88 -121.92 180)
					(length 5.08)
					(name "LCD_SEL")
					(number "121")
				)
				(pin passive line
					(at 55.88 -124.46 180)
					(length 5.08)
					(name "LCD_CS")
					(number "122")
				)
				(pin passive line
					(at 55.88 -127 180)
					(length 5.08)
					(name "LCD_CLK")
					(number "123")
				)
				(pin passive line
					(at 55.88 -129.54 180)
					(length 5.08)
					(name "LCD_SDC")
					(number "124")
				)
				(pin passive line
					(at 55.88 -132.08 180)
					(length 5.08)
					(name "LCD_SI/O")
					(number "125")
				)
				(pin passive line
					(at 55.88 -134.62 180)
					(length 5.08)
					(name "GPIO1")
					(number "126")
				)
				(pin passive line
					(at 55.88 -137.16 180)
					(length 5.08)
					(name "WLAN_PWR__EN")
					(number "127")
				)
				(pin passive line
					(at 55.88 -139.7 180)
					(length 5.08)
					(name "USIM2_VDD")
					(number "128")
				)
				(pin passive line
					(at 55.88 -142.24 180)
					(length 5.08)
					(name "SDIO2_DATA3")
					(number "129")
				)
				(pin passive line
					(at 0 -30.48 0)
					(length 5.08)
					(name "USIM_DET")
					(number "13")
				)
				(pin passive line
					(at 55.88 -144.78 180)
					(length 5.08)
					(name "SDIO2_DATA2")
					(number "130")
				)
				(pin passive line
					(at 55.88 -147.32 180)
					(length 5.08)
					(name "SDIO2_DATA1")
					(number "131")
				)
				(pin passive line
					(at 55.88 -149.86 180)
					(length 5.08)
					(name "SDIO2_DATA0")
					(number "132")
				)
				(pin passive line
					(at 55.88 -152.4 180)
					(length 5.08)
					(name "SDIO2_CLK")
					(number "133")
				)
				(pin passive line
					(at 55.88 -154.94 180)
					(length 5.08)
					(name "SDIO2_CMD")
					(number "134")
				)
				(pin passive line
					(at 55.88 -157.48 180)
					(length 5.08)
					(name "WLAN_WAKE")
					(number "135")
				)
				(pin passive line
					(at 55.88 -160.02 180)
					(length 5.08)
					(name "WLAN_EN")
					(number "136")
				)
				(pin passive line
					(at 55.88 -162.56 180)
					(length 5.08)
					(name "AUX_RXD")
					(number "137")
				)
				(pin passive line
					(at 55.88 -165.1 180)
					(length 5.08)
					(name "AUX_TXD")
					(number "138")
				)
				(pin passive line
					(at 55.88 -167.64 180)
					(length 5.08)
					(name "BT_EN")
					(number "139")
				)
				(pin passive line
					(at 0 -33.02 0)
					(length 5.08)
					(name "USIM_VDD")
					(number "14")
				)
				(pin passive line
					(at 55.88 -170.18 180)
					(length 5.08)
					(name "ISINK")
					(number "140")
				)
				(pin passive line
					(at 55.88 -172.72 180)
					(length 5.08)
					(name "I2C2_SCL")
					(number "141")
				)
				(pin passive line
					(at 55.88 -175.26 180)
					(length 5.08)
					(name "I2C2_SDA")
					(number "142")
				)
				(pin passive line
					(at 55.88 -177.8 180)
					(length 5.08)
					(name "GRFC1")
					(number "143")
				)
				(pin passive line
					(at 55.88 -180.34 180)
					(length 5.08)
					(name "GRFC2")
					(number "144")
				)
				(pin passive line
					(at 0 -35.56 0)
					(length 5.08)
					(name "USIM_DATA")
					(number "15")
				)
				(pin passive line
					(at 0 -38.1 0)
					(length 5.08)
					(name "USIM_CLK")
					(number "16")
				)
				(pin passive line
					(at 0 -40.64 0)
					(length 5.08)
					(name "USIM_RST")
					(number "17")
				)
				(pin passive line
					(at 0 -43.18 0)
					(length 5.08)
					(name "RESERVED_1")
					(number "18")
				)
				(pin passive line
					(at 0 -45.72 0)
					(length 5.08)
					(name "GND_3")
					(number "19")
				)
				(pin passive line
					(at 0 -2.54 0)
					(length 5.08)
					(name "AP_READY")
					(number "2")
				)
				(pin passive line
					(at 0 -48.26 0)
					(length 5.08)
					(name "RESET_N")
					(number "20")
				)
				(pin passive line
					(at 0 -50.8 0)
					(length 5.08)
					(name "PWRKEY")
					(number "21")
				)
				(pin passive line
					(at 0 -53.34 0)
					(length 5.08)
					(name "GND_4")
					(number "22")
				)
				(pin passive line
					(at 0 -55.88 0)
					(length 5.08)
					(name "SD_DET")
					(number "23")
				)
				(pin passive line
					(at 0 -58.42 0)
					(length 5.08)
					(name "PCM_DIN")
					(number "24")
				)
				(pin passive line
					(at 0 -60.96 0)
					(length 5.08)
					(name "PCM_DOUT")
					(number "25")
				)
				(pin passive line
					(at 0 -63.5 0)
					(length 5.08)
					(name "PCM_SYNC")
					(number "26")
				)
				(pin passive line
					(at 0 -66.04 0)
					(length 5.08)
					(name "PCM_CLK")
					(number "27")
				)
				(pin passive line
					(at 0 -68.58 0)
					(length 5.08)
					(name "SDIO1_DATA3")
					(number "28")
				)
				(pin passive line
					(at 0 -71.12 0)
					(length 5.08)
					(name "SDIO1_DATA2")
					(number "29")
				)
				(pin passive line
					(at 0 -5.08 0)
					(length 5.08)
					(name "SLEEP_IND")
					(number "3")
				)
				(pin passive line
					(at 0 -73.66 0)
					(length 5.08)
					(name "SDIO1_DATA1")
					(number "30")
				)
				(pin passive line
					(at 0 -76.2 0)
					(length 5.08)
					(name "SDIO1_DATA0")
					(number "31")
				)
				(pin passive line
					(at 0 -78.74 0)
					(length 5.08)
					(name "SDIO1_CLK")
					(number "32")
				)
				(pin passive line
					(at 0 -81.28 0)
					(length 5.08)
					(name "SDIO1_CMD")
					(number "33")
				)
				(pin passive line
					(at 0 -83.82 0)
					(length 5.08)
					(name "SDIO1_VDD")
					(number "34")
				)
				(pin passive line
					(at 0 -86.36 0)
					(length 5.08)
					(name "ANT_BT/WIFI__SCAN")
					(number "35")
				)
				(pin passive line
					(at 0 -88.9 0)
					(length 5.08)
					(name "GND_5")
					(number "36")
				)
				(pin passive line
					(at 0 -91.44 0)
					(length 5.08)
					(name "SPI_CS")
					(number "37")
				)
				(pin passive line
					(at 0 -93.98 0)
					(length 5.08)
					(name "SPI_MOSI")
					(number "38")
				)
				(pin passive line
					(at 0 -96.52 0)
					(length 5.08)
					(name "SPI_MISO")
					(number "39")
				)
				(pin passive line
					(at 0 -7.62 0)
					(length 5.08)
					(name "W_DISABLE#")
					(number "4")
				)
				(pin passive line
					(at 0 -99.06 0)
					(length 5.08)
					(name "SPI_CLK")
					(number "40")
				)
				(pin passive line
					(at 0 -101.6 0)
					(length 5.08)
					(name "I2C_SCL")
					(number "41")
				)
				(pin passive line
					(at 0 -104.14 0)
					(length 5.08)
					(name "I2C_SDA")
					(number "42")
				)
				(pin passive line
					(at 0 -106.68 0)
					(length 5.08)
					(name "ADC2")
					(number "43")
				)
				(pin passive line
					(at 0 -109.22 0)
					(length 5.08)
					(name "ADC1")
					(number "44")
				)
				(pin passive line
					(at 0 -111.76 0)
					(length 5.08)
					(name "ADC0")
					(number "45")
				)
				(pin passive line
					(at 0 -114.3 0)
					(length 5.08)
					(name "GND_6")
					(number "46")
				)
				(pin passive line
					(at 0 -116.84 0)
					(length 5.08)
					(name "ANT_GNSS")
					(number "47")
				)
				(pin passive line
					(at 0 -119.38 0)
					(length 5.08)
					(name "GND_7")
					(number "48")
				)
				(pin passive line
					(at 0 -121.92 0)
					(length 5.08)
					(name "ANT_MAIN")
					(number "49")
				)
				(pin passive line
					(at 0 -10.16 0)
					(length 5.08)
					(name "NET_MODE")
					(number "5")
				)
				(pin passive line
					(at 0 -124.46 0)
					(length 5.08)
					(name "GND_8")
					(number "50")
				)
				(pin passive line
					(at 0 -127 0)
					(length 5.08)
					(name "GND_9")
					(number "51")
				)
				(pin passive line
					(at 0 -129.54 0)
					(length 5.08)
					(name "GND_10")
					(number "52")
				)
				(pin passive line
					(at 0 -132.08 0)
					(length 5.08)
					(name "GND_11")
					(number "53")
				)
				(pin passive line
					(at 0 -134.62 0)
					(length 5.08)
					(name "GND_12")
					(number "54")
				)
				(pin passive line
					(at 0 -137.16 0)
					(length 5.08)
					(name "RESERVED_2")
					(number "55")
				)
				(pin passive line
					(at 0 -139.7 0)
					(length 5.08)
					(name "GND_13")
					(number "56")
				)
				(pin passive line
					(at 0 -142.24 0)
					(length 5.08)
					(name "VBAT_RF_1")
					(number "57")
				)
				(pin passive line
					(at 0 -144.78 0)
					(length 5.08)
					(name "VBAT_RF_2")
					(number "58")
				)
				(pin passive line
					(at 0 -147.32 0)
					(length 5.08)
					(name "VBAT_BB_1")
					(number "59")
				)
				(pin passive line
					(at 0 -12.7 0)
					(length 5.08)
					(name "NET_STATUS")
					(number "6")
				)
				(pin passive line
					(at 0 -149.86 0)
					(length 5.08)
					(name "VBAT_BB_2")
					(number "60")
				)
				(pin passive line
					(at 0 -152.4 0)
					(length 5.08)
					(name "STATUS")
					(number "61")
				)
				(pin passive line
					(at 0 -154.94 0)
					(length 5.08)
					(name "MAIN_RI")
					(number "62")
				)
				(pin passive line
					(at 0 -157.48 0)
					(length 5.08)
					(name "MAIN_DCD")
					(number "63")
				)
				(pin passive line
					(at 0 -160.02 0)
					(length 5.08)
					(name "MAIN_CTS")
					(number "64")
				)
				(pin passive line
					(at 0 -162.56 0)
					(length 5.08)
					(name "MAIN_RTS")
					(number "65")
				)
				(pin passive line
					(at 0 -165.1 0)
					(length 5.08)
					(name "MAIN_DTR")
					(number "66")
				)
				(pin passive line
					(at 0 -167.64 0)
					(length 5.08)
					(name "MAIN_TXD")
					(number "67")
				)
				(pin passive line
					(at 0 -170.18 0)
					(length 5.08)
					(name "MAIN_RXD")
					(number "68")
				)
				(pin passive line
					(at 0 -172.72 0)
					(length 5.08)
					(name "USB_DP")
					(number "69")
				)
				(pin passive line
					(at 0 -15.24 0)
					(length 5.08)
					(name "VDD_EXT")
					(number "7")
				)
				(pin passive line
					(at 0 -175.26 0)
					(length 5.08)
					(name "USB_DM")
					(number "70")
				)
				(pin passive line
					(at 0 -177.8 0)
					(length 5.08)
					(name "USB_VBUS")
					(number "71")
				)
				(pin passive line
					(at 0 -180.34 0)
					(length 5.08)
					(name "GND_14")
					(number "72")
				)
				(pin passive line
					(at 55.88 0 180)
