(kicad_sch
	(version 20250114)
	(generator "eeschema")
	(generator_version "9.0")
	(paper "A3")
	(lib_symbols
		(symbol "Connector:TestPoint"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.762)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Connector:USB_A"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at -5.08 11.43 0)
			)
			(property "Value" "USB_A"
				(at -5.08 8.89 0)
			)
			(property "Footprint" ""
				(at 3.81 -1.27 0)
			)
			(property "Datasheet" "~"
				(at 3.81 -1.27 0)
			)
			(property "Description" "USB Type A connector"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector USB"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "USB*"
				(at 0 0 0)
			)
			(symbol "USB_A_0_1"
				(rectangle
					(start -5.08 -7.62)
					(end 5.08 7.62)
					(fill
						(type background)
					)
				)
				(circle
					(center -3.81 2.159)
					(radius 0.635)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -3.175 2.159) (xy -2.54 2.159) (xy -1.27 3.429) (xy -0.635 3.429)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 2.159) (xy -1.905 2.159) (xy -1.27 0.889) (xy 0 0.889)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.524 4.826)
					(end -4.318 5.334)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -1.27 4.572)
					(end -4.572 5.842)
					(fill
						(type none)
					)
				)
				(circle
					(center -0.635 3.429)
					(radius 0.381)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -0.127 -7.62)
					(end 0.127 -6.858)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 0.254 1.27)
					(end -0.508 0.508)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 0.635 2.794) (xy 0.635 1.524) (xy 1.905 2.159) (xy 0.635 2.794)
					)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 5.08 4.953)
					(end 4.318 5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 5.08 -0.127)
					(end 4.318 0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 5.08 -2.667)
					(end 4.318 -2.413)
					(fill
						(type none)
					)
				)
			)
			(symbol "USB_A_1_1"
				(polyline
					(pts
						(xy -1.905 2.159) (xy 0.635 2.159)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -2.54 -10.16 90)
					(length 2.54)
					(name "Shield")
					(number "5")
				)
				(pin power_in line
					(at 0 -10.16 90)
					(length 2.54)
					(name "GND")
					(number "4")
				)
				(pin power_in line
					(at 7.62 5.08 180)
					(length 2.54)
					(name "VBUS")
					(number "1")
				)
				(pin bidirectional line
					(at 7.62 0 180)
					(length 2.54)
					(name "D+")
					(number "3")
				)
				(pin bidirectional line
					(at 7.62 -2.54 180)
					(length 2.54)
					(name "D-")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:Antenna_Shield"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "AE"
				(at -1.905 4.445 0)
			)
			(property "Value" "Antenna_Shield"
				(at -1.905 2.54 0)
			)
			(property "Footprint" ""
				(at 0 2.54 0)
			)
			(property "Datasheet" "~"
				(at 0 2.54 0)
			)
			(property "Description" "Antenna with extra pin for shielding"
				(at 0 0 0)
			)
			(property "ki_keywords" "antenna"
				(at 0 0 0)
			)
			(symbol "Antenna_Shield_0_1"
				(arc
					(start 0 -2.667)
					(mid -0.8485 -2.1032)
					(end -0.508 -1.143)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 5.08) (xy 0 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.54) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 -1.143)
					(mid 0.8046 -2.0885)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.905) (xy 2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0.762 -1.905)
					(radius 0.1778)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.08) (xy 0 0) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Antenna_Shield_1_1"
				(pin input line
					(at 0 -5.08 90)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin input line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "Shield")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:Crystal_GND24"
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Y"
				(at 3.175 5.08 0)
			)
			(property "Value" "Crystal_GND24"
				(at 3.175 3.175 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Four pin crystal, GND on pins 2 and 4"
				(at 0 0 0)
			)
			(property "ki_keywords" "quartz ceramic resonator oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Crystal*"
				(at 0 0 0)
			)
			(symbol "Crystal_GND24_0_1"
				(polyline
					(pts
						(xy -2.54 2.286) (xy -2.54 3.556) (xy 2.54 3.556) (xy 2.54 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 0) (xy -2.032 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 -2.286) (xy -2.54 -3.556) (xy 2.54 -3.556) (xy 2.54 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 -1.27) (xy -2.032 1.27)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.143 2.54)
					(end 1.143 -2.54)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 3.556) (xy 0 3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -3.81) (xy 0 -3.556)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.032 0) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.032 -1.27) (xy 2.032 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Crystal_GND24_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 5.08 270)
					(length 1.27)
					(name "2")
					(number "2")
				)
				(pin passive line
					(at 0 -5.08 90)
					(length 1.27)
					(name "4")
					(number "4")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 1.27)
					(name "3")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:L"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "L"
				(at -1.27 0 90)
			)
			(property "Value" "L"
				(at 1.905 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
			)
			(symbol "L_0_1"
				(arc
					(start 0 2.54)
					(mid 0.6323 1.905)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 -0.635)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -1.905)
					(end 0 -2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:LED"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "LED"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Light emitting diode"
				(at 0 0 0)
			)
			(property "Sim.Pins" "1=K 2=A"
				(at 0 0 0)
			)
			(property "ki_keywords" "LED diode"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "LED* LED_SMD:* LED_THT:*"
				(at 0 0 0)
			)
			(symbol "LED_0_1"
				(polyline
					(pts
						(xy -3.048 -0.762) (xy -4.572 -2.286) (xy -3.81 -2.286) (xy -4.572 -2.286) (xy -4.572 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 -0.762) (xy -3.302 -2.286) (xy -2.54 -2.286) (xy -3.302 -2.286) (xy -3.302 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -1.27) (xy -1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.27) (xy 1.27 1.27) (xy -1.27 0) (xy 1.27 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "LED_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:R"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Interface_USB:FT4222HQ"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U2"
				(at 4.6265 25.4 0)
			)
			(property "Value" "FT4222HQ"
				(at 4.6265 22.86 0)
			)
			(property "Footprint" "Package_DFN_QFN:VQFN-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm"
				(at 0 36.83 0)
			)
			(property "Datasheet" "https://www.ftdichip.com/Support/Documents/DataSheets/ICs/DS_FT4222H.pdf"
				(at -13.97 21.59 0)
			)
			(property "Description" "USB 2.0 to Quad SPI or I2C Bridge, VQFN-32"
				(at 0 0 0)
			)
			(property "ki_keywords" "USB SPI I2C FTDI Bridge Converter Interface"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "VQFN*5x5mm*P0.5mm*"
				(at 0 0 0)
			)
			(symbol "FT4222HQ_0_1"
				(rectangle
					(start -17.78 20.32)
					(end 15.24 -20.32)
					(fill
						(type none)
					)
				)
			)
			(symbol "FT4222HQ_1_1"
				(pin bidirectional line
					(at -20.32 15.24 0)
					(length 2.54)
					(name "DEBUGGER")
					(number "1")
				)
				(pin input line
					(at -20.32 12.7 0)
					(length 2.54)
					(name "~{STEST_RST}")
					(number "2")
				)
				(pin input line
					(at -20.32 7.62 0)
					(length 2.54)
					(name "~{RESET}")
					(number "3")
				)
				(pin input line
					(at -20.32 5.08 0)
					(length 2.54)
					(name "DCNF0")
					(number "4")
				)
				(pin input line
					(at -20.32 2.54 0)
					(length 2.54)
					(name "DCNF1")
					(number "5")
				)
				(pin input line
					(at -20.32 -2.54 0)
					(length 2.54)
					(name "XSCI")
					(number "18")
				)
				(pin output line
					(at -20.32 -5.08 0)
					(length 2.54)
					(name "XSCO")
					(number "19")
				)
				(pin input line
					(at -20.32 -10.16 0)
					(length 2.54)
					(name "RREF")
					(number "21")
				)
				(pin bidirectional line
					(at -20.32 -12.7 0)
					(length 2.54)
					(name "DP")
					(number "23")
				)
				(pin bidirectional line
					(at -20.32 -15.24 0)
					(length 2.54)
					(name "DM")
					(number "22")
				)
				(pin input line
					(at -20.32 -17.78 0)
					(length 2.54)
					(name "VBUS_DET")
					(number "30")
