(module Kavin_Custom_Accelerometer (layer F.Cu) (tedit 58C2D23E)
  (fp_text reference REF** (at 0 9) (layer F.SilkS))
  (fp_text value Kavin_Custom_Accelerometer (at 0 -5.5) (layer F.Fab))
)