					(length 5.08)
					(name "LOUDSPK__P")
					(number "73")
				)
				(pin passive line
					(at 55.88 -2.54 180)
					(length 5.08)
					(name "LOUDSPK__N")
					(number "74")
				)
				(pin passive line
					(at 55.88 -5.08 180)
					(length 5.08)
					(name "MIC_P")
					(number "75")
				)
				(pin passive line
					(at 55.88 -7.62 180)
					(length 5.08)
					(name "GND_15")
					(number "76")
				)
				(pin passive line
					(at 55.88 -10.16 180)
					(length 5.08)
					(name "MIC_N")
					(number "77")
				)
				(pin passive line
					(at 55.88 -12.7 180)
					(length 5.08)
					(name "KEYIN1")
					(number "78")
				)
				(pin passive line
					(at 55.88 -15.24 180)
					(length 5.08)
					(name "KEYIN2")
					(number "79")
				)
				(pin passive line
					(at 0 -17.78 0)
					(length 5.08)
					(name "GND_1")
					(number "8")
				)
				(pin passive line
					(at 55.88 -17.78 180)
					(length 5.08)
					(name "KEYIN3")
					(number "80")
				)
				(pin passive line
					(at 55.88 -20.32 180)
					(length 5.08)
					(name "RESERVED_3")
					(number "81")
				)
				(pin passive line
					(at 55.88 -22.86 180)
					(length 5.08)
					(name "RESERVED_4")
					(number "82")
				)
				(pin passive line
					(at 55.88 -25.4 180)
					(length 5.08)
					(name "KEYOUT0")
					(number "83")
				)
				(pin passive line
					(at 55.88 -27.94 180)
					(length 5.08)
					(name "KEYOUT1")
					(number "84")
				)
				(pin passive line
					(at 55.88 -30.48 180)
					(length 5.08)
					(name "GND_16")
					(number "85")
				)
				(pin passive line
					(at 55.88 -33.02 180)
					(length 5.08)
					(name "GND_17")
					(number "86")
				)
				(pin passive line
					(at 55.88 -35.56 180)
					(length 5.08)
					(name "GND_18")
					(number "87")
				)
				(pin passive line
					(at 55.88 -38.1 180)
					(length 5.08)
					(name "GND_19")
					(number "88")
				)
				(pin passive line
					(at 55.88 -40.64 180)
					(length 5.08)
					(name "GND_20")
					(number "89")
				)
				(pin passive line
					(at 0 -20.32 0)
					(length 5.08)
					(name "GND_2")
					(number "9")
				)
				(pin passive line
					(at 55.88 -43.18 180)
					(length 5.08)
					(name "GND_21")
					(number "90")
				)
				(pin passive line
					(at 55.88 -45.72 180)
					(length 5.08)
					(name "GND_22")
					(number "91")
				)
				(pin passive line
					(at 55.88 -48.26 180)
					(length 5.08)
					(name "GND_23")
					(number "92")
				)
				(pin passive line
					(at 55.88 -50.8 180)
					(length 5.08)
					(name "GND_24")
					(number "93")
				)
				(pin passive line
					(at 55.88 -53.34 180)
					(length 5.08)
					(name "GND_25")
					(number "94")
				)
				(pin passive line
					(at 55.88 -55.88 180)
					(length 5.08)
					(name "GND_26")
					(number "95")
				)
				(pin passive line
					(at 55.88 -58.42 180)
					(length 5.08)
					(name "GND_27")
					(number "96")
				)
				(pin passive line
					(at 55.88 -60.96 180)
					(length 5.08)
					(name "GND_28")
					(number "97")
				)
				(pin passive line
					(at 55.88 -63.5 180)
					(length 5.08)
					(name "GND_29")
					(number "98")
				)
				(pin passive line
					(at 55.88 -66.04 180)
					(length 5.08)
					(name "GND_30")
					(number "99")
				)
			)
			(symbol "EC200U_0_1"
				(polyline
					(pts
						(xy 5.08 2.54) (xy 50.8 2.54) (xy 50.8 -182.88) (xy 5.08 -182.88) (xy 5.08 2.54)
					)
					(fill
						(type none)
					)
				)
			)
		)
		(symbol "Logic_LevelTranslator:TXB0102DCU"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 11.43 0)
			)
			(property "Value" "TXB0102DCU"
				(at 3.81 11.43 0)
			)
			(property "Footprint" "Package_SO:VSSOP-8_2.4x2.1mm_P0.5mm"
				(at 0 -13.97 0)
			)
			(property "Datasheet" "http://www.ti.com/lit/ds/symlink/txb0102.pdf"
				(at 0 -0.762 0)
			)
			(property "Description" "2-Bit Bidirectional Voltage-Level Translator in VSSOP Package With Auto Direction Sensing and ±15-kV ESD Protection"
				(at 0 0 0)
			)
			(property "ki_keywords" "Level-Shifter CMOS-TTL-Translation"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "VSSOP*P0.5mm*"
				(at 0 0 0)
			)
			(symbol "TXB0102DCU_0_1"
				(rectangle
					(start -7.62 10.16)
					(end 7.62 -10.16)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -2.54 -2.54) (xy -2.54 -1.524) (xy -0.762 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 2.54) (xy -2.54 3.556) (xy -0.762 3.556)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.794 -2.54) (xy 2.794 -3.556) (xy 1.016 -3.556)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.794 2.54) (xy 2.794 1.524) (xy 1.016 1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 -3.556) (xy -2.54 -3.556) (xy -2.54 -2.54) (xy -4.318 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 -2.54) (xy -0.762 -0.508) (xy 1.016 -1.524) (xy -0.762 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 1.524) (xy -2.54 1.524) (xy -2.54 2.54) (xy -4.572 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 2.54) (xy -0.762 4.572) (xy 1.016 3.556) (xy -0.762 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 -2.54) (xy 1.016 -4.572) (xy -0.762 -3.556) (xy 1.016 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 -1.524) (xy 2.794 -1.524) (xy 2.794 -2.54) (xy 4.064 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 3.556) (xy 2.794 3.556) (xy 2.794 2.54) (xy 4.064 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 2.54) (xy 1.016 0.762) (xy 1.016 0.508) (xy -0.762 1.524) (xy 1.016 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "TXB0102DCU_1_1"
				(pin bidirectional line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "B2")
					(number "1")
				)
				(pin power_in line
					(at 0 -12.7 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin power_in line
					(at -2.54 12.7 270)
					(length 2.54)
					(name "VCCA")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "A2")
					(number "4")
				)
				(pin bidirectional line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "A1")
					(number "5")
				)
				(pin input line
					(at -10.16 -7.62 0)
					(length 2.54)
					(name "OE")
					(number "6")
				)
				(pin power_in line
					(at 2.54 12.7 270)
					(length 2.54)
					(name "VCCB")
					(number "7")
				)
				(pin bidirectional line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "B1")
					(number "8")
				)
			)
		)
		(symbol "MCU_Microchip_ATtiny:ATtiny85-20S"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -12.7 13.97 0)
			)
			(property "Value" "ATtiny85-20S"
				(at 2.54 -13.97 0)
			)
			(property "Footprint" "Package_SO:SOIC-8W_5.3x5.3mm_P1.27mm"
				(at 0 0 0)
			)
			(property "Datasheet" "http://ww1.microchip.com/downloads/en/DeviceDoc/atmel-2586-avr-8-bit-microcontroller-attiny25-attiny45-attiny85_datasheet.pdf"
				(at 0 0 0)
			)
			(property "Description" "20MHz, 8kB Flash, 512B SRAM, 512B EEPROM, debugWIRE, SOIC-8W"
				(at 0 0 0)
			)
			(property "ki_keywords" "AVR 8bit Microcontroller tinyAVR"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*5.3x5.3mm*P1.27mm*"
				(at 0 0 0)
			)
			(symbol "ATtiny85-20S_0_1"
				(rectangle
					(start -12.7 -12.7)
					(end 12.7 12.7)
					(fill
						(type background)
					)
				)
			)
			(symbol "ATtiny85-20S_1_1"
				(pin bidirectional line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "~{RESET}/PB5")
					(number "1")
				)
				(pin bidirectional line
					(at 15.24 0 180)
					(length 2.54)
					(name "XTAL1/PB3")
					(number "2")
				)
				(pin bidirectional line
					(at 15.24 -2.54 180)
					(length 2.54)
					(name "XTAL2/PB4")
					(number "3")
				)
				(pin power_in line
					(at 0 -15.24 90)
					(length 2.54)
					(name "GND")
					(number "4")
				)
				(pin bidirectional line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "AREF/PB0")
					(number "5")
				)
				(pin bidirectional line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "PB1")
					(number "6")
				)
				(pin bidirectional line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "PB2")
					(number "7")
				)
				(pin power_in line
					(at 0 15.24 270)
					(length 2.54)
					(name "VCC")
					(number "8")
				)
			)
		)
		(symbol "Power_Protection:SP0502BAJT"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 5.715 2.54 0)
			)
			(property "Value" "SP0502BAJT"
				(at 5.715 0.635 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
				(at 5.715 -1.27 0)
			)
			(property "Datasheet" "http://www.littelfuse.com/~/media/files/littelfuse/technical%20resources/documents/data%20sheets/sp05xxba.pdf"
				(at 3.175 3.175 0)
			)
			(property "Description" "TVS Diode Array, 5.5V Standoff, 2 Channels, SC-70 package"
				(at 0 0 0)
			)
			(property "ki_keywords" "usb esd protection suppression transient"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?323*"
				(at 0 0 0)
			)
			(symbol "SP0502BAJT_0_0"
				(pin passive line
					(at 0 -5.08 90)
					(length 2.54)
					(name "A")
					(number "3")
				)
			)
			(symbol "SP0502BAJT_0_1"
				(rectangle
					(start -4.445 2.54)
					(end 4.445 -2.54)
					(fill
						(type background)
					)
				)
				(circle
					(center 0 -1.27)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -2.54 2.54) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -1.27) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.302 1.016) (xy -3.302 1.27) (xy -1.905 1.27) (xy -1.778 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 1.27) (xy -2.54 -1.27) (xy 2.54 -1.27) (xy 2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 1.27) (xy -1.905 0) (xy -3.175 0) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.778 1.016) (xy 1.778 1.27) (xy 3.175 1.27) (xy 3.302 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.27) (xy 1.905 0) (xy 3.175 0) (xy 2.54 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "SP0502BAJT_1_1"
				(pin passive line
					(at -2.54 5.08 270)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "K")
					(number "2")
				)
			)
		)
		(symbol "Sim card holder 6 pin custom _ push (sim800l module sim footprint):sim_holder"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R?"