				)
				(pin power_in line
					(at -5.08 22.86 270)
					(length 2.54)
					(name "VCCIO")
					(number "7")
				)
				(pin passive line
					(at -5.08 -22.86 90)
					(length 2.54)
					(hide yes)
					(name "DGND")
					(number "28")
				)
				(pin power_in line
					(at -5.08 -22.86 90)
					(length 2.54)
					(name "DGND")
					(number "6")
				)
				(pin power_in line
					(at -2.54 22.86 270)
					(length 2.54)
					(name "VCCIN")
					(number "26")
				)
				(pin power_in line
					(at -2.54 -22.86 90)
					(length 2.54)
					(name "UGND")
					(number "20")
				)
				(pin passive line
					(at -2.54 -22.86 90)
					(length 2.54)
					(hide yes)
					(name "UGND")
					(number "24")
				)
				(pin unspecified line
					(at 0 22.86 270)
					(length 2.54)
					(name "VOUT3V3")
					(number "25")
				)
				(pin power_in line
					(at 0 -22.86 90)
					(length 2.54)
					(name "AGND")
					(number "27")
				)
				(pin power_in line
					(at 2.54 22.86 270)
					(length 2.54)
					(name "VPP")
					(number "29")
				)
				(pin power_in line
					(at 2.54 -22.86 90)
					(length 2.54)
					(name "EP")
					(number "33")
				)
				(pin bidirectional line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "SCK")
					(number "8")
				)
				(pin bidirectional line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "MOSI")
					(number "10")
				)
				(pin bidirectional line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "MISO")
					(number "9")
				)
				(pin bidirectional line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "IO2")
					(number "11")
				)
				(pin bidirectional line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "IO3")
					(number "12")
				)
				(pin bidirectional line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "GPIO0")
					(number "13")
				)
				(pin bidirectional line
					(at 17.78 0 180)
					(length 2.54)
					(name "GPIO1")
					(number "14")
				)
				(pin bidirectional line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "GPIO2")
					(number "15")
				)
				(pin bidirectional line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "GPIO3")
					(number "16")
				)
				(pin output line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "~{SS0O}")
					(number "17")
				)
				(pin input line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "~{SS}")
					(number "32")
				)
				(pin output line
					(at 17.78 -17.78 180)
					(length 2.54)
					(name "BCD_DET")
					(number "31")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Power_Protection:USBLC6-2SC6"
			(pin_names
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U2"
				(at 2.286 4.064 0)
			)
			(property "Value" "USBLC6-2SC6"
				(at 2.032 -6.35 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
				(at 1.27 -6.35 0)
			)
			(property "Datasheet" "https://www.st.com/resource/en/datasheet/usblc6-2.pdf"
				(at 1.27 -8.255 0)
			)
			(property "Description" "Very low capacitance ESD protection diode, 2 data-line, SOT-23-6"
				(at 0 0 0)
			)
			(property "ki_keywords" "usb ethernet video"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "USBLC6-2SC6_0_0"
				(circle
					(center -1.524 0)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
				(circle
					(center -0.508 2.032)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
				(circle
					(center -0.508 -4.572)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
				(circle
					(center 0.508 2.032)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
				(circle
					(center 0.508 -4.572)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.524 -2.54)
					(radius 0.0001)
					(fill
						(type none)
					)
				)
			)
			(symbol "USBLC6-2SC6_0_1"
				(polyline
					(pts
						(xy -2.54 0) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 -2.54) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.508) (xy -1.016 0.508) (xy -1.524 1.524) (xy -2.032 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 -3.048) (xy -1.016 -3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.016 1.524) (xy -2.032 1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.016 -4.064) (xy -2.032 -4.064) (xy -1.524 -3.048) (xy -1.016 -4.064)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.508 -1.143) (xy -0.508 -0.762) (xy 0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy -0.508 2.032) (xy 0.508 2.032) (xy 0 1.524) (xy 0 -4.064) (xy -0.508 -4.572) (xy 0.508 -4.572)
						(xy 0 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.508 -1.778) (xy -0.508 -1.778) (xy 0 -0.762) (xy 0.508 -1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 1.524) (xy 2.032 1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 -3.048) (xy 2.032 -3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.032 0.508) (xy 1.016 0.508) (xy 1.524 1.524) (xy 2.032 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.032 -4.064) (xy 1.016 -4.064) (xy 1.524 -3.048) (xy 2.032 -4.064)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "USBLC6-2SC6_1_1"
				(rectangle
					(start -2.54 2.794)
					(end 2.54 -5.334)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.508 2.032) (xy -1.524 2.032) (xy -1.524 -4.572) (xy -0.508 -4.572)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.508 -4.572) (xy 1.524 -4.572) (xy 1.524 2.032) (xy 0.508 2.032)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "I/O1")
					(number "1")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "I/O2")
					(number "3")
				)
				(pin passive line
					(at 0 5.08 270)
					(length 2.54)
					(name "VBUS")
					(number "5")
				)
				(pin passive line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "I/O1")
					(number "6")
				)
				(pin passive line
					(at 5.08 -2.54 180)
					(length 2.54)
					(name "I/O2")
					(number "4")
				)
			)
			(embedded_fonts no)
		)
		(symbol "RF:CC2500"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U1"
				(at 2.0865 -15.24 0)
			)
			(property "Value" "CC2500"
				(at 2.0865 -17.78 0)
			)
			(property "Footprint" "Package_DFN_QFN:Texas_RGP0020H_VQFN-20-1EP_4x4mm_P0.5mm_EP2.4x2.4mm"
				(at 1.27 -17.78 0)
			)
			(property "Datasheet" "http://www.ti.com/lit/ds/symlink/cc2500.pdf"
				(at 5.08 15.24 0)
			)
			(property "Description" "Single Chip Low Power RF Transceiver, QFN-20"
				(at 0 0 0)
			)
			(property "ki_keywords" "Low Power RF Transceiver"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Texas*RGP0020H*"
				(at 0 0 0)
			)
			(symbol "CC2500_0_1"
				(rectangle
					(start -17.78 12.7)
					(end 17.78 -12.7)
					(fill
						(type none)
					)
				)
			)
			(symbol "CC2500_1_1"
				(pin input line
					(at -20.32 10.16 0)
					(length 2.54)
					(name "SCLK")
					(number "1")
				)
				(pin bidirectional line
					(at -20.32 7.62 0)
					(length 2.54)
					(name "SO(GDO1)")
					(number "2")
				)
				(pin input line
					(at -20.32 5.08 0)
					(length 2.54)
					(name "~{CS}")
					(number "7")
				)
				(pin input line
					(at -20.32 2.54 0)
					(length 2.54)
					(name "SI")
					(number "20")
				)
				(pin passive line
					(at -20.32 -2.54 0)
					(length 2.54)
					(name "XOSC_Q1")
					(number "8")
				)
				(pin passive line
					(at -20.32 -5.08 0)
					(length 2.54)
					(name "XOSC_Q2")
					(number "10")
				)
				(pin passive line
					(at -20.32 -10.16 0)
					(length 2.54)
					(name "RBIAS")
					(number "17")
				)
				(pin power_in line
					(at -2.54 15.24 270)
					(length 2.54)
					(name "DVDD")
					(number "4")
				)
				(pin power_in line
					(at 0 15.24 270)
					(length 2.54)
					(name "VDD_GUARD")
					(number "18")
				)
				(pin power_in line
					(at 0 -15.24 90)
					(length 2.54)
					(name "GND")
					(number "16")
				)
				(pin passive line
					(at 0 -15.24 90)
					(length 2.54)
					(hide yes)
					(name "GND")
					(number "19")
				)
				(pin passive line
					(at 0 -15.24 90)
					(length 2.54)
					(hide yes)
					(name "GND")
					(number "21")
				)
				(pin passive line
					(at 2.54 15.24 270)
					(length 2.54)
					(hide yes)
					(name "AVDD")
					(number "11")
				)
				(pin passive line
					(at 2.54 15.24 270)
					(length 2.54)
					(hide yes)
					(name "AVDD")
					(number "14")
				)
				(pin passive line
					(at 2.54 15.24 270)
					(length 2.54)
					(hide yes)
					(name "AVDD")
					(number "15")
				)
				(pin power_in line
					(at 2.54 15.24 270)
					(length 2.54)
					(name "AVDD")
					(number "9")
				)
				(pin bidirectional line
					(at 20.32 10.16 180)
					(length 2.54)
					(name "GDO2")
					(number "3")
				)
				(pin bidirectional line
					(at 20.32 7.62 180)
					(length 2.54)
					(name "GDO0(ATEST)")
					(number "6")
				)
				(pin passive line
					(at 20.32 0 180)
					(length 2.54)
					(name "RF_P")
					(number "12")
				)
				(pin passive line
					(at 20.32 -2.54 180)
					(length 2.54)
					(name "RF_N")
					(number "13")
				)
				(pin power_out line
					(at 20.32 -10.16 180)