				(at 28.702 -9.3979 0)
			)
			(property "Value" "sim_holder"
				(at 28.702 -11.9379 0)
			)
			(property "Footprint" "sim_card:sim_card_holder_6Pin_push Micro size (used in sim800 modules)"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "sim_holder_0_1"
				(rectangle
					(start 0 0)
					(end 27.94 -21.59)
					(fill
						(type none)
					)
				)
				(arc
					(start 27.686 -4.572)
					(mid 24.6898 -11.811)
					(end 27.686 -19.05)
					(fill
						(type none)
					)
				)
			)
			(symbol "sim_holder_1_1"
				(pin input line
					(at -2.54 -1.27 0)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin input line
					(at -2.54 -3.81 0)
					(length 2.54)
					(name "VCC")
					(number "2")
				)
				(pin input line
					(at -2.54 -6.35 0)
					(length 2.54)
					(name "VPP")
					(number "3")
				)
				(pin input line
					(at -2.54 -8.89 0)
					(length 2.54)
					(name "RST")
					(number "4")
				)
				(pin input line
					(at -2.54 -11.43 0)
					(length 2.54)
					(name "I/O")
					(number "5")
				)
				(pin input line
					(at -2.54 -13.97 0)
					(length 2.54)
					(name "CLK")
					(number "6")
				)
				(pin input line
					(at 10.16 -24.13 90)
					(length 2.54)
					(name "shield")
					(number "7")
				)
			)
		)
		(symbol "Switch:SW_Push"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW"
				(at 1.27 2.54 0)
			)
			(property "Value" "SW_Push"
				(at 0 -1.524 0)
			)
			(property "Footprint" ""
				(at 0 5.08 0)
			)
			(property "Datasheet" "~"
				(at 0 5.08 0)
			)
			(property "Description" "Push button switch, generic, two pins"
				(at 0 0 0)
			)
			(property "ki_keywords" "switch normally-open pushbutton push-button"
				(at 0 0 0)
			)
			(symbol "SW_Push_0_1"
				(circle
					(center -2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.27) (xy 0 3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.27) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Transistor_BJT:BC817"
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "BC817"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BC818-D.pdf"
				(at 0 0 0)
			)
			(property "Description" "0.8A Ic, 45V Vce, NPN Transistor, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "NPN Transistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "BC817_0_1"
				(polyline
					(pts
						(xy 0.635 0.635) (xy 2.54 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -0.635) (xy 2.54 -2.54) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 1.905) (xy 0.635 -1.905) (xy 0.635 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.778) (xy 1.778 -1.27) (xy 2.286 -2.286) (xy 1.27 -1.778) (xy 1.27 -1.778)
					)
					(fill
						(type outline)
					)
				)
				(circle
					(center 1.27 0)
					(radius 2.8194)
					(fill
						(type none)
					)
				)
			)
			(symbol "BC817_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 5.715)
					(name "B")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "E")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "C")
					(number "3")
				)
			)
		)
		(symbol "power:+1V8"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V8"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V8_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "power:+4V"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+4V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+4V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+4V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+4V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
	)
	(junction
		(at 297.18 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 140.97)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 80.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 123.19)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 236.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 353.06 191.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 110.49)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 97.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 288.29 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 379.73 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 279.4 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 135.89)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 292.1 69.85)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 274.32 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 171.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 133.35)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 356.87 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 364.49 35.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 300.99 69.85)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 274.32 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 349.25 35.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 191.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 236.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 63.5 238.76)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 138.43)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.06 236.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 300.99 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 260.35 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 360.68 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.06 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 189.23)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 261.62 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 260.35 46.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 186.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 297.18 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 63.5 233.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 90.17)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 292.1 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 243.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 353.06 111.76)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 279.4 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 92.71 97.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 233.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 356.87 177.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 279.4 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 288.29 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 85.09)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 130.81)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 260.35 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 113.03)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 95.25)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 102.87)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 63.5 243.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 64.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 259.08 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 274.32 46.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 125.73)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 100.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 101.6 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 118.11)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 165.1 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 238.76)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 353.06 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 364.49 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 341.63 179.07) (xy 355.6 179.07)
		)
	)
	(wire
		(pts
			(xy 63.5 238.76) (xy 77.47 238.76)
		)
	)
	(wire
		(pts
			(xy 345.44 109.22) (xy 353.06 109.22)
		)
	)
	(wire
		(pts
			(xy 364.49 35.56) (xy 379.73 35.56)
		)
	)
	(wire
		(pts
			(xy 259.08 86.36) (xy 259.08 78.74)
		)
	)
	(wire
		(pts
			(xy 243.84 133.35) (xy 243.84 135.89)
		)
	)
	(wire
		(pts
			(xy 243.84 105.41) (xy 262.89 105.41)
		)
	)
	(wire
		(pts
			(xy 243.84 52.07) (xy 260.35 52.07)
		)
	)
	(wire
		(pts
			(xy 165.1 158.75) (xy 165.1 163.83)
		)
	)
	(wire
		(pts
			(xy 90.17 241.3) (xy 90.17 243.84)
		)
	)
	(wire
		(pts
			(xy 356.87 191.77) (xy 353.06 191.77)
		)
	)
	(wire
		(pts
			(xy 312.42 74.93) (xy 300.99 74.93)
		)
	)
	(wire
		(pts
			(xy 265.43 78.74) (xy 279.4 78.74)
		)
	)
	(wire
		(pts
			(xy 187.96 168.91) (xy 187.96 171.45)
		)
	)
	(wire
		(pts
			(xy 106.68 236.22) (xy 111.76 236.22)
		)
	)
	(wire
		(pts
			(xy 69.85 173.99) (xy 78.74 173.99)
		)
	)
	(wire
		(pts
			(xy 63.5 233.68) (xy 77.47 233.68)
		)
	)
	(wire
		(pts
			(xy 300.99 74.93) (xy 292.1 74.93)
		)
	)
	(wire
		(pts
			(xy 334.772 109.22) (xy 340.36 109.22)
		)
	)
	(wire
		(pts
			(xy 48.26 233.68) (xy 63.5 233.68)
		)
	)
	(wire
		(pts
			(xy 187.96 189.23) (xy 187.96 191.77)
		)
	)
	(wire
		(pts
			(xy 266.7 86.36) (xy 259.08 86.36)
		)
	)
	(wire
		(pts
			(xy 279.4 78.74) (xy 292.1 78.74)
		)
	)
	(polyline
		(pts
			(xy 383.54 200.66) (xy 283.21 200.66)
		)
	)
	(wire
		(pts
			(xy 181.61 80.01) (xy 187.96 80.01)
		)
	)
	(wire
		(pts
			(xy 274.32 57.15) (xy 260.35 57.15)
		)
	)
	(wire
		(pts
			(xy 243.84 118.11) (xy 243.84 120.65)
		)
	)
	(wire
		(pts
			(xy 243.84 123.19) (xy 243.84 125.73)
		)
	)
	(wire
		(pts
			(xy 243.84 82.55) (xy 243.84 85.09)
		)
	)
	(wire
		(pts
			(xy 99.06 97.79) (xy 92.71 97.79)
		)
	)