					(length 2.54)
					(name "DCOUPL")
					(number "5")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:+1V1"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V1"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V1\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:Earth"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "Earth"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"Earth\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global ground gnd"
				(at 0 0 0)
			)
			(symbol "Earth_0_1"
				(polyline
					(pts
						(xy -0.635 -1.905) (xy 0.635 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.127 -2.54) (xy 0.127 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -1.27) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.27) (xy -1.27 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Earth_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
	)
	(junction
		(at 106.68 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 101.6)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 82.55 100.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 106.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 241.3 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 97.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 191.77 86.36)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 184.15 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 233.68 106.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 100.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 171.45 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 233.68 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 95.25)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 154.94 113.03)
	)
	(no_connect
		(at 139.7 87.63)
	)
	(no_connect
		(at 212.09 95.25)
	)
	(no_connect
		(at 154.94 128.27)
	)
	(no_connect
		(at 212.09 92.71)
	)
	(no_connect
		(at 154.94 115.57)
	)
	(no_connect
		(at 154.94 110.49)
	)
	(no_connect
		(at 154.94 107.95)
	)
	(wire
		(pts
			(xy 107.95 120.65) (xy 109.22 120.65)
		)
	)
	(wire
		(pts
			(xy 233.68 101.6) (xy 233.68 104.14)
		)
	)
	(wire
		(pts
			(xy 85.09 95.25) (xy 88.9 95.25)
		)
	)
	(wire
		(pts
			(xy 214.63 101.6) (xy 214.63 102.87)
		)
	)
	(wire
		(pts
			(xy 92.71 100.33) (xy 95.25 100.33)
		)
	)
	(wire
		(pts
			(xy 177.8 121.92) (xy 177.8 120.65)
		)
	)
	(wire
		(pts
			(xy 106.68 95.25) (xy 107.95 95.25)
		)
	)
	(wire
		(pts
			(xy 189.23 86.36) (xy 189.23 87.63)
		)
	)
	(wire
		(pts
			(xy 213.36 113.03) (xy 212.09 113.03)
		)
	)
	(wire
		(pts
			(xy 170.18 97.79) (xy 171.45 97.79)
		)
	)
	(wire
		(pts
			(xy 115.57 105.41) (xy 116.84 105.41)
		)
	)
	(wire
		(pts
			(xy 241.3 104.14) (xy 243.84 104.14)
		)
	)
	(wire
		(pts
			(xy 115.57 95.25) (xy 116.84 95.25)
		)
	)
	(wire
		(pts
			(xy 106.68 102.87) (xy 107.95 102.87)
		)
	)
	(wire
		(pts
			(xy 177.8 134.62) (xy 177.8 132.08)
		)
	)
	(wire
		(pts
			(xy 194.31 86.36) (xy 194.31 87.63)
		)
	)
	(wire
		(pts
			(xy 170.18 95.25) (xy 171.45 95.25)
		)
	)
	(wire
		(pts
			(xy 233.68 106.68) (xy 232.41 106.68)
		)
	)
	(wire
		(pts
			(xy 214.63 105.41) (xy 212.09 105.41)
		)
	)
	(wire
		(pts
			(xy 172.72 120.65) (xy 172.72 121.92)
		)
	)
	(wire
		(pts
			(xy 106.68 105.41) (xy 107.95 105.41)
		)
	)
	(wire
		(pts
			(xy 191.77 86.36) (xy 189.23 86.36)
		)
	)
	(wire
		(pts
			(xy 214.63 102.87) (xy 212.09 102.87)
		)
	)
	(wire
		(pts
			(xy 223.52 106.68) (xy 222.25 106.68)
		)
	)
	(wire
		(pts
			(xy 81.28 100.33) (xy 82.55 100.33)
		)
	)
	(wire
		(pts
			(xy 177.8 120.65) (xy 172.72 120.65)
		)
	)
	(wire
		(pts
			(xy 107.95 128.27) (xy 116.84 128.27)
		)
	)
	(wire
		(pts
			(xy 223.52 109.22) (xy 223.52 106.68)
		)
	)
	(wire
		(pts
			(xy 170.18 92.71) (xy 171.45 92.71)
		)
	)
	(wire
		(pts
			(xy 170.18 127) (xy 171.45 127)
		)
	)
	(wire
		(pts
			(xy 106.68 109.22) (xy 106.68 107.95)
		)
	)
	(wire
		(pts
			(xy 163.83 114.3) (xy 163.83 113.03)
		)
	)
	(wire
		(pts
			(xy 156.21 95.25) (xy 154.94 95.25)
		)
	)
	(wire
		(pts
			(xy 106.68 102.87) (xy 106.68 97.79)
		)
	)
	(wire
		(pts
			(xy 88.9 107.95) (xy 88.9 105.41)
		)
	)
	(wire
		(pts
			(xy 185.42 127) (xy 184.15 127)
		)
	)
	(wire
		(pts
			(xy 223.52 106.68) (xy 224.79 106.68)
		)
	)
	(wire
		(pts
			(xy 223.52 101.6) (xy 224.79 101.6)
		)
	)
	(wire
		(pts
			(xy 214.63 106.68) (xy 214.63 105.41)
		)
	)
	(wire
		(pts
			(xy 232.41 101.6) (xy 233.68 101.6)
		)
	)
	(wire
		(pts
			(xy 115.57 107.95) (xy 116.84 107.95)
		)
	)
	(wire
		(pts
			(xy 246.38 104.14) (xy 246.38 106.68)
		)
	)
	(wire
		(pts
			(xy 115.57 102.87) (xy 116.84 102.87)
		)
	)
	(wire
		(pts
			(xy 107.95 107.95) (xy 106.68 107.95)
		)
	)
	(wire
		(pts
			(xy 241.3 116.84) (xy 241.3 114.3)
		)
	)
	(wire
		(pts
			(xy 156.21 92.71) (xy 154.94 92.71)
		)
	)
	(wire
		(pts
			(xy 106.68 95.25) (xy 106.68 97.79)
		)
	)
	(wire
		(pts
			(xy 156.21 120.65) (xy 154.94 120.65)
		)
	)
	(wire
		(pts
			(xy 233.68 116.84) (xy 233.68 114.3)
		)
	)
	(wire
		(pts
			(xy 115.57 97.79) (xy 116.84 97.79)
		)
	)
	(wire
		(pts
			(xy 132.08 86.36) (xy 132.08 87.63)
		)
	)
	(wire
		(pts
			(xy 223.52 101.6) (xy 222.25 101.6)
		)
	)
	(wire
		(pts
			(xy 106.68 97.79) (xy 107.95 97.79)
		)
	)
	(wire
		(pts
			(xy 171.45 127) (xy 173.99 127)
		)
	)
	(wire
		(pts
			(xy 233.68 104.14) (xy 233.68 106.68)
		)
	)
	(wire
		(pts
			(xy 223.52 100.33) (xy 223.52 101.6)
		)
	)
	(wire
		(pts
			(xy 78.74 118.11) (xy 77.47 118.11)
		)
	)
	(wire
		(pts
			(xy 170.18 100.33) (xy 171.45 100.33)
		)
	)
	(wire
		(pts
			(xy 137.16 86.36) (xy 137.16 87.63)
		)
	)
	(wire
		(pts
			(xy 191.77 86.36) (xy 191.77 87.63)
		)
	)
	(wire
		(pts
			(xy 96.52 100.33) (xy 95.25 100.33)
		)
	)
	(wire
		(pts
			(xy 194.31 86.36) (xy 191.77 86.36)
		)
	)
	(wire
		(pts
			(xy 156.21 97.79) (xy 154.94 97.79)
		)
	)
	(wire
		(pts
			(xy 106.68 105.41) (xy 106.68 107.95)
		)
	)
	(wire
		(pts
			(xy 241.3 104.14) (xy 241.3 106.68)
		)
	)
	(wire
		(pts
			(xy 181.61 127) (xy 184.15 127)
		)
	)
	(wire
		(pts
			(xy 134.62 83.82) (xy 134.62 87.63)
		)
	)
	(wire
		(pts
			(xy 106.68 93.98) (xy 106.68 95.25)
		)
	)
	(wire
		(pts
			(xy 82.55 100.33) (xy 85.09 100.33)
		)
	)
	(global_label "USB+"
		(shape input)
		(at 77.47 123.19 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 83.2676 123.19 0)
		)
	)
	(global_label "26OSCIN"
		(shape input)
		(at 171.45 105.41 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 163.8322 105.41 0)
		)
	)
	(global_label "MISO"
		(shape input)
		(at 156.21 97.79 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 161.7471 97.79 0)
		)
	)
	(global_label "OSCIN"
		(shape input)
		(at 116.84 113.03 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 110.783 113.03 0)
		)
	)
	(global_label "SCK"
		(shape input)
		(at 170.18 92.71 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 165.1628 92.71 0)
		)
	)
	(global_label "USB-"
		(shape input)
		(at 77.47 125.73 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 83.1808 125.73 0)
		)
	)
	(global_label "USB_+"
		(shape input)
		(at 116.84 123.19 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 110.3488 123.19 0)
		)
	)
	(global_label "USB-"
		(shape input)
		(at 88.9 125.73 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 83.1892 125.73 0)
		)
	)
	(global_label "USB_+"
		(shape input)
		(at 99.06 123.19 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 105.5512 123.19 0)
		)
	)
	(global_label "OSCOUT"
		(shape input)
		(at 116.84 115.57 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 109.4815 115.57 0)
		)
	)
	(global_label "OSCOUT"
		(shape input)
		(at 96.52 100.33 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 103.8785 100.33 0)
		)
	)
	(global_label "26OSCOUT"
		(shape input)
		(at 171.45 107.95 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 162.5306 107.95 0)
		)
	)
	(global_label "USB_-"
		(shape input)
		(at 99.06 125.73 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 105.4644 125.73 0)
		)
	)
	(global_label "USB+"
		(shape input)
		(at 88.9 123.19 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 83.1024 123.19 0)
		)
	)
	(global_label "MOSI"
		(shape input)
		(at 156.21 95.25 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 161.7471 95.25 0)
		)
	)
	(global_label "MISO"
		(shape input)
		(at 170.18 95.25 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 164.6429 95.25 0)
		)
	)
	(global_label "MOSI"
		(shape input)
		(at 170.18 100.33 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 164.6429 100.33 0)
		)
	)
	(global_label "SS"
		(shape input)
		(at 170.18 97.79 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 165.8564 97.79 0)
		)
	)
	(global_label "26OSCOUT"
		(shape input)
		(at 185.42 127 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 194.3394 127 0)
		)
	)
	(global_label "USB_-"
		(shape input)
		(at 116.84 125.73 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 110.4356 125.73 0)
		)
	)
	(global_label "26OSCIN"
		(shape input)
		(at 170.18 127 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 162.5622 127 0)
		)
	)
	(global_label "SCK"
		(shape input)
		(at 156.21 92.71 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 161.2272 92.71 0)
		)
	)
	(global_label "OSCIN"
		(shape input)
		(at 81.28 100.33 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 75.223 100.33 0)
		)
	)
	(global_label "SS"
		(shape input)
		(at 156.21 120.65 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 160.5336 120.65 0)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 228.6 106.68 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L2"
			(at 228.6 105.664 90)
		)
		(property "Value" "1.2nH"
			(at 228.854 108.712 90)
		)
		(property "Footprint" "Inductor_SMD:L_0402_1005Metric"
			(at 228.6 106.68 0)
		)
		(property "Datasheet" "~"
			(at 228.6 106.68 0)
		)
		(property "Description" "Inductor"
			(at 228.6 106.68 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "L2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 88.9 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 88.9 92.71 0)
		)
		(property "Value" "Earth"
			(at 88.9 91.44 0)
		)
		(property "Footprint" ""
			(at 88.9 86.36 0)
		)
		(property "Datasheet" "~"
			(at 88.9 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 88.9 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 82.55 104.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 83.058 102.108 0)
		)
		(property "Value" "12pF"
			(at 83.058 106.172 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 83.5152 107.95 0)
		)
		(property "Datasheet" "~"
			(at 82.55 104.14 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 82.55 104.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 198.12 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 198.628 79.248 0)
		)
		(property "Value" "22uF"
			(at 198.628 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 199.0852 85.09 0)
		)
		(property "Datasheet" "~"
			(at 198.12 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 198.12 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 93.98 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 94.488 80.518 0)
		)
		(property "Value" "22uF"
			(at 94.488 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 94.9452 86.36 0)
		)
		(property "Datasheet" "~"
			(at 93.98 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 93.98 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 223.52 113.03 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C21"
			(at 225.806 111.252 0)
		)
		(property "Value" "1pF"
			(at 225.806 115.062 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 222.5548 109.22 0)
		)
		(property "Datasheet" "~"
			(at 223.52 113.03 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 223.52 113.03 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 171.45 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 171.958 128.778 0)
		)
		(property "Value" "22pF"
			(at 171.958 132.842 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 172.4152 134.62 0)
		)
		(property "Datasheet" "~"
			(at 171.45 130.81 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 171.45 130.81 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 67.31 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C1"
			(at 67.818 80.518 0)
		)
		(property "Value" "22uF"
			(at 67.818 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 68.2752 86.36 0)
		)
		(property "Datasheet" "~"
			(at 67.31 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 67.31 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 82.55 107.95 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 82.55 114.3 0)
		)
		(property "Value" "Earth"
			(at 82.55 113.03 0)
		)
		(property "Footprint" ""
			(at 82.55 107.95 0)
		)
		(property "Datasheet" "~"
			(at 82.55 107.95 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 82.55 107.95 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 67.31 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05"
			(at 67.31 139.7 0)
		)
		(property "Value" "Earth"
			(at 67.31 138.43 0)
		)
		(property "Footprint" ""
			(at 67.31 133.35 0)
		)
		(property "Datasheet" "~"
			(at 67.31 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 67.31 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 233.68 116.84 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR059"
			(at 233.68 123.19 0)
		)
		(property "Value" "Earth"
			(at 233.68 121.92 0)
		)
		(property "Footprint" ""
			(at 233.68 116.84 0)
		)
		(property "Datasheet" "~"
			(at 233.68 116.84 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 233.68 116.84 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR059")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Crystal_GND24")
		(at 177.8 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Y2"
			(at 179.324 120.904 0)
		)
		(property "Value" "3225 26MHz"
			(at 182.372 122.428 0)
		)
		(property "Footprint" "Crystal:Crystal_SMD_3225-4Pin_3.2x2.5mm"
			(at 177.8 127 0)
		)
		(property "Datasheet" "~"
			(at 177.8 127 0)
		)
		(property "Description" "Four pin crystal, GND on pins 2 and 4"
			(at 177.8 127 0)
		)
		(pin "2")
		(pin "4")
		(pin "3")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "Y2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 106.68 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR026"
			(at 106.68 97.79 0)
		)
		(property "Value" "+3.3V"
			(at 106.68 90.678 0)
		)
		(property "Footprint" ""
			(at 106.68 93.98 0)
		)
		(property "Datasheet" ""
			(at 106.68 93.98 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 106.68 93.98 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 88.9 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 89.408 80.518 0)
		)
		(property "Value" "22uF"
			(at 89.408 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 89.8652 86.36 0)
		)
		(property "Datasheet" "~"
			(at 88.9 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 88.9 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 83.82 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 84.328 80.518 0)
		)
		(property "Value" "22uF"
			(at 84.328 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 84.7852 86.36 0)
		)
		(property "Datasheet" "~"
			(at 83.82 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 83.82 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 241.3 110.49 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 243.586 108.712 0)
		)
		(property "Value" "1.5pF"
			(at 244.348 112.522 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 240.3348 106.68 0)
		)
		(property "Datasheet" "~"
			(at 241.3 110.49 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 241.3 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 154.94 100.33 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP1"
			(at 159.258 100.33 90)
		)
		(property "Value" "TestPoint"
			(at 160.02 101.6 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 154.94 105.41 0)
		)
		(property "Datasheet" "~"
			(at 154.94 105.41 0)
		)
		(property "Description" "test point"
			(at 154.94 100.33 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "TP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 182.88 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR045"
			(at 182.88 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 182.88 74.168 0)
		)
		(property "Footprint" ""
			(at 182.88 77.47 0)
		)
		(property "Datasheet" ""
			(at 182.88 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 182.88 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR045")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 83.82 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR011"
			(at 83.82 82.55 0)
		)
		(property "Value" "+5V"
			(at 83.566 75.438 0)
		)
		(property "Footprint" ""
			(at 83.82 78.74 0)
		)
		(property "Datasheet" ""
			(at 83.82 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 83.82 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 107.95 128.27 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR029"
			(at 107.95 132.08 0)
		)
		(property "Value" "+5V"
			(at 107.696 124.968 0)
		)
		(property "Footprint" ""
			(at 107.95 128.27 0)
		)
		(property "Datasheet" ""
			(at 107.95 128.27 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 107.95 128.27 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR029")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 93.98 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR017"
			(at 93.98 82.55 0)
		)
		(property "Value" "+3.3V"
			(at 93.98 75.438 0)
		)
		(property "Footprint" ""
			(at 93.98 78.74 0)
		)
		(property "Datasheet" ""
			(at 93.98 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 93.98 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 111.76 97.79 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R3"
			(at 107.188 97.028 90)
		)
		(property "Value" "10K"