	(wire
		(pts
			(xy 92.71 97.79) (xy 71.12 97.79)
		)
	)
	(wire
		(pts
			(xy 259.08 78.74) (xy 265.43 78.74)
		)
	)
	(wire
		(pts
			(xy 101.6 241.3) (xy 99.06 241.3)
		)
	)
	(wire
		(pts
			(xy 341.63 173.99) (xy 341.63 176.53)
		)
	)
	(wire
		(pts
			(xy 184.15 74.93) (xy 184.15 67.31)
		)
	)
	(wire
		(pts
			(xy 279.4 73.66) (xy 288.29 73.66)
		)
	)
	(wire
		(pts
			(xy 86.36 157.48) (xy 86.36 160.02)
		)
	)
	(wire
		(pts
			(xy 271.78 86.36) (xy 271.78 82.55)
		)
	)
	(wire
		(pts
			(xy 353.06 191.77) (xy 353.06 190.5)
		)
	)
	(wire
		(pts
			(xy 57.15 238.76) (xy 63.5 238.76)
		)
	)
	(wire
		(pts
			(xy 350.52 111.76) (xy 353.06 111.76)
		)
	)
	(wire
		(pts
			(xy 360.68 116.84) (xy 360.68 120.65)
		)
	)
	(wire
		(pts
			(xy 165.1 163.83) (xy 187.96 163.83)
		)
	)
	(wire
		(pts
			(xy 288.29 46.99) (xy 288.29 48.26)
		)
	)
	(wire
		(pts
			(xy 274.32 52.07) (xy 284.48 52.07)
		)
	)
	(wire
		(pts
			(xy 182.88 97.79) (xy 187.96 97.79)
		)
	)
	(wire
		(pts
			(xy 243.84 135.89) (xy 243.84 138.43)
		)
	)
	(wire
		(pts
			(xy 255.27 57.15) (xy 255.27 54.61)
		)
	)
	(wire
		(pts
			(xy 243.84 115.57) (xy 243.84 118.11)
		)
	)
	(wire
		(pts
			(xy 76.2 105.41) (xy 71.12 105.41)
		)
	)
	(wire
		(pts
			(xy 243.84 92.71) (xy 243.84 95.25)
		)
	)
	(wire
		(pts
			(xy 297.18 48.26) (xy 312.42 48.26)
		)
	)
	(wire
		(pts
			(xy 260.35 57.15) (xy 255.27 57.15)
		)
	)
	(wire
		(pts
			(xy 106.68 247.65) (xy 106.68 236.22)
		)
	)
	(wire
		(pts
			(xy 181.61 214.63) (xy 187.96 214.63)
		)
	)
	(wire
		(pts
			(xy 181.61 74.93) (xy 184.15 74.93)
		)
	)
	(wire
		(pts
			(xy 90.17 233.68) (xy 77.47 233.68)
		)
	)
	(wire
		(pts
			(xy 144.78 92.71) (xy 151.13 92.71)
		)
	)
	(wire
		(pts
			(xy 243.84 90.17) (xy 243.84 92.71)
		)
	)
	(wire
		(pts
			(xy 271.78 82.55) (xy 261.62 82.55)
		)
	)
	(wire
		(pts
			(xy 77.47 170.18) (xy 78.74 170.18)
		)
	)
	(wire
		(pts
			(xy 350.52 120.65) (xy 350.52 111.76)
		)
	)
	(wire
		(pts
			(xy 243.84 138.43) (xy 243.84 140.97)
		)
	)
	(wire
		(pts
			(xy 261.62 82.55) (xy 261.62 68.58)
		)
	)
	(wire
		(pts
			(xy 341.63 185.42) (xy 341.63 186.69)
		)
	)
	(wire
		(pts
			(xy 274.32 57.15) (xy 288.29 57.15)
		)
	)
	(wire
		(pts
			(xy 288.29 57.15) (xy 288.29 53.34)
		)
	)
	(wire
		(pts
			(xy 260.35 46.99) (xy 255.27 46.99)
		)
	)
	(wire
		(pts
			(xy 341.63 191.77) (xy 341.63 189.23)
		)
	)
	(wire
		(pts
			(xy 243.84 140.97) (xy 243.84 143.51)
		)
	)
	(wire
		(pts
			(xy 93.98 44.45) (xy 93.98 40.64)
		)
	)
	(wire
		(pts
			(xy 142.24 147.32) (xy 142.24 160.02)
		)
	)
	(wire
		(pts
			(xy 360.68 106.68) (xy 369.57 106.68)
		)
	)
	(wire
		(pts
			(xy 274.32 46.99) (xy 288.29 46.99)
		)
	)
	(wire
		(pts
			(xy 243.84 54.61) (xy 255.27 54.61)
		)
	)
	(wire
		(pts
			(xy 300.99 69.85) (xy 311.15 69.85)
		)
	)
	(wire
		(pts
			(xy 243.84 113.03) (xy 243.84 115.57)
		)
	)
	(wire
		(pts
			(xy 349.25 40.64) (xy 364.49 40.64)
		)
	)
	(wire
		(pts
			(xy 83.82 92.71) (xy 71.12 92.71)
		)
	)
	(wire
		(pts
			(xy 77.47 171.45) (xy 77.47 170.18)
		)
	)
	(wire
		(pts
			(xy 243.84 95.25) (xy 243.84 97.79)
		)
	)
	(polyline
		(pts
			(xy 283.21 153.67) (xy 389.89 153.67)
		)
	)
	(wire
		(pts
			(xy 83.82 95.25) (xy 71.12 95.25)
		)
	)
	(wire
		(pts
			(xy 48.26 243.84) (xy 63.5 243.84)
		)
	)
	(wire
		(pts
			(xy 260.35 52.07) (xy 274.32 52.07)
		)
	)
	(wire
		(pts
			(xy 243.84 105.41) (xy 243.84 107.95)
		)
	)
	(wire
		(pts
			(xy 78.74 173.99) (xy 78.74 175.26)
		)
	)
	(wire
		(pts
			(xy 91.44 157.48) (xy 91.44 160.02)
		)
	)
	(wire
		(pts
			(xy 105.41 175.26) (xy 99.06 175.26)
		)
	)
	(wire
		(pts
			(xy 99.06 170.18) (xy 104.14 170.18)
		)
	)
	(wire
		(pts
			(xy 243.84 74.93) (xy 243.84 77.47)
		)
	)
	(wire
		(pts
			(xy 187.96 176.53) (xy 187.96 179.07)
		)
	)
	(wire
		(pts
			(xy 349.25 30.48) (xy 349.25 35.56)
		)
	)
	(wire
		(pts
			(xy 111.76 241.3) (xy 101.6 241.3)
		)
	)
	(wire
		(pts
			(xy 181.61 212.09) (xy 187.96 212.09)
		)
	)
	(wire
		(pts
			(xy 111.76 240.03) (xy 111.76 241.3)
		)
	)
	(wire
		(pts
			(xy 292.1 69.85) (xy 300.99 69.85)
		)
	)
	(wire
		(pts
			(xy 187.96 186.69) (xy 187.96 189.23)
		)
	)
	(wire
		(pts
			(xy 363.22 177.8) (xy 356.87 177.8)
		)
	)
	(wire
		(pts
			(xy 243.84 107.95) (xy 243.84 110.49)
		)
	)
	(wire
		(pts
			(xy 175.26 100.33) (xy 175.26 101.6)
		)
	)
	(wire
		(pts
			(xy 187.96 191.77) (xy 187.96 194.31)
		)
	)
	(wire
		(pts
			(xy 181.61 82.55) (xy 187.96 82.55)
		)
	)
	(wire
		(pts
			(xy 265.43 73.66) (xy 279.4 73.66)
		)
	)
	(wire
		(pts
			(xy 356.87 185.42) (xy 353.06 185.42)
		)
	)
	(wire
		(pts
			(xy 243.84 130.81) (xy 243.84 133.35)
		)
	)
	(wire
		(pts
			(xy 355.6 177.8) (xy 356.87 177.8)
		)
	)
	(wire
		(pts
			(xy 101.6 241.3) (xy 101.6 247.65)
		)
	)
	(wire
		(pts
			(xy 71.12 102.87) (xy 74.93 102.87)
		)
	)
	(wire
		(pts
			(xy 90.17 243.84) (xy 77.47 243.84)
		)
	)
	(wire
		(pts
			(xy 187.96 171.45) (xy 187.96 173.99)
		)
	)
	(wire
		(pts
			(xy 175.26 95.25) (xy 187.96 95.25)
		)
	)
	(wire
		(pts
			(xy 181.61 77.47) (xy 187.96 77.47)
		)
	)
	(wire
		(pts
			(xy 106.68 110.49) (xy 102.87 110.49)
		)
	)
	(wire
		(pts
			(xy 181.61 85.09) (xy 187.96 85.09)
		)
	)
	(wire
		(pts
			(xy 243.84 77.47) (xy 243.84 80.01)
		)
	)
	(wire
		(pts
			(xy 355.6 179.07) (xy 355.6 177.8)
		)
	)
	(wire
		(pts
			(xy 254 78.74) (xy 259.08 78.74)
		)
	)
	(wire
		(pts
			(xy 154.94 64.77) (xy 187.96 64.77)
		)
	)
	(wire
		(pts
			(xy 30.48 39.37) (xy 30.48 41.91)
		)
	)
	(wire
		(pts
			(xy 105.41 173.99) (xy 105.41 175.26)
		)
	)
	(wire
		(pts
			(xy 243.84 128.27) (xy 243.84 130.81)
		)
	)
	(wire
		(pts
			(xy 163.83 59.69) (xy 163.83 58.42)
		)
	)
	(wire
		(pts
			(xy 379.73 40.64) (xy 379.73 45.72)
		)
	)
	(wire
		(pts
			(xy 311.15 53.34) (xy 311.15 69.85)
		)
	)
	(wire
		(pts
			(xy 170.18 186.69) (xy 187.96 186.69)
		)
	)
	(wire
		(pts
			(xy 99.06 236.22) (xy 106.68 236.22)
		)
	)
	(wire
		(pts
			(xy 71.12 100.33) (xy 74.93 100.33)
		)
	)
	(wire
		(pts
			(xy 243.84 125.73) (xy 243.84 128.27)
		)
	)
	(wire
		(pts
			(xy 261.62 68.58) (xy 265.43 68.58)
		)
	)
	(wire
		(pts
			(xy 144.78 97.79) (xy 151.13 97.79)
		)
	)
	(wire
		(pts
			(xy 243.84 85.09) (xy 243.84 87.63)
		)
	)
	(wire
		(pts
			(xy 184.15 67.31) (xy 187.96 67.31)
		)
	)
	(wire
		(pts
			(xy 187.96 158.75) (xy 165.1 158.75)
		)
	)
	(wire
		(pts
			(xy 361.95 181.61) (xy 341.63 181.61)
		)
	)
	(wire
		(pts
			(xy 175.26 101.6) (xy 182.88 101.6)
		)
	)
	(wire
		(pts
			(xy 243.84 80.01) (xy 243.84 82.55)
		)
	)
	(wire
		(pts
			(xy 265.43 68.58) (xy 279.4 68.58)
		)
	)
	(wire
		(pts
			(xy 63.5 243.84) (xy 77.47 243.84)
		)
	)
	(wire
		(pts
			(xy 292.1 78.74) (xy 292.1 74.93)
		)
	)
	(wire
		(pts
			(xy 165.1 163.83) (xy 165.1 165.1)
		)
	)
	(wire
		(pts
			(xy 292.1 68.58) (xy 292.1 69.85)
		)
	)
	(wire
		(pts
			(xy 144.78 100.33) (xy 151.13 100.33)
		)
	)
	(polyline
		(pts
			(xy 389.89 200.66) (xy 383.54 200.66)
		)
	)
	(wire
		(pts
			(xy 353.06 191.77) (xy 341.63 191.77)
		)
	)
	(wire
		(pts
			(xy 353.06 109.22) (xy 353.06 111.76)
		)
	)
	(wire
		(pts
			(xy 374.65 106.68) (xy 383.54 106.68)
		)
	)
	(wire
		(pts
			(xy 358.14 185.42) (xy 356.87 185.42)
		)
	)
	(wire
		(pts
			(xy 30.48 41.91) (xy 34.29 41.91)
		)
	)
	(wire
		(pts
			(xy 255.27 49.53) (xy 243.84 49.53)
		)
	)
	(wire
		(pts
			(xy 163.83 59.69) (xy 187.96 59.69)
		)
	)
	(wire
		(pts
			(xy 182.88 101.6) (xy 182.88 97.79)
		)
	)
	(wire
		(pts
			(xy 297.18 53.34) (xy 311.15 53.34)
		)
	)
	(wire
		(pts
			(xy 92.71 97.79) (xy 92.71 110.49)
		)
	)
	(wire
		(pts
			(xy 364.49 40.64) (xy 379.73 40.64)
		)
	)
	(wire
		(pts
			(xy 254 68.58) (xy 261.62 68.58)
		)
	)
	(wire
		(pts
			(xy 48.26 237.49) (xy 48.26 233.68)
		)
	)
	(wire
		(pts
			(xy 349.25 35.56) (xy 364.49 35.56)
		)
	)
	(wire
		(pts
			(xy 369.57 173.99) (xy 341.63 173.99)
		)
	)
	(wire
		(pts
			(xy 243.84 87.63) (xy 243.84 90.17)
		)
	)
	(wire
		(pts
			(xy 355.6 120.65) (xy 360.68 120.65)
		)
	)
	(wire
		(pts
			(xy 243.84 110.49) (xy 243.84 113.03)
		)
	)
	(wire
		(pts
			(xy 180.34 173.99) (xy 187.96 173.99)
		)
	)
	(wire
		(pts
			(xy 180.34 175.26) (xy 180.34 173.99)
		)
	)
	(wire
		(pts
			(xy 243.84 120.65) (xy 243.84 123.19)
		)
	)
	(wire
		(pts
			(xy 356.87 185.42) (xy 356.87 182.88)
		)
	)
	(wire
		(pts
			(xy 90.17 236.22) (xy 90.17 233.68)
		)
	)
	(polyline
		(pts
			(xy 283.21 200.66) (xy 283.21 153.67)
		)
	)
	(wire
		(pts
			(xy 243.84 97.79) (xy 243.84 100.33)
		)
	)
	(wire
		(pts
			(xy 30.48 44.45) (xy 34.29 44.45)
		)
	)
	(polyline
		(pts
			(xy 389.89 153.67) (xy 389.89 200.66)
		)
	)
	(wire
		(pts
			(xy 111.76 237.49) (xy 111.76 236.22)
		)
	)
	(wire
		(pts
			(xy 88.9 189.23) (xy 88.9 185.42)
		)
	)
	(wire
		(pts
			(xy 187.96 62.23) (xy 187.96 64.77)
		)
	)
	(wire
		(pts
			(xy 391.16 104.14) (xy 391.16 106.68)
		)
	)
	(wire
		(pts
			(xy 90.17 241.3) (xy 99.06 241.3)
		)
	)
	(wire
		(pts
			(xy 144.78 102.87) (xy 148.59 102.87)
		)
	)
	(wire
		(pts
			(xy 260.35 46.99) (xy 274.32 46.99)
		)
	)
	(wire
		(pts
			(xy 288.29 48.26) (xy 297.18 48.26)
		)
	)
	(wire
		(pts
			(xy 90.17 236.22) (xy 99.06 236.22)
		)
	)
	(wire
		(pts
			(xy 48.26 240.03) (xy 48.26 243.84)
		)
	)
	(wire
		(pts
			(xy 279.4 68.58) (xy 292.1 68.58)
		)
	)
	(wire
		(pts
			(xy 255.27 46.99) (xy 255.27 49.53)