			(at 114.3 97.028 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 111.76 96.012 90)
		)
		(property "Datasheet" "~"
			(at 111.76 97.79 0)
		)
		(property "Description" "Resistor"
			(at 111.76 97.79 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Interface_USB:FT4222HQ")
		(at 137.16 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U2"
			(at 147.574 89.154 0)
		)
		(property "Value" "FT4222HQ"
			(at 143.002 132.334 0)
		)
		(property "Footprint" "Package_DFN_QFN:VQFN-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm"
			(at 137.16 73.66 0)
		)
		(property "Datasheet" "https://www.ftdichip.com/Support/Documents/DataSheets/ICs/DS_FT4222H.pdf"
			(at 123.19 88.9 0)
		)
		(property "Description" "USB 2.0 to Quad SPI or I2C Bridge, VQFN-32"
			(at 137.16 110.49 0)
		)
		(pin "30")
		(pin "25")
		(pin "23")
		(pin "1")
		(pin "5")
		(pin "18")
		(pin "7")
		(pin "28")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "21")
		(pin "6")
		(pin "26")
		(pin "19")
		(pin "22")
		(pin "20")
		(pin "24")
		(pin "27")
		(pin "29")
		(pin "33")
		(pin "8")
		(pin "10")
		(pin "9")
		(pin "11")
		(pin "12")
		(pin "14")
		(pin "17")
		(pin "13")
		(pin "15")
		(pin "32")
		(pin "16")
		(pin "31")
		(instances
			(project ""
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:LED")
		(at 67.31 105.41 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D1"
			(at 70.358 103.632 90)
		)
		(property "Value" "LED 0402"
			(at 74.676 105.41 90)
		)
		(property "Footprint" "LED_SMD:LED_0402_1005Metric"
			(at 67.31 105.41 0)
		)
		(property "Datasheet" "~"
			(at 67.31 105.41 0)
		)
		(property "Description" "Light emitting diode"
			(at 67.31 105.41 0)
		)
		(property "Sim.Pins" "1=K 2=A"
			(at 67.31 105.41 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Power_Protection:USBLC6-2SC6")
		(at 93.98 123.19 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 96.266 119.126 0)
		)
		(property "Value" "USBLC6-2SC6"
			(at 103.124 129.794 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
			(at 92.71 129.54 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/usblc6-2.pdf"
			(at 92.71 131.445 0)
		)
		(property "Description" "Very low capacitance ESD protection diode, 2 data-line, SOT-23-6"
			(at 93.98 123.19 0)
		)
		(pin "5")
		(pin "4")
		(pin "3")
		(pin "2")
		(pin "1")
		(pin "6")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 177.8 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR043"
			(at 177.8 91.44 0)
		)
		(property "Value" "Earth"
			(at 177.8 90.17 0)
		)
		(property "Footprint" ""
			(at 177.8 85.09 0)
		)
		(property "Datasheet" "~"
			(at 177.8 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 177.8 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR043")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 95.25 107.95 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 95.25 114.3 0)
		)
		(property "Value" "Earth"
			(at 95.25 113.03 0)
		)
		(property "Footprint" ""
			(at 95.25 107.95 0)
		)
		(property "Datasheet" "~"
			(at 95.25 107.95 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 95.25 107.95 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 67.31 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 67.31 92.71 0)
		)
		(property "Value" "Earth"
			(at 67.31 91.44 0)
		)
		(property "Footprint" ""
			(at 67.31 86.36 0)
		)
		(property "Datasheet" "~"
			(at 67.31 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 67.31 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 83.82 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 83.82 92.71 0)
		)
		(property "Value" "Earth"
			(at 83.82 91.44 0)
		)
		(property "Footprint" ""
			(at 83.82 86.36 0)
		)
		(property "Datasheet" "~"
			(at 83.82 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 83.82 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 72.39 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 72.898 80.518 0)
		)
		(property "Value" "22uF"
			(at 72.898 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 73.3552 86.36 0)
		)
		(property "Datasheet" "~"
			(at 72.39 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 72.39 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 78.74 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR09"
			(at 78.74 121.92 0)
		)
		(property "Value" "+5V"
			(at 78.486 114.808 0)
		)
		(property "Footprint" ""
			(at 78.74 118.11 0)
		)
		(property "Datasheet" ""
			(at 78.74 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 78.74 118.11 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 172.72 121.92 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR041"
			(at 172.72 128.27 0)
		)
		(property "Value" "Earth"
			(at 172.72 127 0)
		)
		(property "Footprint" ""
			(at 172.72 121.92 0)
		)
		(property "Datasheet" "~"
			(at 172.72 121.92 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 172.72 121.92 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR041")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 177.8 134.62 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR044"
			(at 177.8 140.97 0)
		)
		(property "Value" "Earth"
			(at 177.8 139.7 0)
		)
		(property "Footprint" ""
			(at 177.8 134.62 0)
		)
		(property "Datasheet" "~"
			(at 177.8 134.62 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 177.8 134.62 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR044")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 104.14 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR024"
			(at 104.14 82.55 0)
		)
		(property "Value" "+3.3V"
			(at 104.14 75.438 0)
		)
		(property "Footprint" ""
			(at 104.14 78.74 0)
		)
		(property "Datasheet" ""
			(at 104.14 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 104.14 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 208.28 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR054"
			(at 208.28 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 208.28 74.168 0)
		)
		(property "Footprint" ""
			(at 208.28 77.47 0)
		)
		(property "Datasheet" ""
			(at 208.28 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 208.28 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR054")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 223.52 96.52 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L1"
			(at 225.044 96.266 0)
		)
		(property "Value" "1.2nH"
			(at 225.806 98.044 0)
		)
		(property "Footprint" "Inductor_SMD:L_0402_1005Metric"
			(at 223.52 96.52 0)
		)
		(property "Datasheet" "~"
			(at 223.52 96.52 0)
		)
		(property "Description" "Inductor"
			(at 223.52 96.52 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "L1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 99.06 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR023"
			(at 99.06 92.71 0)
		)
		(property "Value" "Earth"
			(at 99.06 91.44 0)
		)
		(property "Footprint" ""
			(at 99.06 86.36 0)
		)
		(property "Datasheet" "~"
			(at 99.06 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 99.06 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Crystal_GND24")
		(at 88.9 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Y1"
			(at 90.424 94.234 0)
		)
		(property "Value" "3225 12MHz"
			(at 93.472 95.758 0)
		)
		(property "Footprint" "Crystal:Crystal_SMD_3225-4Pin_3.2x2.5mm"
			(at 88.9 100.33 0)
		)
		(property "Datasheet" "~"
			(at 88.9 100.33 0)
		)
		(property "Description" "Four pin crystal, GND on pins 2 and 4"
			(at 88.9 100.33 0)
		)
		(pin "2")
		(pin "4")
		(pin "3")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "Y1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 137.16 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR034"
			(at 137.16 90.17 0)
		)
		(property "Value" "+3.3V"
			(at 137.16 83.058 0)
		)
		(property "Footprint" ""
			(at 137.16 86.36 0)
		)
		(property "Datasheet" ""
			(at 137.16 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 137.16 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 88.9 107.95 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR016"
			(at 88.9 114.3 0)
		)
		(property "Value" "Earth"
			(at 88.9 113.03 0)
		)
		(property "Footprint" ""
			(at 88.9 107.95 0)
		)
		(property "Datasheet" "~"
			(at 88.9 107.95 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 88.9 107.95 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 177.8 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR042"
			(at 177.8 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 177.8 74.168 0)
		)
		(property "Footprint" ""
			(at 177.8 77.47 0)
		)
		(property "Datasheet" ""
			(at 177.8 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 177.8 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR042")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 177.8 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 178.308 79.248 0)
		)
		(property "Value" "100nF"
			(at 178.308 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 178.7652 85.09 0)
		)
		(property "Datasheet" "~"