		)
	)
	(wire
		(pts
			(xy 243.84 100.33) (xy 243.84 102.87)
		)
	)
	(wire
		(pts
			(xy 288.29 53.34) (xy 297.18 53.34)
		)
	)
	(wire
		(pts
			(xy 243.84 102.87) (xy 243.84 105.41)
		)
	)
	(wire
		(pts
			(xy 353.06 185.42) (xy 341.63 185.42)
		)
	)
	(wire
		(pts
			(xy 144.78 95.25) (xy 151.13 95.25)
		)
	)
	(wire
		(pts
			(xy 180.34 54.61) (xy 187.96 54.61)
		)
	)
	(wire
		(pts
			(xy 69.85 171.45) (xy 77.47 171.45)
		)
	)
	(wire
		(pts
			(xy 187.96 173.99) (xy 187.96 176.53)
		)
	)
	(wire
		(pts
			(xy 312.42 48.26) (xy 312.42 74.93)
		)
	)
	(rectangle
		(start 334.01 21.59)
		(end 398.78 59.69)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 21.59 31.75)
		(end 66.04 59.69)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 76.2 24.13)
		(end 116.84 63.5)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 318.77 83.82)
		(end 401.32 134.62)
		(fill
			(type none)
		)
	)
	(text "Battery Conn"
		(exclude_from_sim no)
		(at 58.928 57.658 0)
	)
	(text "SIM SLOT"
		(exclude_from_sim no)
		(at 388.62 199.39 0)
	)
	(text "Power Led"
		(exclude_from_sim no)
		(at 109.474 60.198 0)
	)
	(text "LED network mode"
		(exclude_from_sim no)
		(at 389.128 131.572 0)
	)
	(text "Decoupling Caps"
		(exclude_from_sim no)
		(at 337.312 57.15 0)
	)
	(text "JST-ph"
		(exclude_from_sim no)
		(at 44.704 38.1 0)
	)
	(label "sTx"
		(at 69.85 173.99 0)
		(fields_autoplaced yes)
	)
	(label "spk+"
		(at 243.84 44.45 0)
		(fields_autoplaced yes)
	)
	(label "gtx"
		(at 181.61 212.09 0)
		(fields_autoplaced yes)
	)
	(label "grx"
		(at 181.61 214.63 0)
		(fields_autoplaced yes)
	)
	(label "spk-"
		(at 48.26 240.03 0)
		(fields_autoplaced yes)
	)
	(label "spk+"
		(at 48.26 237.49 0)
		(fields_autoplaced yes)
	)
	(label "grx"
		(at 105.41 173.99 0)
		(fields_autoplaced yes)
	)
	(label "mic-"
		(at 247.65 54.61 0)
		(fields_autoplaced yes)
	)
	(label "gtx"
		(at 104.14 170.18 0)
		(fields_autoplaced yes)
	)
	(label "sRx"
		(at 74.93 100.33 0)
		(fields_autoplaced yes)
	)
	(label "sRx"
		(at 69.85 171.45 0)
		(fields_autoplaced yes)
	)
	(label "mic+"
		(at 247.65 49.53 0)
		(fields_autoplaced yes)
	)
	(label "spk-"
		(at 243.84 46.99 0)
		(fields_autoplaced yes)
	)
	(label "sTx"
		(at 74.93 102.87 0)
		(fields_autoplaced yes)
	)
	(global_label "NET_M"
		(shape input)
		(at 334.772 109.22 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 325.9207 109.22 0)
		)
	)
	(global_label "miso"
		(shape input)
		(at 151.13 95.25 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 158.5904 95.25 0)
		)
	)
	(global_label "sim_gnd"
		(shape input)
		(at 356.87 191.77 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 367.0241 191.8494 0)
		)
	)
	(global_label "miso"
		(shape input)
		(at 83.82 95.25 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 91.2804 95.25 0)
		)
	)
	(global_label "sck"
		(shape input)
		(at 151.13 97.79 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 157.26 97.79 0)
		)
	)
	(global_label "sim_io"
		(shape input)
		(at 363.22 177.8 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 371.6807 177.8794 0)
		)
	)
	(global_label "ANT_main"
		(shape input)
		(at 187.96 166.37 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 176.0244 166.37 0)
		)
	)
	(global_label "sim_io "
		(shape input)
		(at 181.61 80.01 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 171.6096 80.01 0)
		)
	)
	(global_label "sim_rst"
		(shape input)
		(at 181.61 85.09 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 171.791 85.09 0)
		)
	)
	(global_label "sim_rst"
		(shape input)
		(at 361.95 181.61 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 371.1969 181.6894 0)
		)
	)
	(global_label "NET_M"
		(shape input)
		(at 180.34 54.61 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 171.4887 54.61 0)
		)
	)
	(global_label "reset"
		(shape input)
		(at 151.13 100.33 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 158.8324 100.33 0)
		)
	)
	(global_label "mosi"
		(shape input)
		(at 83.82 92.71 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 91.2804 92.71 0)
		)
	)
	(global_label "sim_vdd"
		(shape input)
		(at 358.14 185.42 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 368.1126 185.4994 0)
		)
	)
	(global_label "reset"
		(shape input)
		(at 76.2 105.41 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 83.9024 105.41 0)
		)
	)
	(global_label "sim_clk"
		(shape input)
		(at 181.61 82.55 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 171.5491 82.55 0)
		)
	)
	(global_label "sck"
		(shape input)
		(at 99.06 97.79 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 105.19 97.79 0)
		)
	)
	(global_label "ANT_main"
		(shape input)
		(at 142.24 160.02 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 142.1606 171.3836 90)
		)
	)
	(global_label "sim_gnd"
		(shape input)
		(at 181.61 74.93 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 170.884 74.93 0)
		)
	)
	(global_label "sim_vdd"
		(shape input)
		(at 181.61 77.47 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 171.0654 77.47 0)
		)
	)
	(global_label "mosi"
		(shape input)
		(at 151.13 92.71 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 158.5904 92.71 0)
		)
	)
	(global_label "sim_clk"
		(shape input)
		(at 369.57 173.99 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 379.0588 174.0694 0)
		)
	)
	(symbol
		(lib_id "MCU_Microchip_ATtiny:ATtiny85-20S")
		(at 55.88 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 41.91 99.0599 0)
		)
		(property "Value" "ATtiny85-20S"
			(at 41.91 101.5999 0)
		)
		(property "Footprint" "Package_SO:SOIC-8W_5.3x5.3mm_P1.27mm"
			(at 55.88 100.33 0)
		)
		(property "Datasheet" "http://ww1.microchip.com/downloads/en/DeviceDoc/atmel-2586-avr-8-bit-microcontroller-attiny25-attiny45-attiny85_datasheet.pdf"
			(at 55.88 100.33 0)
		)
		(property "Description" "20MHz, 8kB Flash, 512B SRAM, 512B EEPROM, debugWIRE, SOIC-8W"
			(at 55.88 100.33 0)
		)
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "1")
		(pin "7")
		(pin "8")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 30.48 44.45 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 30.48 50.8 0)
		)
		(property "Value" "GND"
			(at 30.48 49.53 0)
		)
		(property "Footprint" ""
			(at 30.48 44.45 0)
		)
		(property "Datasheet" ""
			(at 30.48 44.45 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 30.48 44.45 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 106.68 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR023"
			(at 106.68 116.84 0)
		)
		(property "Value" "GND"
			(at 106.68 115.57 0)
		)
		(property "Footprint" ""
			(at 106.68 110.49 0)
		)
		(property "Datasheet" ""
			(at 106.68 110.49 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 106.68 110.49 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 288.29 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C9"
			(at 290.83 49.5362 0)
		)
		(property "Value" "10pf"
			(at 290.83 52.0762 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 288.29 50.8 0)
		)
		(property "Datasheet" "~"
			(at 288.29 50.8 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 288.29 50.8 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized_Small")
		(at 349.25 38.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 351.282 36.957 0)
		)
		(property "Value" "100uf"
			(at 350.901 39.497 0)
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-15_Kemet-W_Pad2.25x2.55mm_HandSolder"
			(at 349.25 38.1 0)
		)
		(property "Datasheet" "~"
			(at 349.25 38.1 0)
		)
		(property "Description" ""
			(at 349.25 38.1 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 30.48 39.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 30.48 43.18 0)
		)
		(property "Value" "+4V"
			(at 30.48 34.29 0)
		)
		(property "Footprint" ""
			(at 30.48 39.37 0)
		)
		(property "Datasheet" ""
			(at 30.48 39.37 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 30.48 39.37 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Antenna_Shield")
		(at 142.24 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "AE1"
			(at 146.05 140.335 0)
		)
		(property "Value" "U.FL "
			(at 146.05 142.875 0)
		)
		(property "Footprint" "Connector_Coaxial:U.FL_Molex_MCRF_73412-0110_Vertical"
			(at 142.24 139.7 0)
		)
		(property "Datasheet" "~"
			(at 142.24 139.7 0)
		)
		(property "Description" ""
			(at 142.24 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "AE1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 77.47 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C22"
			(at 80.01 234.9562 0)
		)
		(property "Value" "33pf"
			(at 80.01 237.4962 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 77.47 236.22 0)
		)
		(property "Datasheet" "~"
			(at 77.47 236.22 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 77.47 236.22 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EC200U:EC200U")
		(at 187.96 44.45 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "IC1"
			(at 215.9 36.83 0)
		)
		(property "Value" "EC200U"
			(at 215.9 39.37 0)
		)
		(property "Footprint" "EC200U:EC200U"
			(at 240.03 41.91 0)
		)
		(property "Datasheet" "https://drive.google.com/file/d/1eptLu98ynaKmYC8Qn_q-jmLHFTbR9duW/view?usp=sharing"
			(at 240.03 44.45 0)
		)
		(property "Description" "LTE standard module Bluetooth wireless communication 4G cat1 module all-network"
			(at 240.03 46.99 0)
		)
		(property "Height" "2.6"
			(at 240.03 49.53 0)
		)
		(property "Manufacturer_Name" "Quectel"
			(at 240.03 52.07 0)
		)
		(property "Manufacturer_Part_Number" "EC200U"
			(at 240.03 54.61 0)
		)
		(property "Mouser Part Number" ""
			(at 240.03 57.15 0)
		)
		(property "Mouser Price/Stock" ""
			(at 240.03 59.69 0)
		)
		(property "Arrow Part Number" ""
			(at 240.03 62.23 0)
		)
		(property "Arrow Price/Stock" ""
			(at 240.03 64.77 0)
		)
		(pin "122")
		(pin "106")
		(pin "101")
		(pin "105")
		(pin "123")
		(pin "103")
		(pin "100")
		(pin "138")
		(pin "125")
		(pin "112")
		(pin "127")
		(pin "126")
		(pin "131")
		(pin "132")
		(pin "137")
		(pin "136")
		(pin "139")
		(pin "140")
		(pin "113")
		(pin "141")
		(pin "143")
		(pin "14")
		(pin "144")
		(pin "15")
		(pin "119")
		(pin "117")
		(pin "135")
		(pin "16")
		(pin "19")
		(pin "2")
		(pin "18")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "133")
		(pin "23")
		(pin "107")
		(pin "124")
		(pin "24")
		(pin "110")
		(pin "116")
		(pin "130")
		(pin "134")
		(pin "142")
		(pin "25")
		(pin "26")
		(pin "17")
		(pin "10")
		(pin "104")
		(pin "12")
		(pin "118")
		(pin "129")
		(pin "121")
		(pin "13")
		(pin "128")
		(pin "109")
		(pin "1")
		(pin "120")
		(pin "108")
		(pin "114")
		(pin "11")
		(pin "115")
		(pin "102")
		(pin "111")
		(pin "31")
		(pin "40")
		(pin "43")
		(pin "56")
		(pin "28")
		(pin "34")
		(pin "3")
		(pin "50")
		(pin "51")
		(pin "55")
		(pin "61")
		(pin "53")
		(pin "63")
		(pin "64")
		(pin "32")
		(pin "65")
		(pin "68")
		(pin "47")
		(pin "44")
		(pin "69")
		(pin "72")
		(pin "42")
		(pin "54")
		(pin "73")
		(pin "74")
		(pin "75")
		(pin "37")
		(pin "77")
		(pin "59")
		(pin "27")
		(pin "4")
		(pin "79")
		(pin "80")
		(pin "30")
		(pin "62")
		(pin "7")
		(pin "57")
		(pin "81")
		(pin "29")
		(pin "33")
		(pin "46")
		(pin "35")
		(pin "6")
		(pin "38")
		(pin "66")
		(pin "67")
		(pin "8")
		(pin "49")
		(pin "83")
		(pin "5")
		(pin "82")
		(pin "84")
		(pin "70")
		(pin "78")
		(pin "41")
		(pin "71")
		(pin "76")
		(pin "45")
		(pin "48")
		(pin "58")
		(pin "39")
		(pin "36")
		(pin "52")
		(pin "60")
		(pin "90")
		(pin "92")
		(pin "87")
		(pin "88")
		(pin "91")
		(pin "89")
		(pin "86")
		(pin "9")
		(pin "99")
		(pin "93")
		(pin "96")
		(pin "97")
		(pin "98")
		(pin "95")
		(pin "94")
		(pin "85")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "IC1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 279.4 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 281.94 69.8562 0)
		)
		(property "Value" "33pf"
			(at 281.94 72.3962 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 279.4 71.12 0)
		)
		(property "Datasheet" "~"
			(at 279.4 71.12 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 279.4 71.12 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 391.16 104.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 391.16 107.95 0)
		)
		(property "Value" "+4V"
			(at 391.16 99.06 0)
		)
		(property "Footprint" ""
			(at 391.16 104.14 0)
		)
		(property "Datasheet" ""
			(at 391.16 104.14 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 391.16 104.14 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Sim card holder 6 pin custom _ push (sim800l module sim footprint):sim_holder")
		(at 339.09 190.5 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R6"
			(at 310.388 181.1021 0)
		)
		(property "Value" "sim_holder"
			(at 310.388 178.5621 0)
		)
		(property "Footprint" "Micro sim 6 pin sim 800:micro sim 6 pin"
			(at 339.09 190.5 0)
		)
		(property "Datasheet" ""
			(at 339.09 190.5 0)
		)
		(property "Description" ""
			(at 339.09 190.5 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 55.88 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 55.88 121.92 0)
		)
		(property "Value" "GND"
			(at 55.88 120.65 0)
		)
		(property "Footprint" ""
			(at 55.88 115.57 0)
		)
		(property "Datasheet" ""
			(at 55.88 115.57 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 55.88 115.57 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x05_Socket")
		(at 139.7 97.79 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J2"
			(at 140.335 87.63 0)
		)
		(property "Value" "Conn_01x05_Socket"
			(at 140.462 89.662 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical"
			(at 139.7 97.79 0)
		)
		(property "Datasheet" "~"
			(at 139.7 97.79 0)
		)
		(property "Description" "Generic connector, single row, 01x05, script generated"
			(at 139.7 97.79 0)
		)
		(pin "5")
		(pin "2")
		(pin "4")
		(pin "1")
		(pin "3")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "J2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 269.24 96.52 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR026"
			(at 269.24 102.87 0)
		)
		(property "Value" "GND"
			(at 267.208 100.076 0)
		)
		(property "Footprint" ""
			(at 269.24 96.52 0)
		)
		(property "Datasheet" ""
			(at 269.24 96.52 0)
		)
		(property "Description" ""
			(at 269.24 96.52 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Microphone")
		(at 254 73.66 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "MK1"
			(at 257.81 73.0884 0)
		)
		(property "Value" "Microphone"
			(at 252.222 85.09 0)
		)
		(property "Footprint" "Sensor_Audio:CUI_CMC-4013-SMT"
			(at 254 76.2 90)
		)
		(property "Datasheet" "~"
			(at 254 76.2 90)
		)
		(property "Description" "Microphone"
			(at 254 73.66 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "MK1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 300.99 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C16"
			(at 303.53 71.1262 0)
		)
		(property "Value" "33pf"
			(at 303.53 73.6662 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 300.99 72.39 0)
		)
		(property "Datasheet" "~"
			(at 300.99 72.39 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 300.99 72.39 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 104.14 257.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR028"
			(at 104.14 264.16 0)
		)
		(property "Value" "GND"
			(at 104.14 261.366 0)
		)
		(property "Footprint" ""
			(at 104.14 257.81 0)
		)
		(property "Datasheet" ""
			(at 104.14 257.81 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 104.14 257.81 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 99.06 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C21"
			(at 101.6 237.4962 0)
		)
		(property "Value" "33pf"
			(at 101.6 240.0362 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 99.06 238.76 0)
		)
		(property "Datasheet" "~"
			(at 99.06 238.76 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 99.06 238.76 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:LED")
		(at 387.35 106.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D1"
			(at 385.7625 100.584 0)
		)
		(property "Value" "LED"
			(at 385.7625 103.124 0)
		)
		(property "Footprint" "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
			(at 387.35 106.68 0)
		)
		(property "Datasheet" "~"
			(at 387.35 106.68 0)
		)
		(property "Description" ""
			(at 387.35 106.68 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 274.32 54.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 276.352 53.34 0)
		)
		(property "Value" "33pf"
			(at 275.844 56.134 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 274.32 54.61 0)
		)
		(property "Datasheet" "~"
			(at 274.32 54.61 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 274.32 54.61 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 90.17 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C20"
			(at 92.71 237.4962 0)
		)
		(property "Value" "10pf"
			(at 92.71 240.0362 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 90.17 238.76 0)
		)
		(property "Datasheet" "~"
			(at 90.17 238.76 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 90.17 238.76 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 262.89 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 262.89 111.76 0)
		)
		(property "Value" "GND"
			(at 265.43 106.6799 0)
		)
		(property "Footprint" ""
			(at 262.89 105.41 0)
		)
		(property "Datasheet" ""
			(at 262.89 105.41 0)
		)
		(property "Description" ""
			(at 262.89 105.41 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 353.06 120.65 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R2"
			(at 353.06 127 90)
		)
		(property "Value" "47k"
			(at 353.06 124.46 90)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 353.06 120.65 0)
		)
		(property "Datasheet" "~"
			(at 353.06 120.65 0)
		)
		(property "Description" ""
			(at 353.06 120.65 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 288.29 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR025"
			(at 288.29 80.01 0)
		)
		(property "Value" "GND"
			(at 286.258 77.216 0)
		)
		(property "Footprint" ""
			(at 288.29 73.66 0)
		)
		(property "Datasheet" ""
			(at 288.29 73.66 0)
		)
		(property "Description" ""
			(at 288.29 73.66 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 55.88 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 55.88 88.9 0)
		)
		(property "Value" "+4V"
			(at 55.88 80.01 0)
		)
		(property "Footprint" ""
			(at 55.88 85.09 0)
		)
		(property "Datasheet" ""