			(at 177.8 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 177.8 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 93.98 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR020"
			(at 93.98 137.16 0)
		)
		(property "Value" "Earth"
			(at 93.98 135.89 0)
		)
		(property "Footprint" ""
			(at 93.98 130.81 0)
		)
		(property "Datasheet" "~"
			(at 93.98 130.81 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 93.98 130.81 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 93.98 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR018"
			(at 93.98 92.71 0)
		)
		(property "Value" "Earth"
			(at 93.98 91.44 0)
		)
		(property "Footprint" ""
			(at 93.98 86.36 0)
		)
		(property "Datasheet" "~"
			(at 93.98 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 93.98 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 172.72 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 173.228 79.248 0)
		)
		(property "Value" "22uF"
			(at 173.228 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 173.6852 85.09 0)
		)
		(property "Datasheet" "~"
			(at 172.72 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 172.72 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 154.94 102.87 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP2"
			(at 159.258 102.87 90)
		)
		(property "Value" "TestPoint"
			(at 160.02 104.14 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 154.94 107.95 0)
		)
		(property "Datasheet" "~"
			(at 154.94 107.95 0)
		)
		(property "Description" "test point"
			(at 154.94 102.87 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "TP2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 208.28 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 208.788 79.248 0)
		)
		(property "Value" "100nF"
			(at 208.788 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 209.2452 85.09 0)
		)
		(property "Datasheet" "~"
			(at 208.28 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 208.28 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 237.49 104.14 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L3"
			(at 237.49 103.124 90)
		)
		(property "Value" "1.2nH"
			(at 237.744 106.172 90)
		)
		(property "Footprint" "Inductor_SMD:L_0402_1005Metric"
			(at 237.49 104.14 0)
		)
		(property "Datasheet" "~"
			(at 237.49 104.14 0)
		)
		(property "Description" "Inductor"
			(at 237.49 104.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "L3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Antenna_Shield")
		(at 243.84 99.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "AE1"
			(at 245.364 99.568 0)
		)
		(property "Value" "Antenna_Shield"
			(at 245.618 99.568 0)
		)
		(property "Footprint" "RF_Antenna:Texas_SWRA117D_2.4GHz_Right"
			(at 243.84 96.52 0)
		)
		(property "Datasheet" "~"
			(at 243.84 96.52 0)
		)
		(property "Description" "Antenna with extra pin for shielding"
			(at 243.84 99.06 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "AE1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 241.3 116.84 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR060"
			(at 241.3 123.19 0)
		)
		(property "Value" "Earth"
			(at 241.3 121.92 0)
		)
		(property "Footprint" ""
			(at 241.3 116.84 0)
		)
		(property "Datasheet" "~"
			(at 241.3 116.84 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 241.3 116.84 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR060")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:USB_A")
		(at 69.85 123.19 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J1"
			(at 70.104 114.3 0)
		)
		(property "Value" "USB_A"
			(at 72.898 132.08 0)
		)
		(property "Footprint" "Connector_USB:USB_A_CNCTech_1001-011-01101_Horizontal"
			(at 73.66 124.46 0)
		)
		(property "Datasheet" "~"
			(at 73.66 124.46 0)
		)
		(property "Description" "USB Type A connector"
			(at 69.85 123.19 0)
		)
		(pin "1")
		(pin "4")
		(pin "5")
		(pin "2")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 99.06 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 99.568 80.518 0)
		)
		(property "Value" "22uF"
			(at 99.568 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 100.0252 86.36 0)
		)
		(property "Datasheet" "~"
			(at 99.06 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 99.06 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 191.77 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR049"
			(at 191.77 124.46 0)
		)
		(property "Value" "Earth"
			(at 191.77 123.19 0)
		)
		(property "Footprint" ""
			(at 191.77 118.11 0)
		)
		(property "Datasheet" "~"
			(at 191.77 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 191.77 118.11 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR049")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 99.06 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR022"
			(at 99.06 82.55 0)
		)
		(property "Value" "+3.3V"
			(at 99.06 75.438 0)
		)
		(property "Footprint" ""
			(at 99.06 78.74 0)
		)
		(property "Datasheet" ""
			(at 99.06 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 99.06 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 67.31 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR03"
			(at 67.31 97.79 0)
		)
		(property "Value" "+5V"
			(at 67.056 90.678 0)
		)
		(property "Footprint" ""
			(at 67.31 93.98 0)
		)
		(property "Datasheet" ""
			(at 67.31 93.98 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 67.31 93.98 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 172.72 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR040"
			(at 172.72 91.44 0)
		)
		(property "Value" "Earth"
			(at 172.72 90.17 0)
		)
		(property "Footprint" ""
			(at 172.72 85.09 0)
		)
		(property "Datasheet" "~"
			(at 172.72 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 172.72 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR040")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 223.52 92.71 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR057"
			(at 223.52 86.36 0)
		)
		(property "Value" "Earth"
			(at 223.52 87.63 0)
		)
		(property "Footprint" ""
			(at 223.52 92.71 0)
		)
		(property "Datasheet" "~"
			(at 223.52 92.71 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 223.52 92.71 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR057")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 113.03 120.65 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 111.252 118.618 90)
		)
		(property "Value" "12K"
			(at 113.03 118.618 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 113.03 118.872 90)
		)
		(property "Datasheet" "~"
			(at 113.03 120.65 0)
		)
		(property "Description" "Resistor"
			(at 113.03 120.65 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 184.15 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 184.658 128.778 0)
		)
		(property "Value" "22pF"
			(at 184.658 132.842 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 185.1152 134.62 0)
		)
		(property "Datasheet" "~"
			(at 184.15 130.81 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 184.15 130.81 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 85.09 95.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 85.09 101.6 0)
		)
		(property "Value" "Earth"
			(at 85.09 100.33 0)
		)
		(property "Footprint" ""
			(at 85.09 95.25 0)
		)
		(property "Datasheet" "~"
			(at 85.09 95.25 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 85.09 95.25 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 228.6 101.6 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C22"
			(at 232.156 100.584 90)
		)
		(property "Value" "1pF"
			(at 231.902 102.616 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 232.41 100.6348 0)
		)
		(property "Datasheet" "~"
			(at 228.6 101.6 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 228.6 101.6 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 67.31 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR01"
			(at 67.31 82.55 0)
		)
		(property "Value" "+5V"
			(at 67.056 75.438 0)
		)
		(property "Footprint" ""
			(at 67.31 78.74 0)
		)
		(property "Datasheet" ""
			(at 67.31 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 67.31 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 111.76 102.87 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R4"
			(at 109.982 100.838 90)
		)
		(property "Value" "47K"
			(at 111.76 100.838 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 111.76 101.092 90)
		)
		(property "Datasheet" "~"
			(at 111.76 102.87 0)
		)
		(property "Description" "Resistor"
			(at 111.76 102.87 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 198.12 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR050"
			(at 198.12 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 198.12 74.168 0)
		)
		(property "Footprint" ""
			(at 198.12 77.47 0)
		)
		(property "Datasheet" ""
			(at 198.12 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 198.12 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR050")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 191.77 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR048"
			(at 191.77 90.17 0)
		)
		(property "Value" "+3.3V"
			(at 191.77 83.058 0)
		)
		(property "Footprint" ""
			(at 191.77 86.36 0)
		)
		(property "Datasheet" ""
			(at 191.77 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 191.77 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR048")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 132.08 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR031"
			(at 132.08 139.7 0)
		)
		(property "Value" "Earth"
			(at 132.08 138.43 0)
		)
		(property "Footprint" ""
			(at 132.08 133.35 0)
		)
		(property "Datasheet" "~"
			(at 132.08 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 132.08 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR031")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 218.44 101.6 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C19"
			(at 221.742 100.838 90)
		)
		(property "Value" "100pF"
			(at 223.012 102.87 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 222.25 100.6348 0)
		)
		(property "Datasheet" "~"
			(at 218.44 101.6 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 218.44 101.6 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 172.72 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR039"
			(at 172.72 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 172.72 74.168 0)
		)
		(property "Footprint" ""
			(at 172.72 77.47 0)
		)
		(property "Datasheet" ""
			(at 172.72 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 172.72 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR039")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 182.88 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR046"
			(at 182.88 91.44 0)
		)
		(property "Value" "Earth"
			(at 182.88 90.17 0)
		)
		(property "Footprint" ""
			(at 182.88 85.09 0)
		)
		(property "Datasheet" "~"
			(at 182.88 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 182.88 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR046")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 104.14 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 104.648 80.518 0)
		)
		(property "Value" "100nF"
			(at 104.648 84.582 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 105.1052 86.36 0)
		)
		(property "Datasheet" "~"
			(at 104.14 82.55 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 104.14 82.55 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 93.98 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR019"
			(at 93.98 121.92 0)
		)
		(property "Value" "+5V"
			(at 93.726 114.808 0)
		)
		(property "Footprint" ""
			(at 93.98 118.11 0)
		)
		(property "Datasheet" ""
			(at 93.98 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 93.98 118.11 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 88.9 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR014"
			(at 88.9 82.55 0)
		)
		(property "Value" "+5V"
			(at 88.646 75.438 0)
		)
		(property "Footprint" ""
			(at 88.9 78.74 0)
		)
		(property "Datasheet" ""
			(at 88.9 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 88.9 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 110.49 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C23"
			(at 235.966 108.712 0)
		)
		(property "Value" "1.8pF"
			(at 236.728 112.522 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 232.7148 106.68 0)
		)
		(property "Datasheet" "~"
			(at 233.68 110.49 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 233.68 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 107.95 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR028"
			(at 107.95 127 0)
		)
		(property "Value" "Earth"
			(at 107.95 125.73 0)
		)
		(property "Footprint" ""
			(at 107.95 120.65 0)
		)
		(property "Datasheet" "~"
			(at 107.95 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 107.95 120.65 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 208.28 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR055"
			(at 208.28 91.44 0)
		)
		(property "Value" "Earth"
			(at 208.28 90.17 0)
		)
		(property "Footprint" ""
			(at 208.28 85.09 0)
		)
		(property "Datasheet" "~"
			(at 208.28 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 208.28 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR055")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 223.52 116.84 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR058"
			(at 223.52 123.19 0)
		)
		(property "Value" "Earth"
			(at 223.52 121.92 0)
		)
		(property "Footprint" ""
			(at 223.52 116.84 0)
		)
		(property "Datasheet" "~"
			(at 223.52 116.84 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 223.52 116.84 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR058")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 246.38 106.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR061"
			(at 246.38 113.03 0)
		)
		(property "Value" "Earth"
			(at 246.38 111.76 0)
		)
		(property "Footprint" ""
			(at 246.38 106.68 0)
		)
		(property "Datasheet" "~"
			(at 246.38 106.68 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 246.38 106.68 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR061")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 69.85 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 69.85 139.7 0)
		)
		(property "Value" "Earth"
			(at 69.85 138.43 0)
		)
		(property "Footprint" ""
			(at 69.85 133.35 0)
		)
		(property "Datasheet" "~"
			(at 69.85 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 69.85 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 72.39 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08"
			(at 72.39 92.71 0)
		)
		(property "Value" "Earth"
			(at 72.39 91.44 0)
		)
		(property "Footprint" ""
			(at 72.39 86.36 0)
		)
		(property "Datasheet" "~"
			(at 72.39 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 72.39 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 72.39 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07"
			(at 72.39 82.55 0)
		)
		(property "Value" "+5V"
			(at 72.136 75.438 0)
		)
		(property "Footprint" ""
			(at 72.39 78.74 0)
		)
		(property "Datasheet" ""
			(at 72.39 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 72.39 78.74 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 198.12 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR051"
			(at 198.12 91.44 0)
		)
		(property "Value" "Earth"
			(at 198.12 90.17 0)
		)
		(property "Footprint" ""
			(at 198.12 85.09 0)
		)
		(property "Datasheet" "~"
			(at 198.12 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 198.12 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR051")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 154.94 123.19 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP3"
			(at 159.258 123.19 90)
		)
		(property "Value" "TestPoint"
			(at 160.02 124.46 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 154.94 128.27 0)
		)
		(property "Datasheet" "~"
			(at 154.94 128.27 0)
		)
		(property "Description" "test point"
			(at 154.94 123.19 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "TP3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 111.76 105.41 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5"
			(at 107.188 104.648 90)
		)
		(property "Value" "10K"
			(at 114.3 104.648 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 111.76 103.632 90)
		)
		(property "Datasheet" "~"
			(at 111.76 105.41 0)
		)
		(property "Description" "Resistor"
			(at 111.76 105.41 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 111.76 107.95 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 107.188 107.188 90)
		)
		(property "Value" "10K"
			(at 114.3 107.188 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 111.76 106.172 90)
		)
		(property "Datasheet" "~"
			(at 111.76 107.95 0)
		)
		(property "Description" "Resistor"
			(at 111.76 107.95 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 132.08 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR030"
			(at 132.08 90.17 0)
		)
		(property "Value" "+3.3V"
			(at 132.08 83.058 0)
		)
		(property "Footprint" ""
			(at 132.08 86.36 0)
		)
		(property "Datasheet" ""
			(at 132.08 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 132.08 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 95.25 104.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 95.758 102.108 0)
		)
		(property "Value" "12pF"
			(at 95.758 106.172 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 96.2152 107.95 0)
		)
		(property "Datasheet" "~"
			(at 95.25 104.14 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 95.25 104.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 163.83 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR037"
			(at 163.83 120.65 0)
		)
		(property "Value" "Earth"
			(at 163.83 119.38 0)
		)
		(property "Footprint" ""
			(at 163.83 114.3 0)
		)
		(property "Datasheet" "~"