			(at 55.88 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 55.88 85.09 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 364.49 38.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 370.84 39.37 0)
		)
		(property "Value" "1uf"
			(at 371.221 37.338 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 364.49 38.1 0)
		)
		(property "Datasheet" "~"
			(at 364.49 38.1 0)
		)
		(property "Description" ""
			(at 364.49 38.1 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Logic_LevelTranslator:TXB0102DCU")
		(at 88.9 172.72 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 86.7059 185.42 0)
		)
		(property "Value" "TXB0102DCU"
			(at 86.7059 187.96 0)
		)
		(property "Footprint" "Package_SO:VSSOP-8_2.4x2.1mm_P0.5mm"
			(at 88.9 186.69 0)
		)
		(property "Datasheet" "http://www.ti.com/lit/ds/symlink/txb0102.pdf"
			(at 88.9 173.482 0)
		)
		(property "Description" "2-Bit Bidirectional Voltage-Level Translator in VSSOP Package With Auto Direction Sensing and ±15-kV ESD Protection"
			(at 88.9 172.72 0)
		)
		(pin "4")
		(pin "5")
		(pin "2")
		(pin "8")
		(pin "1")
		(pin "6")
		(pin "3")
		(pin "7")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_BJT:BC817")
		(at 358.14 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q1"
			(at 363.855 110.4899 0)
		)
		(property "Value" "BC817"
			(at 363.855 113.0299 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 363.22 113.665 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BC818-D.pdf"
			(at 358.14 111.76 0)
		)
		(property "Description" ""
			(at 358.14 111.76 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 372.11 106.68 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R1"
			(at 372.11 100.584 90)
		)
		(property "Value" "2.2k"
			(at 372.11 103.124 90)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 372.11 106.68 0)
		)
		(property "Datasheet" "~"
			(at 372.11 106.68 0)
		)
		(property "Description" ""
			(at 372.11 106.68 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 63.5 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C17"
			(at 66.04 234.9562 0)
		)
		(property "Value" "10pf"
			(at 66.04 237.4962 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 63.5 236.22 0)
		)
		(property "Datasheet" "~"
			(at 63.5 236.22 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 63.5 236.22 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 265.43 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C11"
			(at 267.97 69.8562 0)
		)
		(property "Value" "10pf"
			(at 267.97 72.3962 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 265.43 71.12 0)
		)
		(property "Datasheet" "~"
			(at 265.43 71.12 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 265.43 71.12 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 187.96 224.79 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR010"
			(at 187.96 231.14 0)
		)
		(property "Value" "GND"
			(at 188.214 228.981 0)
		)
		(property "Footprint" ""
			(at 187.96 224.79 0)
		)
		(property "Datasheet" ""
			(at 187.96 224.79 0)
		)
		(property "Description" ""
			(at 187.96 224.79 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 379.73 45.72 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 379.73 52.07 0)
		)
		(property "Value" "GND"
			(at 381.762 46.9899 0)
		)
		(property "Footprint" ""
			(at 379.73 45.72 0)
		)
		(property "Datasheet" ""
			(at 379.73 45.72 0)
		)
		(property "Description" ""
			(at 379.73 45.72 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 349.25 30.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 349.25 34.29 0)
		)
		(property "Value" "+4V"
			(at 349.25 25.4 0)
		)
		(property "Footprint" ""
			(at 349.25 30.48 0)
		)
		(property "Datasheet" ""
			(at 349.25 30.48 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 349.25 30.48 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 154.94 64.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR020"
			(at 154.94 71.12 0)
		)
		(property "Value" "GND"
			(at 157.48 66.0399 0)
		)
		(property "Footprint" ""
			(at 154.94 64.77 0)
		)
		(property "Datasheet" ""
			(at 154.94 64.77 0)
		)
		(property "Description" ""
			(at 154.94 64.77 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 353.06 187.96 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C4"
			(at 350.52 189.2238 0)
		)
		(property "Value" "100nf"
			(at 350.52 186.6838 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 353.06 187.96 0)
		)
		(property "Datasheet" "~"
			(at 353.06 187.96 0)
		)
		(property "Description" ""
			(at 353.06 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small_US")
		(at 356.87 180.34 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 355.6 180.34 0)
		)
		(property "Value" "10k"
			(at 355.6 177.8 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 356.87 180.34 0)
		)
		(property "Datasheet" "~"
			(at 356.87 180.34 0)
		)
		(property "Description" ""
			(at 356.87 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 93.98 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08"
			(at 93.98 55.88 0)
		)
		(property "Value" "GND"
			(at 93.98 54.61 0)
		)
		(property "Footprint" ""
			(at 93.98 49.53 0)
		)
		(property "Datasheet" ""
			(at 93.98 49.53 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 93.98 49.53 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 63.5 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C18"
			(at 66.04 240.0362 0)
		)
		(property "Value" "10pf"
			(at 66.04 242.5762 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 63.5 241.3 0)
		)
		(property "Datasheet" "~"
			(at 63.5 241.3 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 63.5 241.3 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 39.37 41.91 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J1"
			(at 40.64 41.9099 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 40.64 44.4499 0)
		)
		(property "Footprint" "Connector_JST:JST_PH_S2B-PH-K_1x02_P2.00mm_Horizontal"
			(at 39.37 41.91 0)
		)
		(property "Datasheet" "~"
			(at 39.37 41.91 0)
		)
		(property "Description" "Generic connector, single row, 01x02, script generated"
			(at 39.37 41.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V8")
		(at 163.83 58.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR022"
			(at 163.83 62.23 0)
		)
		(property "Value" "+1V8"
			(at 163.83 53.34 0)
		)
		(property "Footprint" ""
			(at 163.83 58.42 0)
		)
		(property "Datasheet" ""
			(at 163.83 58.42 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V8\""
			(at 163.83 58.42 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 379.73 38.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C1"
			(at 382.27 36.8362 0)
		)
		(property "Value" "100nf"
			(at 382.27 39.3762 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder"
			(at 379.73 38.1 0)
		)
		(property "Datasheet" "~"
			(at 379.73 38.1 0)
		)
		(property "Description" ""
			(at 379.73 38.1 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V8")
		(at 91.44 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR014"
			(at 91.44 161.29 0)
		)
		(property "Value" "+1V8"
			(at 91.44 152.4 0)
		)
		(property "Footprint" ""
			(at 91.44 157.48 0)
		)
		(property "Datasheet" ""
			(at 91.44 157.48 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V8\""
			(at 91.44 157.48 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 279.4 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 281.432 74.93 0)
		)
		(property "Value" "33pf"
			(at 280.924 77.724 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 279.4 76.2 0)
		)
		(property "Datasheet" "~"
			(at 279.4 76.2 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 279.4 76.2 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 265.43 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C12"
			(at 267.97 74.9362 0)
		)
		(property "Value" "10pf"
			(at 267.97 77.4762 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 265.43 76.2 0)
		)
		(property "Datasheet" "~"
			(at 265.43 76.2 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 265.43 76.2 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 292.1 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C15"
			(at 294.64 71.1262 0)
		)
		(property "Value" "10pf"
			(at 294.64 73.6662 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 292.1 72.39 0)
		)
		(property "Datasheet" "~"
			(at 292.1 72.39 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 292.1 72.39 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 284.48 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR024"
			(at 284.48 58.42 0)
		)
		(property "Value" "GND"
			(at 282.448 55.626 0)
		)
		(property "Footprint" ""
			(at 284.48 52.07 0)
		)
		(property "Datasheet" ""
			(at 284.48 52.07 0)
		)
		(property "Description" ""
			(at 284.48 52.07 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 144.78 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR018"
			(at 144.78 153.67 0)
		)
		(property "Value" "GND"
			(at 147.32 148.5899 0)
		)
		(property "Footprint" ""
			(at 144.78 147.32 0)
		)
		(property "Datasheet" ""
			(at 144.78 147.32 0)
		)
		(property "Description" ""
			(at 144.78 147.32 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 170.18 186.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR09"