			(at 163.83 114.3 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 163.83 114.3 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR037")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 171.45 134.62 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 171.45 140.97 0)
		)
		(property "Value" "Earth"
			(at 171.45 139.7 0)
		)
		(property "Footprint" ""
			(at 171.45 134.62 0)
		)
		(property "Datasheet" "~"
			(at 171.45 134.62 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 171.45 134.62 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "RF:CC2500")
		(at 191.77 102.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U3"
			(at 200.914 89.154 0)
		)
		(property "Value" "CC2500"
			(at 199.136 116.84 0)
		)
		(property "Footprint" "Package_DFN_QFN:Texas_RGP0020H_VQFN-20-1EP_4x4mm_P0.5mm_EP2.4x2.4mm"
			(at 193.04 120.65 0)
		)
		(property "Datasheet" "http://www.ti.com/lit/ds/symlink/cc2500.pdf"
			(at 196.85 87.63 0)
		)
		(property "Description" "Single Chip Low Power RF Transceiver, QFN-20"
			(at 191.77 102.87 0)
		)
		(pin "4")
		(pin "3")
		(pin "6")
		(pin "15")
		(pin "7")
		(pin "14")
		(pin "10")
		(pin "17")
		(pin "11")
		(pin "9")
		(pin "5")
		(pin "18")
		(pin "20")
		(pin "21")
		(pin "1")
		(pin "8")
		(pin "16")
		(pin "13")
		(pin "2")
		(pin "19")
		(pin "12")
		(instances
			(project ""
				(path
					(reference "U3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 167.64 113.03 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 165.862 115.062 90)
		)
		(property "Value" "56K"
			(at 167.894 115.062 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 167.64 111.252 90)
		)
		(property "Datasheet" "~"
			(at 167.64 113.03 0)
		)
		(property "Description" "Resistor"
			(at 167.64 113.03 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 218.44 106.68 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C20"
			(at 221.742 105.918 90)
		)
		(property "Value" "100nF"
			(at 223.012 107.95 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 222.25 105.7148 0)
		)
		(property "Datasheet" "~"
			(at 218.44 106.68 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 218.44 106.68 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 134.62 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR033"
			(at 134.62 139.7 0)
		)
		(property "Value" "Earth"
			(at 134.62 138.43 0)
		)
		(property "Footprint" ""
			(at 134.62 133.35 0)
		)
		(property "Datasheet" "~"
			(at 134.62 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 134.62 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR033")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 104.14 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR025"
			(at 104.14 92.71 0)
		)
		(property "Value" "Earth"
			(at 104.14 91.44 0)
		)
		(property "Footprint" ""
			(at 104.14 86.36 0)
		)
		(property "Datasheet" "~"
			(at 104.14 86.36 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 104.14 86.36 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 137.16 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR035"
			(at 137.16 139.7 0)
		)
		(property "Value" "Earth"
			(at 137.16 138.43 0)
		)
		(property "Footprint" ""
			(at 137.16 133.35 0)
		)
		(property "Datasheet" "~"
			(at 137.16 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 137.16 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR035")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 106.68 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR027"
			(at 106.68 115.57 0)
		)
		(property "Value" "Earth"
			(at 106.68 114.3 0)
		)
		(property "Footprint" ""
			(at 106.68 109.22 0)
		)
		(property "Datasheet" "~"
			(at 106.68 109.22 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 106.68 109.22 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 134.62 83.82 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR032"
			(at 134.62 87.63 0)
		)
		(property "Value" "+5V"
			(at 134.366 80.518 0)
		)
		(property "Footprint" ""
			(at 134.62 83.82 0)
		)
		(property "Datasheet" ""
			(at 134.62 83.82 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 134.62 83.82 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR032")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V1")
		(at 203.2 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR052"
			(at 203.2 81.28 0)
		)
		(property "Value" "+3.3V"
			(at 203.2 74.168 0)
		)
		(property "Footprint" ""
			(at 203.2 77.47 0)
		)
		(property "Datasheet" ""
			(at 203.2 77.47 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V1\""
			(at 203.2 77.47 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR052")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 213.36 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR056"
			(at 213.36 127 0)
		)
		(property "Value" "Earth"
			(at 213.36 125.73 0)
		)
		(property "Footprint" ""
			(at 213.36 120.65 0)
		)
		(property "Datasheet" "~"
			(at 213.36 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 213.36 120.65 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR056")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 111.76 95.25 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R2"
			(at 107.188 94.488 90)
		)
		(property "Value" "10K"
			(at 114.3 94.488 90)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 111.76 93.472 90)
		)
		(property "Datasheet" "~"
			(at 111.76 95.25 0)
		)
		(property "Description" "Resistor"
			(at 111.76 95.25 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 139.7 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR036"
			(at 139.7 139.7 0)
		)
		(property "Value" "Earth"
			(at 139.7 138.43 0)
		)
		(property "Footprint" ""
			(at 139.7 133.35 0)
		)
		(property "Datasheet" "~"
			(at 139.7 133.35 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 139.7 133.35 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR036")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 213.36 116.84 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 213.868 114.808 0)
		)
		(property "Value" "100nF"
			(at 213.868 118.872 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 214.3252 120.65 0)
		)
		(property "Datasheet" "~"
			(at 213.36 116.84 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 213.36 116.84 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 203.2 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR053"
			(at 203.2 91.44 0)
		)
		(property "Value" "Earth"
			(at 203.2 90.17 0)
		)
		(property "Footprint" ""
			(at 203.2 85.09 0)
		)
		(property "Datasheet" "~"
			(at 203.2 85.09 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 203.2 85.09 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR053")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 203.2 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 203.708 79.248 0)
		)
		(property "Value" "100nF"
			(at 203.708 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 204.1652 85.09 0)
		)
		(property "Datasheet" "~"
			(at 203.2 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 203.2 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 67.31 97.79 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R1"
			(at 70.104 97.282 0)
		)
		(property "Value" "200R"
			(at 71.628 98.806 0)
		)
		(property "Footprint" "PCM_Resistor_SMD_AKL:R_0402_1005Metric"
			(at 69.088 97.79 90)
		)
		(property "Datasheet" "~"
			(at 67.31 97.79 0)
		)
		(property "Description" "Resistor"
			(at 67.31 97.79 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 182.88 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C13"
			(at 183.388 79.248 0)
		)
		(property "Value" "100nF"
			(at 183.388 83.312 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 183.8452 85.09 0)
		)
		(property "Datasheet" "~"
			(at 182.88 81.28 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 182.88 81.28 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 184.15 134.62 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR047"
			(at 184.15 140.97 0)
		)
		(property "Value" "Earth"
			(at 184.15 139.7 0)
		)
		(property "Footprint" ""
			(at 184.15 134.62 0)
		)
		(property "Datasheet" "~"
			(at 184.15 134.62 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 184.15 134.62 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR047")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:Earth")
		(at 67.31 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 67.31 115.57 0)
		)
		(property "Value" "Earth"
			(at 67.31 114.3 0)
		)
		(property "Footprint" ""
			(at 67.31 109.22 0)
		)
		(property "Datasheet" "~"
			(at 67.31 109.22 0)
		)
		(property "Description" "Power symbol creates a global label with name \"Earth\""
			(at 67.31 109.22 0)
		)
		(pin "1")
		(instances
			(project "CC2500-RF-USB-Stick"
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
	(embedded_fonts no)
	(embedded_files
		(file
			(name "gost_fixed.kicad_wks")
			(type worksheet)
		)
	)
)