			(at 170.18 190.5 0)
		)
		(property "Value" "+4V"
			(at 170.18 181.61 0)
		)
		(property "Footprint" ""
			(at 170.18 186.69 0)
		)
		(property "Datasheet" ""
			(at 170.18 186.69 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 170.18 186.69 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Pin")
		(at 116.84 237.49 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J3"
			(at 118.11 240.0301 0)
		)
		(property "Value" "Conn_01x02_Pin"
			(at 118.11 237.4901 0)
		)
		(property "Footprint" "Connector_JST:JST_PH_B2B-PH-K_1x02_P2.00mm_Vertical"
			(at 116.84 237.49 0)
		)
		(property "Datasheet" "~"
			(at 116.84 237.49 0)
		)
		(property "Description" "Generic connector, single row, 01x02, script generated"
			(at 116.84 237.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "J3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 180.34 175.26 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR011"
			(at 180.34 181.61 0)
		)
		(property "Value" "GND"
			(at 180.594 179.451 0)
		)
		(property "Footprint" ""
			(at 180.34 175.26 0)
		)
		(property "Datasheet" ""
			(at 180.34 175.26 0)
		)
		(property "Description" ""
			(at 180.34 175.26 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 148.59 102.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR017"
			(at 148.59 109.22 0)
		)
		(property "Value" "GND"
			(at 148.59 107.95 0)
		)
		(property "Footprint" ""
			(at 148.59 102.87 0)
		)
		(property "Datasheet" ""
			(at 148.59 102.87 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 148.59 102.87 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 297.18 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C10"
			(at 299.72 49.5362 0)
		)
		(property "Value" "33pf"
			(at 299.72 52.0762 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 297.18 50.8 0)
		)
		(property "Datasheet" "~"
			(at 297.18 50.8 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 297.18 50.8 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 97.79 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW1"
			(at 97.79 102.87 0)
		)
		(property "Value" "programmable_button"
			(at 107.188 105.41 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H4.3mm"
			(at 97.79 105.41 0)
		)
		(property "Datasheet" "~"
			(at 97.79 105.41 0)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 97.79 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 93.98 33.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 93.98 36.83 0)
		)
		(property "Value" "+4V"
			(at 93.98 27.94 0)
		)
		(property "Footprint" ""
			(at 93.98 33.02 0)
		)
		(property "Datasheet" ""
			(at 93.98 33.02 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 93.98 33.02 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 88.9 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 88.9 195.58 0)
		)
		(property "Value" "GND"
			(at 88.9 194.31 0)
		)
		(property "Footprint" ""
			(at 88.9 189.23 0)
		)
		(property "Datasheet" ""
			(at 88.9 189.23 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 88.9 189.23 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+4V")
		(at 86.36 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR016"
			(at 86.36 161.29 0)
		)
		(property "Value" "+4V"
			(at 86.36 152.4 0)
		)
		(property "Footprint" ""
			(at 86.36 157.48 0)
		)
		(property "Datasheet" ""
			(at 86.36 157.48 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+4V\""
			(at 86.36 157.48 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 260.35 54.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C6"
			(at 262.89 53.3462 0)
		)
		(property "Value" "10pf"
			(at 262.89 55.8862 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 260.35 54.61 0)
		)
		(property "Datasheet" "~"
			(at 260.35 54.61 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 260.35 54.61 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 175.26 97.79 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R5"
			(at 177.8 96.5199 0)
		)
		(property "Value" "1K"
			(at 177.8 99.0599 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 175.26 97.79 0)
		)
		(property "Datasheet" "~"
			(at 175.26 97.79 0)
		)
		(property "Description" ""
			(at 175.26 97.79 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 93.98 46.99 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R4"
			(at 87.884 46.99 90)
		)
		(property "Value" "2.2k"
			(at 90.424 46.99 90)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 93.98 46.99 0)
		)
		(property "Datasheet" "~"
			(at 93.98 46.99 0)
		)
		(property "Description" ""
			(at 93.98 46.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Power_Protection:SP0502BAJT")
		(at 104.14 252.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D4"
			(at 110.49 251.4599 0)
		)
		(property "Value" "SP0502BAJT"
			(at 110.49 253.9999 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
			(at 109.855 254 0)
		)
		(property "Datasheet" "http://www.littelfuse.com/~/media/files/littelfuse/technical%20resources/documents/data%20sheets/sp05xxba.pdf"
			(at 107.315 249.555 0)
		)
		(property "Description" "TVS Diode Array, 5.5V Standoff, 2 Channels, SC-70 package"
			(at 104.14 252.73 0)
		)
		(pin "3")
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "D4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 274.32 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C8"
			(at 276.86 48.2662 0)
		)
		(property "Value" "33pf"
			(at 276.86 50.8062 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 274.32 49.53 0)
		)
		(property "Datasheet" "~"
			(at 274.32 49.53 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 274.32 49.53 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 342.9 109.22 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R3"
			(at 342.9 102.997 90)
		)
		(property "Value" "4.7k"
			(at 342.9 105.537 90)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder"
			(at 342.9 109.22 0)
		)
		(property "Datasheet" "~"
			(at 342.9 109.22 0)
		)
		(property "Description" ""
			(at 342.9 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 77.47 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C19"
			(at 79.502 240.03 0)
		)
		(property "Value" "33pf"
			(at 78.994 242.824 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 77.47 241.3 0)
		)
		(property "Datasheet" "~"
			(at 77.47 241.3 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 77.47 241.3 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 360.68 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05"
			(at 360.68 127 0)
		)
		(property "Value" "GND"
			(at 360.934 124.841 0)
		)
		(property "Footprint" ""
			(at 360.68 120.65 0)
		)
		(property "Datasheet" ""
			(at 360.68 120.65 0)
		)
		(property "Description" ""
			(at 360.68 120.65 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 57.15 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR027"
			(at 57.15 245.11 0)
		)
		(property "Value" "GND"
			(at 57.15 242.316 0)
		)
		(property "Footprint" ""
			(at 57.15 238.76 0)
		)
		(property "Datasheet" ""
			(at 57.15 238.76 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 57.15 238.76 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 165.1 165.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR019"
			(at 165.1 171.45 0)
		)
		(property "Value" "GND"
			(at 165.354 169.291 0)
		)
		(property "Footprint" ""
			(at 165.1 165.1 0)
		)
		(property "Datasheet" ""
			(at 165.1 165.1 0)
		)
		(property "Description" ""
			(at 165.1 165.1 0)
		)
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Power_Protection:SP0502BAJT")
		(at 269.24 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D3"
			(at 275.59 90.1699 0)
		)
		(property "Value" "SP0502BAJT"
			(at 275.59 92.7099 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
			(at 274.955 92.71 0)
		)
		(property "Datasheet" "http://www.littelfuse.com/~/media/files/littelfuse/technical%20resources/documents/data%20sheets/sp05xxba.pdf"
			(at 272.415 88.265 0)
		)
		(property "Description" "TVS Diode Array, 5.5V Standoff, 2 Channels, SC-70 package"
			(at 269.24 91.44 0)
		)
		(pin "3")
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "D3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:LED")
		(at 93.98 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D2"
			(at 87.884 38.4175 0)
		)
		(property "Value" "LED"
			(at 90.424 38.4175 0)
		)
		(property "Footprint" "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder"
			(at 93.98 36.83 0)
		)
		(property "Datasheet" "~"
			(at 93.98 36.83 0)
		)
		(property "Description" ""
			(at 93.98 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "D2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 260.35 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C5"
			(at 262.89 48.2662 0)
		)
		(property "Value" "10pf"
			(at 262.89 50.8062 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric_Pad0.64x0.40mm_HandSolder"
			(at 260.35 49.53 0)
		)
		(property "Datasheet" "~"
			(at 260.35 49.53 0)
		)
		(property "Description" "Unpolarized capacitor, small symbol"
			(at 260.35 49.53 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "Busi_card_v1"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
)